(kicad_sch
	(version 20250114)
	(generator "eeschema")
	(generator_version "9.0")
	(paper "A4")
	(lib_symbols
		(symbol "Battery_Management:MCP73831-2-OT"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -7.62 6.35 0)
			)
			(property "Value" "MCP73831-2-OT"
				(at 1.27 6.35 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
				(at 1.27 -6.35 0)
			)
			(property "Datasheet" "http://ww1.microchip.com/downloads/en/DeviceDoc/20001984g.pdf"
				(at 0 -18.288 0)
			)
			(property "Description" "Single cell, Li-Ion/Li-Po charge management controller, 4.20V, Tri-State Status Output, in SOT23-5 package"
				(at 0 0 0)
			)
			(property "ki_keywords" "battery charger lithium"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT?23*"
				(at 0 0 0)
			)
			(symbol "MCP73831-2-OT_0_1"
				(rectangle
					(start -7.62 5.08)
					(end 7.62 -5.08)
					(fill
						(type background)
					)
				)
			)
			(symbol "MCP73831-2-OT_1_1"
				(pin input line
					(at -10.16 -2.54 0)
					(length 2.54)
					(name "PROG")
					(number "5")
				)
				(pin power_in line
					(at 0 7.62 270)
					(length 2.54)
					(name "V_{DD}")
					(number "4")
				)
				(pin power_in line
					(at 0 -7.62 90)
					(length 2.54)
					(name "V_{SS}")
					(number "2")
				)
				(pin power_out line
					(at 10.16 2.54 180)
					(length 2.54)
					(name "V_{BAT}")
					(number "3")
				)
				(pin tri_state line
					(at 10.16 -2.54 180)
					(length 2.54)
					(name "STAT")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Connector:TestPoint"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0.762)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "TP"
				(at 0 6.858 0)
			)
			(property "Value" "TestPoint"
				(at 0 5.08 0)
			)
			(property "Footprint" ""
				(at 5.08 0 0)
			)
			(property "Datasheet" "~"
				(at 5.08 0 0)
			)
			(property "Description" "test point"
				(at 0 0 0)
			)
			(property "ki_keywords" "test point tp"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Pin* Test*"
				(at 0 0 0)
			)
			(symbol "TestPoint_0_1"
				(circle
					(center 0 3.302)
					(radius 0.762)
					(fill
						(type none)
					)
				)
			)
			(symbol "TestPoint_1_1"
				(pin passive line
					(at 0 0 90)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Connector:USB_C_Receptacle_PowerOnly_6P"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J"
				(at 0 16.51 0)
			)
			(property "Value" "USB_C_Receptacle_PowerOnly_6P"
				(at 0 13.97 0)
			)
			(property "Footprint" ""
				(at 3.81 2.54 0)
			)
			(property "Datasheet" "https://www.usb.org/sites/default/files/documents/usb_type-c.zip"
				(at 0 0 0)
			)
			(property "Description" "USB Power-Only 6P Type-C Receptacle connector"
				(at 0 0 0)
			)
			(property "ki_keywords" "usb universal serial bus type-C power-only charging-only 6P 6C"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "USB*C*Receptacle*"
				(at 0 0 0)
			)
			(symbol "USB_C_Receptacle_PowerOnly_6P_0_0"
				(rectangle
					(start -0.254 -12.7)
					(end 0.254 -11.684)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 7.874)
					(end 9.144 7.366)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 -4.826)
					(end 9.144 -5.334)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 -7.366)
					(end 9.144 -7.874)
					(fill
						(type none)
					)
				)
			)
			(symbol "USB_C_Receptacle_PowerOnly_6P_0_1"
				(rectangle
					(start -10.16 12.7)
					(end 10.16 -12.7)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy -8.89 -1.27) (xy -8.89 6.35)
					)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -7.62 -1.27)
					(end -6.35 6.35)
					(fill
						(type outline)
					)
				)
				(arc
					(start -7.62 6.35)
					(mid -6.985 6.9823)
					(end -6.35 6.35)
					(fill
						(type none)
					)
				)
				(arc
					(start -7.62 6.35)
					(mid -6.985 6.9823)
					(end -6.35 6.35)
					(fill
						(type outline)
					)
				)
				(arc
					(start -8.89 6.35)
					(mid -6.985 8.2467)
					(end -5.08 6.35)
					(fill
						(type none)
					)
				)
				(arc
					(start -5.08 -1.27)
					(mid -6.985 -3.1667)
					(end -8.89 -1.27)
					(fill
						(type none)
					)
				)
				(arc
					(start -6.35 -1.27)
					(mid -6.985 -1.9023)
					(end -7.62 -1.27)
					(fill
						(type none)
					)
				)
				(arc
					(start -6.35 -1.27)
					(mid -6.985 -1.9023)
					(end -7.62 -1.27)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy -5.08 6.35) (xy -5.08 -1.27)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center -2.54 3.683)
					(radius 0.635)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy -1.27 6.858) (xy 0 9.398) (xy 1.27 6.858) (xy -1.27 6.858)
					)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy 0 0.508) (xy 2.54 3.048) (xy 2.54 4.318)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -0.762) (xy -2.54 1.778) (xy -2.54 3.048)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -3.302) (xy 0 6.858)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 0 -3.302)
					(radius 1.27)
					(fill
						(type outline)
					)
				)
				(rectangle
					(start 1.905 4.318)
					(end 3.175 5.588)
					(fill
						(type outline)
					)
				)
			)
			(symbol "USB_C_Receptacle_PowerOnly_6P_1_1"
				(pin passive line
					(at -7.62 -17.78 90)
					(length 5.08)
					(name "SHIELD")
					(number "S1")
				)
				(pin passive line
					(at 0 -17.78 90)
					(length 5.08)
					(name "GND")
					(number "A12")
				)
				(pin passive line
					(at 0 -17.78 90)
					(length 5.08)
					(hide yes)
					(name "GND")
					(number "B12")
				)
				(pin passive line
					(at 15.24 7.62 180)
					(length 5.08)
					(name "VBUS")
					(number "A9")
				)
				(pin passive line
					(at 15.24 7.62 180)
					(length 5.08)
					(hide yes)
					(name "VBUS")
					(number "B9")
				)
				(pin bidirectional line
					(at 15.24 -5.08 180)
					(length 5.08)
					(name "CC1")
					(number "A5")
				)
				(pin bidirectional line
					(at 15.24 -7.62 180)
					(length 5.08)
					(name "CC2")
					(number "B5")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:Antenna_Dipole"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 1.016)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "AE"
				(at 1.27 1.27 0)
			)
			(property "Value" "Antenna_Dipole"
				(at 1.27 0 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Dipole antenna"
				(at 0 0 0)
			)
			(property "ki_keywords" "dipole antenna"
				(at 0 0 0)
			)
			(symbol "Antenna_Dipole_0_1"
				(polyline
					(pts
						(xy 2.54 -3.81) (xy 2.54 -2.54) (xy 5.08 -2.54) (xy 5.08 -1.27) (xy -2.54 -1.27) (xy -2.54 -2.54)
						(xy 0 -2.54) (xy 0 -3.81)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "Antenna_Dipole_1_1"
				(pin input line
					(at 0 -5.08 90)
					(length 2.54)
					(name "~")
					(number "1")
				)
				(pin input line
					(at 2.54 -5.08 90)
					(length 2.54)
					(name "~")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:Battery"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "BT"
				(at 2.54 2.54 0)
			)
			(property "Value" "Battery"
				(at 2.54 0 0)
			)
			(property "Footprint" ""
				(at 0 1.524 90)
			)
			(property "Datasheet" "~"
				(at 0 1.524 90)
			)
			(property "Description" "Multiple-cell battery"
				(at 0 0 0)
			)
			(property "Sim.Device" "V"
				(at 0 0 0)
			)
			(property "Sim.Type" "DC"
				(at 0 0 0)
			)
			(property "Sim.Pins" "1=+ 2=-"
				(at 0 0 0)
			)
			(property "ki_keywords" "batt voltage-source cell"
				(at 0 0 0)
			)
			(symbol "Battery_0_1"
				(rectangle
					(start -2.286 1.778)
					(end 2.286 1.524)
					(fill
						(type outline)
					)
				)
				(rectangle
					(start -2.286 -1.27)
					(end 2.286 -1.524)
					(fill
						(type outline)
					)
				)
				(rectangle
					(start -1.524 1.016)
					(end 1.524 0.508)
					(fill
						(type outline)
					)
				)
				(rectangle
					(start -1.524 -2.032)
					(end 1.524 -2.54)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy 0 1.778) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 0.254)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -0.508) (xy 0 -0.254)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -1.016) (xy 0 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 3.048) (xy 1.778 3.048)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 3.556) (xy 1.27 2.54)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "Battery_1_1"
				(pin passive line
					(at 0 5.08 270)
					(length 2.54)
					(name "+")
					(number "1")
				)
				(pin passive line
					(at 0 -5.08 90)
					(length 2.54)
					(name "-")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:C"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_0_1"
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 -0.762) (xy 2.032 -0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:C_US"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0.254)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C_US"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "capacitor, US symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_US_0_1"
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
				(arc
					(start -2.032 -1.27)
					(mid 0 -0.5572)
					(end 2.032 -1.27)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_US_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 3.302)
					(name "~")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:R"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.032 0 90)
			)
			(property "Value" "R"
				(at 0 0 90)
			)
			(property "Footprint" ""
				(at -1.778 0 90)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor"
				(at 0 0 0)
			)
			(property "ki_keywords" "R res resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_0_1"
				(rectangle
					(start -1.016 -2.54)
					(end 1.016 2.54)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:R_US"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 2.54 0 90)
			)
			(property "Value" "R_US"
				(at -2.54 0 90)
			)
			(property "Footprint" ""
				(at 1.016 -0.254 90)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor, US symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "R res resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_US_0_1"
				(polyline
					(pts
						(xy 0 2.286) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.286) (xy 1.016 1.905) (xy 0 1.524) (xy -1.016 1.143) (xy 0 0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0.762) (xy 1.016 0.381) (xy 0 0) (xy -1.016 -0.381) (xy 0 -0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -0.762) (xy 1.016 -1.143) (xy 0 -1.524) (xy -1.016 -1.905) (xy 0 -2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -2.286) (xy 0 -2.54)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_US_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "~")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Diode:1N5819"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 1.016)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "D"
				(at 0 2.54 0)
			)
			(property "Value" "1N5819"
				(at 0 -2.54 0)
			)
			(property "Footprint" "Diode_THT:D_DO-41_SOD81_P10.16mm_Horizontal"
				(at 0 -4.445 0)
			)
			(property "Datasheet" "http://www.vishay.com/docs/88525/1n5817.pdf"
				(at 0 0 0)
			)
			(property "Description" "40V 1A Schottky Barrier Rectifier Diode, DO-41"
				(at 0 0 0)
			)
			(property "ki_keywords" "diode Schottky"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "D*DO?41*"
				(at 0 0 0)
			)
			(symbol "1N5819_0_1"
				(polyline
					(pts
						(xy -1.905 0.635) (xy -1.905 1.27) (xy -1.27 1.27) (xy -1.27 -1.27) (xy -0.635 -1.27) (xy -0.635 -0.635)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 1.27) (xy 1.27 -1.27) (xy -1.27 0) (xy 1.27 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 0) (xy -1.27 0)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "1N5819_1_1"
				(pin passive line
					(at -3.81 0 0)
					(length 2.54)
					(name "K")
					(number "1")
				)
				(pin passive line
					(at 3.81 0 180)
					(length 2.54)
					(name "A")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Mechanical:MountingHole"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom no)
			(on_board yes)
			(property "Reference" "H"
				(at 0 5.08 0)
			)
			(property "Value" "MountingHole"
				(at 0 3.175 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Mounting Hole without connection"
				(at 0 0 0)
			)
			(property "ki_keywords" "mounting hole"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "MountingHole*"
				(at 0 0 0)
			)
			(symbol "MountingHole_0_1"
				(circle
					(center 0 0)
					(radius 1.27)
					(fill
						(type none)
					)
				)
			)
			(embedded_fonts no)
		)
		(symbol "RF_GPS:L70-R"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -10.16 13.97 0)
			)
			(property "Value" "L70-R"
				(at 10.16 13.97 0)
			)
			(property "Footprint" "RF_GPS:Quectel_L70-R"
				(at 0 -26.67 0)
			)
			(property "Datasheet" "https://www.quectel.com/product/gps-only-l70-r"
				(at 0 -30.48 0)
			)
			(property "Description" "Quectel GPS Module"
				(at 0 0 0)
			)
			(property "ki_keywords" "quectel GPS GNSS module"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Quectel*L70*R*"
				(at 0 0 0)
			)
			(symbol "L70-R_0_1"
				(rectangle
					(start -10.16 12.7)
					(end 10.16 -12.7)
					(fill
						(type background)
					)
				)
			)
			(symbol "L70-R_1_1"
				(pin output line
					(at -12.7 7.62 0)
					(length 2.54)
					(name "ANTON")
					(number "13")
				)
				(pin input line
					(at -12.7 2.54 0)
					(length 2.54)
					(name "RF_IN")
					(number "11")
				)
				(pin passive line
					(at -12.7 -2.54 0)
					(length 2.54)
					(name "RESERVED")
					(number "16")
				)
				(pin passive line
					(at -12.7 -5.08 0)
					(length 2.54)
					(name "RESERVED")
					(number "17")
				)
				(pin passive line
					(at -12.7 -7.62 0)
					(length 2.54)
					(name "RESERVED")
					(number "18")
				)
				(pin no_connect line
					(at -10.16 0 0)
					(length 2.54)
					(hide yes)
					(name "NC")
					(number "15")
				)
				(pin power_out line
					(at -2.54 15.24 270)
					(length 2.54)
					(name "VCC_RF")
					(number "14")
				)
				(pin power_in line
					(at 0 15.24 270)
					(length 2.54)
					(name "V_BCKP")
					(number "6")
				)
				(pin power_in line
					(at 0 -15.24 90)
					(length 2.54)
					(name "GND")
					(number "1")
				)
				(pin passive line
					(at 0 -15.24 90)
					(length 2.54)
					(hide yes)
					(name "GND")
					(number "10")
				)
				(pin passive line
					(at 0 -15.24 90)
					(length 2.54)
					(hide yes)
					(name "GND")
					(number "12")
				)
				(pin power_in line
					(at 2.54 15.24 270)
					(length 2.54)
					(name "VCC")
					(number "8")
				)
				(pin no_connect line
					(at 10.16 0 180)
					(length 2.54)
					(hide yes)
					(name "NC")
					(number "7")
				)
				(pin output line
					(at 12.7 5.08 180)
					(length 2.54)
					(name "TXD1")
					(number "2")
				)
				(pin input line
					(at 12.7 2.54 180)
					(length 2.54)
					(name "RXD1")
					(number "3")
				)
				(pin input line
					(at 12.7 -2.54 180)
					(length 2.54)
					(name "STANDBY")
					(number "5")
				)
				(pin output line
					(at 12.7 -5.08 180)
					(length 2.54)
					(name "1PPS")
					(number "4")
				)
				(pin input line
					(at 12.7 -7.62 180)
					(length 2.54)
					(name "~{RESET}")
					(number "9")
				)
			)
			(embedded_fonts no)
		)
		(symbol "RF_NFC:ST25DV64K-IER8C3"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at 6.35 6.35 0)
			)
			(property "Value" "ST25DV64K-IER8C3"
				(at 10.795 -6.35 0)
			)
			(property "Footprint" "Package_DFN_QFN:DFN-8-1EP_3x2mm_P0.5mm_EP1.36x1.46mm"
				(at 0 0 0)
			)
			(property "Datasheet" "https://www.st.com/resource/en/datasheet/st25dv04k.pdf"
				(at 0 0 0)
			)
			(property "Description" "Dynamic NFC/RFID tag IC with 64-Kbit EEPROM, UFDFPN-8"
				(at 0 0 0)
			)
			(property "ki_keywords" "NFC Tag"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "DFN*3x2mm*P0.5mm*"
				(at 0 0 0)
			)
			(symbol "ST25DV64K-IER8C3_1_1"
				(rectangle
					(start -7.62 5.08)
					(end 7.62 -5.08)
					(fill
						(type background)
					)
				)
				(pin bidirectional line
					(at -10.16 2.54 0)
					(length 2.54)
					(name "SDA")
					(number "5")
				)
				(pin input line
					(at -10.16 0 0)
					(length 2.54)
					(name "SCL")
					(number "6")
				)
				(pin open_collector line
					(at -10.16 -2.54 0)
					(length 2.54)
					(name "GPO")
					(number "7")
				)
				(pin power_in line
					(at 0 7.62 270)
					(length 2.54)
					(name "VCC")
					(number "8")
				)
				(pin power_in line
					(at 0 -7.62 90)
					(length 2.54)
					(name "VSS")
					(number "4")
				)
				(pin no_connect line
					(at 2.54 5.08 270)
					(length 2.54)
					(hide yes)
					(name "NC")
					(number "9")
				)
				(pin power_out line
					(at 10.16 2.54 180)
					(length 2.54)
					(name "V_EH")
					(number "1")
				)
				(pin passive line
					(at 10.16 0 180)
					(length 2.54)
					(name "AC0")
					(number "2")
				)
				(pin passive line
					(at 10.16 -2.54 180)
					(length 2.54)
					(name "AC1")
					(number "3")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Regulator_Linear:AP2112K-3.3"
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -5.08 5.715 0)
			)
			(property "Value" "AP2112K-3.3"
				(at 0 5.715 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
				(at 0 8.255 0)
			)
			(property "Datasheet" "https://www.diodes.com/assets/Datasheets/AP2112.pdf"
				(at 0 2.54 0)
			)
			(property "Description" "600mA low dropout linear regulator, with enable pin, 3.8V-6V input voltage range, 3.3V fixed positive output, SOT-23-5"
				(at 0 0 0)
			)
			(property "ki_keywords" "linear regulator ldo fixed positive"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT?23?5*"
				(at 0 0 0)
			)
			(symbol "AP2112K-3.3_0_1"
				(rectangle
					(start -5.08 4.445)
					(end 5.08 -5.08)
					(fill
						(type background)
					)
				)
			)
			(symbol "AP2112K-3.3_1_1"
				(pin power_in line
					(at -7.62 2.54 0)
					(length 2.54)
					(name "VIN")
					(number "1")
				)
				(pin input line
					(at -7.62 0 0)
					(length 2.54)
					(name "EN")
					(number "3")
				)
				(pin power_in line
					(at 0 -7.62 90)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin no_connect line
					(at 5.08 0 180)
					(length 2.54)
					(hide yes)
					(name "NC")
					(number "4")
				)
				(pin power_out line
					(at 7.62 2.54 180)
					(length 2.54)
					(name "VOUT")
					(number "5")
				)
			)
			(embedded_fonts no)
		)
		(symbol "SeniorDesign:1462350001"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "AE"
				(at 15.5956 9.1186 0)
			)
			(property "Value" "1462350001"
				(at 14.9606 6.5786 0)
			)
			(property "Footprint" "1462350001:ANT_1462350001_MOL"
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "MFR_NAME" "Molex Connector Corporation"
				(at 0 0 0)
			)
			(property "MANUFACTURER_PART_NUMBER" "1462350001"
				(at 0 0 0)
			)
			(symbol "1462350001_0_0"
				(polyline
					(pts
						(xy 7.62 5.08) (xy 7.62 -7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 7.62 -7.62) (xy 33.02 -7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 33.02 5.08) (xy 7.62 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 33.02 -7.62) (xy 33.02 5.08)
					)
					(fill
						(type none)
					)
				)
				(pin passive line
					(at 0 0 0)
					(length 7.62)
					(name "1")
					(number "1")
				)
				(pin passive line
					(at 0 -2.54 0)
					(length 7.62)
					(name "2")
					(number "2")
				)
				(pin passive line
					(at 40.64 0 180)
					(length 7.62)
					(name "4")
					(number "4")
				)
				(pin passive line
					(at 40.64 -2.54 180)
					(length 7.62)
					(name "3")
					(number "3")
				)
			)
			(embedded_fonts no)
		)
		(symbol "SeniorDesign:ANT-915-USP410"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "E"
				(at 2.0344 0.7629 0)
			)
			(property "Value" "ANT-915-USP410"
				(at 2.1628 -1.0178 0)
			)
			(property "Footprint" "ANT-915-USP410:XDCR_ANT-915-USP410"
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "PARTREV" "N/A"
				(at 0 0 0)
			)
			(property "MANUFACTURER" "Linx"
				(at 0 0 0)
			)
			(property "MAXIMUM_PACKAGE_HEIGHT" "2.9 mm"
				(at 0 0 0)
			)
			(property "STANDARD" "Manufacturer Recommendations"
				(at 0 0 0)
			)
			(symbol "ANT-915-USP410_0_0"
				(polyline
					(pts
						(xy -1.397 3.175) (xy 0 3.175)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.762 -3.302) (xy 0.762 -3.302)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.127 -4.064) (xy 0.254 -4.064)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 3.175) (xy 0 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 3.175) (xy 1.397 3.175)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy -1.397 3.175)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -2.54) (xy -1.27 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -2.54) (xy 1.27 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.397 3.175) (xy 0 0)
					)
					(fill
						(type none)
					)
				)
				(pin passive line
					(at -2.54 0 0)
					(length 2.54)
					(name "~")
					(number "1")
				)
				(pin power_in line
					(at -2.54 -2.54 0)
					(length 2.54)
					(name "~")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "SeniorDesign:CMI-1295IC-0385T"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "LS"
				(at -1.27 6.35 0)
			)
			(property "Value" "CMI-1295IC-0385T"
				(at -1.27 -8.255 0)
			)
			(property "Footprint" "CMI-1295IC-0385T:CUI_CMI-1295IC-0385T"
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "PARTREV" "1.0"
				(at 0 0 0)
			)
			(property "STANDARD" "Manufacturer Recommendations"
				(at 0 0 0)
			)
			(property "MAXIMUM_PACKAGE_HEIGHT" "9.7mm"
				(at 0 0 0)
			)
			(property "MANUFACTURER" "CUI Inc."
				(at 0 0 0)
			)
			(symbol "CMI-1295IC-0385T_0_0"
				(polyline
					(pts
						(xy -3.175 1.905) (xy -3.175 -1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -3.175 1.905) (xy -2.54 1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -3.175 -1.905) (xy -2.54 -1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.54 2.54) (xy -2.54 1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.54 1.905) (xy 0 1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.54 -1.905) (xy 0 -1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.54 -2.54) (xy -2.54 -1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 1.905) (xy 2.54 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -1.905) (xy 0 1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 -1.905) (xy 2.54 -5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 -5.08) (xy 2.54 5.08)
					)
					(fill
						(type none)
					)
				)
				(text "+"
					(at -4.318 3.302 0)
				)
				(text "-"
					(at -4.318 -3.556 0)
				)
				(pin passive line
					(at -2.54 5.08 270)
					(length 2.54)
					(name "~")
					(number "P")
				)
				(pin passive line
					(at -2.54 -5.08 90)
					(length 2.54)
					(name "~")
					(number "N")
				)
			)
			(embedded_fonts no)
		)
		(symbol "SeniorDesign:HS96L01B4S03"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" ""
				(at 0 0 0)
			)
			(property "Value" ""
				(at 0 0 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_fp_filters" "*OLED-TH_HS96L01B4S03*"
				(at 0 0 0)
			)
			(symbol "HS96L01B4S03_1_0"
				(rectangle
					(start -3.81 10.16)
					(end 30.48 -10.16)
					(fill
						(type none)
					)
				)
				(circle
					(center -2.54 8.89)
					(radius 0.381)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 3.81 7.62)
					(end 29.21 -7.62)
					(fill
						(type none)
					)
				)
				(text "OLED"
					(at 12.7 -1.714 0)
				)
				(pin passive line
					(at -6.35 7.62 0)
					(length 2.54)
					(name "GND")
					(number "1")
				)
				(pin passive line
					(at -6.35 5.08 0)
					(length 2.54)
					(name "VCC")
					(number "2")
				)
				(pin passive line
					(at -6.35 2.54 0)
					(length 2.54)
					(name "SCL")
					(number "3")
				)
				(pin passive line
					(at -6.35 0 0)
					(length 2.54)
					(name "SDA")
					(number "4")
				)
				(pin passive line
					(at -6.35 -2.54 0)
					(length 2.54)
					(name "RES")
					(number "5")
				)
				(pin passive line
					(at -6.35 -5.08 0)
					(length 2.54)
					(name "DC")
					(number "6")
				)
				(pin passive line
					(at -6.35 -7.62 0)
					(length 2.54)
					(name "CS")
					(number "7")
				)
			)
			(embedded_fonts no)
		)
		(symbol "SeniorDesign:MXC6655XA"
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at 20.32 10.16 0)
			)
			(property "Value" "MXC6655XA"
				(at 20.32 7.62 0)
			)
			(property "Footprint" "MXC6655XA_MEM"
				(at 0 0 0)
			)
			(property "Datasheet" "MXC6655XA"
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_locked" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "MXC6655XA"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "MXC6655XA_MEM MXC6655XA_MEM-M MXC6655XA_MEM-L"
				(at 0 0 0)
			)
			(symbol "MXC6655XA_0_1"
				(polyline
					(pts
						(xy 7.62 5.08) (xy 7.62 -17.78)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 7.62 -17.78) (xy 33.02 -17.78)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 33.02 5.08) (xy 7.62 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 33.02 -17.78) (xy 33.02 5.08)
					)
					(fill
						(type none)
					)
				)
				(pin no_connect line
					(at 0 0 0)
					(length 7.62)
					(name "NC")
					(number "1")
				)
				(pin bidirectional line
					(at 0 -2.54 0)
					(length 7.62)
					(name "SDA")
					(number "2")
				)
				(pin no_connect line
					(at 0 -5.08 0)
					(length 7.62)
					(name "NC")
					(number "3")
				)
				(pin no_connect line
					(at 0 -7.62 0)
					(length 7.62)
					(name "NC")
					(number "4")
				)
				(pin output line
					(at 0 -10.16 0)
					(length 7.62)
					(name "INT")
					(number "5")
				)
				(pin no_connect line
					(at 0 -12.7 0)
					(length 7.62)
					(name "NC")
					(number "6")
				)
				(pin input line
					(at 40.64 0 180)
					(length 7.62)
					(name "SCL")
					(number "12")
				)
				(pin no_connect line
					(at 40.64 -2.54 180)
					(length 7.62)
					(name "NC")
					(number "11")
				)
				(pin no_connect line
					(at 40.64 -5.08 180)
					(length 7.62)
					(name "NC")
					(number "10")
				)
				(pin power_out line
					(at 40.64 -7.62 180)
					(length 7.62)
					(name "GND")
					(number "9")
				)
				(pin no_connect line
					(at 40.64 -10.16 180)
					(length 7.62)
					(name "NC")
					(number "8")
				)
				(pin power_in line
					(at 40.64 -12.7 180)
					(length 7.62)
					(name "VDD")
					(number "7")
				)
			)
			(embedded_fonts no)
		)
		(symbol "SeniorDesign:TMAG5273C1QDBVR"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -10.16 10.922 0)
			)
			(property "Value" "TMAG5273C1QDBVR"
				(at -10.16 -12.7 0)
			)
			(property "Footprint" "TMAG5273C1QDBVR:SOT95P280X140-6N"
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "PARTREV" "B"
				(at 0 0 0)
			)
			(property "STANDARD" "IPC-7351B"
				(at 0 0 0)
			)
			(property "MAXIMUM_PACKAGE_HEIGHT" "1.40mm"
				(at 0 0 0)
			)
			(property "MANUFACTURER" "Texas Instruments"
				(at 0 0 0)
			)
			(symbol "TMAG5273C1QDBVR_0_0"
				(rectangle
					(start -10.16 -10.16)
					(end 10.16 10.16)
					(fill
						(type background)
					)
				)
				(pin bidirectional line
					(at -15.24 2.54 0)
					(length 5.08)
					(name "~{INT}")
					(number "5")
				)
				(pin input line
					(at -15.24 -2.54 0)
					(length 5.08)
					(name "TEST")
					(number "3")
				)
				(pin power_in line
					(at 15.24 7.62 180)
					(length 5.08)
					(name "VCC")
					(number "4")
				)
				(pin bidirectional clock
					(at 15.24 2.54 180)
					(length 5.08)
					(name "SCL")
					(number "1")
				)
				(pin bidirectional line
					(at 15.24 0 180)
					(length 5.08)
					(name "SDA")
					(number "6")
				)
				(pin power_in line
					(at 15.24 -7.62 180)
					(length 5.08)
					(name "GND")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "SeniorDesignSymbolLibrary:E5Mini"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U7"
				(at -2.54 2.286 0)
			)
			(property "Value" "Wio E5"
				(at -2.54 -0.254 0)
			)
			(property "Footprint" "SeniorDesign:Wio-E5"
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(symbol "E5Mini_1_1"
				(rectangle
					(start -16.51 15.24)
					(end 11.43 -12.7)
					(fill
						(type color)
						(color 255 255 194 1)
					)
				)
				(pin power_in line
					(at -19.05 8.89 0)
					(length 2.54)
					(name "VCC")
					(number "1")
				)
				(pin power_in line
					(at -19.05 6.35 0)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin bidirectional line
					(at -19.05 3.81 0)
					(length 2.54)
					(name "PA13")
					(number "3")
				)
				(pin bidirectional line
					(at -19.05 1.27 0)
					(length 2.54)
					(name "PA14")
					(number "4")
				)
				(pin bidirectional line
					(at -19.05 -1.27 0)
					(length 2.54)
					(name "PB15")
					(number "5")
				)
				(pin bidirectional line
					(at -19.05 -3.81 0)
					(length 2.54)
					(name "PA15")
					(number "6")
				)
				(pin bidirectional line
					(at -19.05 -6.35 0)
					(length 2.54)
					(name "PB4")
					(number "7")
				)
				(pin no_connect line
					(at -10.16 17.78 270)
					(length 2.54)
					(name "PB0")
					(number "28")
				)
				(pin bidirectional line
					(at -10.16 -15.24 90)
					(length 2.54)
					(name "PB3")
					(number "8")
				)
				(pin bidirectional line
					(at -7.62 17.78 270)
					(length 2.54)
					(name "PA10")
					(number "27")
				)
				(pin bidirectional line
					(at -7.62 -15.24 90)
					(length 2.54)
					(name "PB7")
					(number "9")
				)
				(pin bidirectional line
					(at -5.08 17.78 270)
					(length 2.54)
					(name "PB14")
					(number "26")
				)
				(pin bidirectional line
					(at -5.08 -15.24 90)
					(length 2.54)
					(name "PB6")
					(number "10")
				)
				(pin bidirectional line
					(at -2.54 17.78 270)
					(length 2.54)
					(name "PB9")
					(number "25")
				)
				(pin bidirectional line
					(at -2.54 -15.24 90)
					(length 2.54)
					(name "PB5")
					(number "11")
				)
				(pin bidirectional line
					(at 0 17.78 270)
					(length 2.54)
					(name "PB13")
					(number "24")
				)
				(pin bidirectional line
					(at 0 -15.24 90)
					(length 2.54)
					(name "PC1")
					(number "12")
				)
				(pin bidirectional line
					(at 2.54 17.78 270)
					(length 2.54)
					(name "PA0")
					(number "23")
				)
				(pin bidirectional line
					(at 2.54 -15.24 90)
					(length 2.54)
					(name "PC0")
					(number "13")
				)
				(pin power_in line
					(at 5.08 17.78 270)
					(length 2.54)
					(name "GND")
					(number "22")
				)
				(pin power_in line
					(at 5.08 -15.24 90)
					(length 2.54)
					(name "GND")
					(number "14")
				)
				(pin bidirectional line
					(at 13.97 8.89 180)
					(length 2.54)
					(name "PA9")
					(number "21")
				)
				(pin bidirectional line
					(at 13.97 6.35 180)
					(length 2.54)
					(name "PB10")
					(number "20")
				)
				(pin bidirectional line
					(at 13.97 3.81 180)
					(length 2.54)
					(name "PA2")
					(number "19")
				)
				(pin bidirectional line
					(at 13.97 1.27 180)
					(length 2.54)
					(name "PA3")
					(number "18")
				)
				(pin input line
					(at 13.97 -1.27 180)
					(length 2.54)
					(name "RST")
					(number "17")
				)
				(pin power_in line
					(at 13.97 -3.81 180)
					(length 2.54)
					(name "GND")
					(number "16")
				)
				(pin unspecified line
					(at 13.97 -6.35 180)
					(length 2.54)
					(name "RFIO")
					(number "15")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Switch:SW_Push"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 1.016)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "SW"
				(at 1.27 2.54 0)
			)
			(property "Value" "SW_Push"
				(at 0 -1.524 0)
			)
			(property "Footprint" ""
				(at 0 5.08 0)
			)
			(property "Datasheet" "~"
				(at 0 5.08 0)
			)
			(property "Description" "Push button switch, generic, two pins"
				(at 0 0 0)
			)
			(property "ki_keywords" "switch normally-open pushbutton push-button"
				(at 0 0 0)
			)
			(symbol "SW_Push_0_1"
				(circle
					(center -2.032 0)
					(radius 0.508)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 1.27) (xy 0 3.048)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 2.032 0)
					(radius 0.508)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 1.27) (xy -2.54 1.27)
					)
					(fill
						(type none)
					)
				)
				(pin passive line
					(at -5.08 0 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
				(pin passive line
					(at 5.08 0 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Switch:SW_SPST"
			(pin_names
				(offset 0)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "SW"
				(at 0 3.175 0)
			)
			(property "Value" "SW_SPST"
				(at 0 -2.54 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Single Pole Single Throw (SPST) switch"
				(at 0 0 0)
			)
			(property "ki_keywords" "switch lever"
				(at 0 0 0)
			)
			(symbol "SW_SPST_0_0"
				(circle
					(center -2.032 0)
					(radius 0.508)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.524 0.254) (xy 1.524 1.778)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 2.032 0)
					(radius 0.508)
					(fill
						(type none)
					)
				)
			)
			(symbol "SW_SPST_1_1"
				(pin passive line
					(at -5.08 0 0)
					(length 2.54)
					(name "A")
					(number "1")
				)
				(pin passive line
					(at 5.08 0 180)
					(length 2.54)
					(name "B")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Transistor_BJT:2N3904"
			(pin_names
				(offset 0)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "Q"
				(at 5.08 1.905 0)
			)
			(property "Value" "2N3904"
				(at 5.08 0 0)
			)
			(property "Footprint" "Package_TO_SOT_THT:TO-92_Inline"
				(at 5.08 -1.905 0)
			)
			(property "Datasheet" "https://www.onsemi.com/pub/Collateral/2N3903-D.PDF"
				(at 0 0 0)
			)
			(property "Description" "0.2A Ic, 40V Vce, Small Signal NPN Transistor, TO-92"
				(at 0 0 0)
			)
			(property "Sim.Device" "NPN"
				(at 0 0 0)
			)
			(property "Sim.Pins" "1=E 2=B 3=C"
				(at 0 0 0)
			)
			(property "ki_keywords" "NPN Transistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "TO?92*"
				(at 0 0 0)
			)
			(symbol "2N3904_0_1"
				(polyline
					(pts
						(xy -2.54 0) (xy 0.635 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 1.905) (xy 0.635 -1.905)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 1.27 0)
					(radius 2.8194)
					(fill
						(type none)
					)
				)
			)
			(symbol "2N3904_1_1"
				(polyline
					(pts
						(xy 0.635 0.635) (xy 2.54 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -0.635) (xy 2.54 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 -1.778) (xy 1.778 -1.27) (xy 2.286 -2.286) (xy 1.27 -1.778)
					)
					(fill
						(type outline)
					)
				)
				(pin input line
					(at -5.08 0 0)
					(length 2.54)
					(name "B")
					(number "2")
				)
				(pin passive line
					(at 2.54 5.08 270)
					(length 2.54)
					(name "C")
					(number "3")
				)
				(pin passive line
					(at 2.54 -5.08 90)
					(length 2.54)
					(name "E")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Transistor_FET:BSS84"
			(pin_names
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "Q"
				(at 5.08 1.905 0)
			)
			(property "Value" "BSS84"
				(at 5.08 0 0)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23"
				(at 5.08 -1.905 0)
			)
			(property "Datasheet" "http://assets.nexperia.com/documents/data-sheet/BSS84.pdf"
				(at 5.08 -3.81 0)
			)
			(property "Description" "-0.13A Id, -50V Vds, P-Channel MOSFET, SOT-23"
				(at 0 0 0)
			)
			(property "ki_keywords" "P-Channel MOSFET"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SOT?23*"
				(at 0 0 0)
			)
			(symbol "BSS84_0_1"
				(polyline
					(pts
						(xy 0.254 1.905) (xy 0.254 -1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.254 0) (xy -2.54 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 2.286) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 1.778) (xy 3.302 1.778) (xy 3.302 -1.778) (xy 0.762 -1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 0.508) (xy 0.762 -0.508)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 -1.27) (xy 0.762 -2.286)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 1.651 0)
					(radius 2.794)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.286 0) (xy 1.27 0.381) (xy 1.27 -0.381) (xy 2.286 0)
					)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy 2.54 2.54) (xy 2.54 1.778)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 2.54 1.778)
					(radius 0.254)
					(fill
						(type outline)
					)
				)
				(circle
					(center 2.54 -1.778)
					(radius 0.254)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy 2.54 -2.54) (xy 2.54 0) (xy 0.762 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.794 -0.508) (xy 2.921 -0.381) (xy 3.683 -0.381) (xy 3.81 -0.254)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 3.302 -0.381) (xy 2.921 0.254) (xy 3.683 0.254) (xy 3.302 -0.381)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "BSS84_1_1"
				(pin input line
					(at -5.08 0 0)
					(length 2.54)
					(name "G")
					(number "1")
				)
				(pin passive line
					(at 2.54 5.08 270)
					(length 2.54)
					(name "D")
					(number "3")
				)
				(pin passive line
					(at 2.54 -5.08 90)
					(length 2.54)
					(name "S")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "power:GND"
			(power)
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0)
					(name "~")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "power:PWR_FLAG"
			(power)
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#FLG"
				(at 0 1.905 0)
			)
			(property "Value" "PWR_FLAG"
				(at 0 3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Special symbol for telling ERC where power comes from"
				(at 0 0 0)
			)
			(property "ki_keywords" "flag power"
				(at 0 0 0)
			)
			(symbol "PWR_FLAG_0_0"
				(pin power_out line
					(at 0 0 90)
					(length 0)
					(name "~")
					(number "1")
				)
			)
			(symbol "PWR_FLAG_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 1.27) (xy -1.016 1.905) (xy 0 2.54) (xy 1.016 1.905) (xy 0 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(embedded_fonts no)
		)
		(symbol "power:VCC"
			(power)
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "VCC"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"VCC\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "VCC_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "VCC_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0)
					(name "~")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
	)
	(rectangle
		(start 92.71 15.24)
		(end 142.24 67.31)
		(fill
			(type none)
		)
	)
	(rectangle
		(start 15.748 15.24)
		(end 91.44 67.31)
		(fill
			(type none)
		)
	)
	(rectangle
		(start 15.24 69.85)
		(end 146.05 127)
		(fill
			(type none)
		)
	)
	(rectangle
		(start 175.26 130.81)
		(end 254 165.1)
		(fill
			(type none)
		)
	)
	(rectangle
		(start 12.7 129.54)
		(end 52.07 168.91)
		(fill
			(type none)
		)
	)
	(rectangle
		(start 147.32 69.85)
		(end 173.99 90.17)
		(fill
			(type none)
		)
	)
	(rectangle
		(start 229.87 15.24)
		(end 281.94 67.31)
		(fill
			(type none)
		)
	)
	(rectangle
		(start 146.05 15.24)
		(end 226.06 67.31)
		(fill
			(type none)
		)
	)
	(rectangle
		(start 57.15 130.81)
		(end 173.99 195.58)
		(fill
			(type none)
		)
	)
	(text "Buttons"
		(exclude_from_sim no)
		(at 242.316 135.382 0)
	)
	(text "Programming"
		(exclude_from_sim no)
		(at 161.036 88.138 0)
	)
	(text "Power and Charging"
		(exclude_from_sim no)
		(at 36.83 74.168 0)
	)
	(text "Speaker"
		(exclude_from_sim no)
		(at 22.098 133.35 0)
	)
	(text "Magnetometer"
		(exclude_from_sim no)
		(at 108.204 20.066 0)
	)
	(text "NFC and Antenna"
		(exclude_from_sim no)
		(at 247.396 18.288 0)
	)
	(text "Display"
		(exclude_from_sim no)
		(at 25.4 17.78 0)
	)
	(text "Accelerometer"
		(exclude_from_sim no)
		(at 162.052 20.574 0)
	)
	(text "GPS and Antenna"
		(exclude_from_sim no)
		(at 75.184 134.62 0)
	)
	(text_box "Trace to antenna needs \nto be 50 ohms."
		(exclude_from_sim no)
		(at 255.27 95.25 0)
		(size 19.05 7.62)
		(margins 0.9525 0.9525 0.9525 0.9525)
		(fill
			(type none)
		)
	)
	(text_box "Trace to antenna needs \nto be 50 ohms."
		(exclude_from_sim no)
		(at 83.82 175.26 0)
		(size 19.05 7.62)
		(margins 0.9525 0.9525 0.9525 0.9525)
		(fill
			(type none)
		)
	)
	(text_box "RST pin worded oddly.\nOn high, system DOESN'T reset."
		(exclude_from_sim no)
		(at 255.27 86.36 0)
		(size 19.05 8.89)
		(margins 0.9525 0.9525 0.9525 0.9525)
		(fill
			(type none)
		)
	)
	(junction
		(at 218.44 163.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 209.55 154.94)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 134.62 139.7)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 128.27 151.13)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 259.08 115.57)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 179.07 92.71)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 179.07 105.41)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 223.52 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 238.76 158.75)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 254 57.15)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 201.93 152.4)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 97.79 82.55)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 83.82 87.63)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 233.68 119.38)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 247.65 152.4)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 72.39 115.57)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 247.65 158.75)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 194.31 92.71)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 152.4 139.7)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 29.21 115.57)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 132.08 26.67)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 72.39 87.63)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 143.51 139.7)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 157.48 149.86)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 209.55 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 259.08 107.95)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 227.33 163.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 77.47 87.63)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 115.57 180.34)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 193.04 149.86)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 46.99 115.57)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 219.71 152.4)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 254 29.21)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 210.82 149.86)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 212.09 50.8)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 193.04 137.16)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 107.95)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 107.95 166.37)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 184.15 147.32)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 109.22 96.52)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 176.53 102.87)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 184.15 137.16)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 100.33 50.8)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 247.65 154.94)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 247.65 149.86)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 109.22 82.55)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 228.6 154.94)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 123.19 166.37)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 57.15 41.91)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 97.79 97.79)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 201.93 137.16)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 176.53 92.71)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 143.51 152.4)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 161.29 139.7)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 200.66 147.32)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 210.82 33.02)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 115.57 63.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 251.46 115.57)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 57.15 29.21)
		(diameter 0)
		(color 0 0 0 0)
	)
	(no_connect
		(at 138.43 153.67)
	)
	(no_connect
		(at 128.27 171.45)
	)
	(no_connect
		(at 128.27 173.99)
	)
	(no_connect
		(at 60.96 166.37)
	)
	(no_connect
		(at 128.27 161.29)
	)
	(no_connect
		(at 128.27 176.53)
	)
	(no_connect
		(at 264.16 40.64)
	)
	(no_connect
		(at 208.28 83.82)
	)
	(no_connect
		(at 213.36 116.84)
	)
	(no_connect
		(at 210.82 116.84)
	)
	(no_connect
		(at 60.96 163.83)
	)
	(no_connect
		(at 153.67 173.99)
	)
	(no_connect
		(at 215.9 83.82)
	)
	(wire
		(pts
			(xy 201.93 152.4) (xy 180.34 152.4)
		)
	)
	(wire
		(pts
			(xy 128.27 151.13) (xy 128.27 152.4)
		)
	)
	(wire
		(pts
			(xy 83.82 78.74) (xy 86.36 78.74)
		)
	)
	(wire
		(pts
			(xy 210.82 149.86) (xy 218.44 149.86)
		)
	)
	(wire
		(pts
			(xy 193.04 146.05) (xy 193.04 149.86)
		)
	)
	(wire
		(pts
			(xy 208.28 44.45) (xy 212.09 44.45)
		)
	)
	(wire
		(pts
			(xy 59.69 105.41) (xy 59.69 102.87)
		)
	)
	(wire
		(pts
			(xy 245.11 154.94) (xy 247.65 154.94)
		)
	)
	(wire
		(pts
			(xy 82.55 102.87) (xy 85.09 102.87)
		)
	)
	(wire
		(pts
			(xy 128.27 26.67) (xy 132.08 26.67)
		)
	)
	(wire
		(pts
			(xy 87.63 90.17) (xy 90.17 90.17)
		)
	)
	(wire
		(pts
			(xy 55.88 34.29) (xy 60.96 34.29)
		)
	)
	(wire
		(pts
			(xy 176.53 93.98) (xy 176.53 92.71)
		)
	)
	(wire
		(pts
			(xy 219.71 152.4) (xy 219.71 158.75)
		)
	)
	(wire
		(pts
			(xy 251.46 115.57) (xy 259.08 115.57)
		)
	)
	(wire
		(pts
			(xy 232.41 107.95) (xy 243.84 107.95)
		)
	)
	(wire
		(pts
			(xy 209.55 137.16) (xy 209.55 138.43)
		)
	)
	(wire
		(pts
			(xy 247.65 149.86) (xy 247.65 152.4)
		)
	)
	(wire
		(pts
			(xy 29.21 115.57) (xy 29.21 118.11)
		)
	)
	(wire
		(pts
			(xy 241.3 45.72) (xy 243.84 45.72)
		)
	)
	(wire
		(pts
			(xy 161.29 82.55) (xy 153.67 82.55)
		)
	)
	(wire
		(pts
			(xy 208.28 36.83) (xy 214.63 36.83)
		)
	)
	(wire
		(pts
			(xy 212.09 44.45) (xy 212.09 50.8)
		)
	)
	(wire
		(pts
			(xy 29.21 113.03) (xy 29.21 115.57)
		)
	)
	(wire
		(pts
			(xy 220.98 50.8) (xy 212.09 50.8)
		)
	)
	(wire
		(pts
			(xy 264.16 45.72) (xy 266.7 45.72)
		)
	)
	(wire
		(pts
			(xy 152.4 148.59) (xy 152.4 149.86)
		)
	)
	(wire
		(pts
			(xy 143.51 139.7) (xy 143.51 152.4)
		)
	)
	(wire
		(pts
			(xy 218.44 163.83) (xy 227.33 163.83)
		)
	)
	(wire
		(pts
			(xy 83.82 87.63) (xy 90.17 87.63)
		)
	)
	(wire
		(pts
			(xy 99.06 50.8) (xy 100.33 50.8)
		)
	)
	(wire
		(pts
			(xy 238.76 163.83) (xy 238.76 158.75)
		)
	)
	(wire
		(pts
			(xy 83.82 78.74) (xy 83.82 87.63)
		)
	)
	(wire
		(pts
			(xy 109.22 99.06) (xy 111.76 99.06)
		)
	)
	(wire
		(pts
			(xy 100.33 63.5) (xy 115.57 63.5)
		)
	)
	(wire
		(pts
			(xy 228.6 154.94) (xy 228.6 158.75)
		)
	)
	(wire
		(pts
			(xy 115.57 180.34) (xy 115.57 181.61)
		)
	)
	(wire
		(pts
			(xy 220.98 116.84) (xy 220.98 119.38)
		)
	)
	(wire
		(pts
			(xy 259.08 107.95) (xy 266.7 107.95)
		)
	)
	(wire
		(pts
			(xy 193.04 73.66) (xy 196.85 73.66)
		)
	)
	(wire
		(pts
			(xy 134.62 140.97) (xy 134.62 139.7)
		)
	)
	(wire
		(pts
			(xy 276.86 33.02) (xy 276.86 57.15)
		)
	)
	(wire
		(pts
			(xy 218.44 76.2) (xy 209.55 76.2)
		)
	)
	(wire
		(pts
			(xy 123.19 166.37) (xy 128.27 166.37)
		)
	)
	(wire
		(pts
			(xy 201.93 146.05) (xy 201.93 152.4)
		)
	)
	(wire
		(pts
			(xy 254 29.21) (xy 254 35.56)
		)
	)
	(wire
		(pts
			(xy 199.39 95.25) (xy 196.85 95.25)
		)
	)
	(wire
		(pts
			(xy 215.9 116.84) (xy 215.9 119.38)
		)
	)
	(wire
		(pts
			(xy 232.41 92.71) (xy 234.95 92.71)
		)
	)
	(wire
		(pts
			(xy 200.66 147.32) (xy 212.09 147.32)
		)
	)
	(wire
		(pts
			(xy 101.6 156.21) (xy 106.68 156.21)
		)
	)
	(wire
		(pts
			(xy 97.79 82.55) (xy 109.22 82.55)
		)
	)
	(wire
		(pts
			(xy 49.53 115.57) (xy 46.99 115.57)
		)
	)
	(wire
		(pts
			(xy 194.31 80.01) (xy 186.69 80.01)
		)
	)
	(wire
		(pts
			(xy 220.98 33.02) (xy 210.82 33.02)
		)
	)
	(wire
		(pts
			(xy 254 50.8) (xy 254 57.15)
		)
	)
	(wire
		(pts
			(xy 55.88 26.67) (xy 57.15 26.67)
		)
	)
	(wire
		(pts
			(xy 80.01 90.17) (xy 77.47 90.17)
		)
	)
	(wire
		(pts
			(xy 72.39 115.57) (xy 72.39 118.11)
		)
	)
	(wire
		(pts
			(xy 247.65 154.94) (xy 247.65 158.75)
		)
	)
	(wire
		(pts
			(xy 254 57.15) (xy 254 58.42)
		)
	)
	(wire
		(pts
			(xy 201.93 137.16) (xy 193.04 137.16)
		)
	)
	(wire
		(pts
			(xy 132.08 38.1) (xy 130.81 38.1)
		)
	)
	(wire
		(pts
			(xy 107.95 166.37) (xy 111.76 166.37)
		)
	)
	(wire
		(pts
			(xy 57.15 26.67) (xy 57.15 29.21)
		)
	)
	(wire
		(pts
			(xy 46.99 115.57) (xy 29.21 115.57)
		)
	)
	(wire
		(pts
			(xy 123.19 139.7) (xy 134.62 139.7)
		)
	)
	(wire
		(pts
			(xy 220.98 81.28) (xy 220.98 83.82)
		)
	)
	(wire
		(pts
			(xy 115.57 180.34) (xy 123.19 180.34)
		)
	)
	(wire
		(pts
			(xy 100.33 40.64) (xy 100.33 43.18)
		)
	)
	(wire
		(pts
			(xy 109.22 81.28) (xy 109.22 82.55)
		)
	)
	(wire
		(pts
			(xy 21.59 115.57) (xy 29.21 115.57)
		)
	)
	(wire
		(pts
			(xy 223.52 116.84) (xy 223.52 119.38)
		)
	)
	(wire
		(pts
			(xy 218.44 116.84) (xy 218.44 119.38)
		)
	)
	(wire
		(pts
			(xy 233.68 105.41) (xy 233.68 119.38)
		)
	)
	(wire
		(pts
			(xy 204.47 73.66) (xy 209.55 73.66)
		)
	)
	(wire
		(pts
			(xy 266.7 110.49) (xy 266.7 115.57)
		)
	)
	(wire
		(pts
			(xy 232.41 97.79) (xy 234.95 97.79)
		)
	)
	(wire
		(pts
			(xy 57.15 29.21) (xy 57.15 41.91)
		)
	)
	(wire
		(pts
			(xy 223.52 119.38) (xy 233.68 119.38)
		)
	)
	(wire
		(pts
			(xy 163.83 46.99) (xy 167.64 46.99)
		)
	)
	(wire
		(pts
			(xy 140.97 152.4) (xy 143.51 152.4)
		)
	)
	(wire
		(pts
			(xy 238.76 158.75) (xy 247.65 158.75)
		)
	)
	(wire
		(pts
			(xy 46.99 113.03) (xy 46.99 115.57)
		)
	)
	(wire
		(pts
			(xy 130.81 53.34) (xy 130.81 63.5)
		)
	)
	(wire
		(pts
			(xy 179.07 101.6) (xy 179.07 105.41)
		)
	)
	(wire
		(pts
			(xy 97.79 115.57) (xy 72.39 115.57)
		)
	)
	(wire
		(pts
			(xy 123.19 148.59) (xy 123.19 151.13)
		)
	)
	(wire
		(pts
			(xy 120.65 26.67) (xy 99.06 26.67)
		)
	)
	(wire
		(pts
			(xy 58.42 21.59) (xy 58.42 39.37)
		)
	)
	(wire
		(pts
			(xy 109.22 96.52) (xy 109.22 99.06)
		)
	)
	(wire
		(pts
			(xy 176.53 92.71) (xy 179.07 92.71)
		)
	)
	(wire
		(pts
			(xy 209.55 146.05) (xy 209.55 154.94)
		)
	)
	(wire
		(pts
			(xy 241.3 40.64) (xy 243.84 40.64)
		)
	)
	(wire
		(pts
			(xy 143.51 137.16) (xy 143.51 139.7)
		)
	)
	(wire
		(pts
			(xy 40.64 146.05) (xy 40.64 148.59)
		)
	)
	(wire
		(pts
			(xy 97.79 110.49) (xy 97.79 115.57)
		)
	)
	(wire
		(pts
			(xy 72.39 107.95) (xy 72.39 115.57)
		)
	)
	(wire
		(pts
			(xy 72.39 87.63) (xy 72.39 92.71)
		)
	)
	(wire
		(pts
			(xy 83.82 87.63) (xy 77.47 87.63)
		)
	)
	(wire
		(pts
			(xy 255.27 107.95) (xy 259.08 107.95)
		)
	)
	(wire
		(pts
			(xy 109.22 96.52) (xy 124.46 96.52)
		)
	)
	(wire
		(pts
			(xy 232.41 105.41) (xy 233.68 105.41)
		)
	)
	(wire
		(pts
			(xy 106.68 156.21) (xy 106.68 157.48)
		)
	)
	(wire
		(pts
			(xy 233.68 119.38) (xy 233.68 120.65)
		)
	)
	(wire
		(pts
			(xy 209.55 154.94) (xy 228.6 154.94)
		)
	)
	(wire
		(pts
			(xy 152.4 140.97) (xy 152.4 139.7)
		)
	)
	(wire
		(pts
			(xy 220.98 45.72) (xy 220.98 50.8)
		)
	)
	(wire
		(pts
			(xy 273.05 25.4) (xy 265.43 25.4)
		)
	)
	(wire
		(pts
			(xy 160.02 39.37) (xy 167.64 39.37)
		)
	)
	(wire
		(pts
			(xy 173.99 105.41) (xy 179.07 105.41)
		)
	)
	(wire
		(pts
			(xy 196.85 95.25) (xy 196.85 119.38)
		)
	)
	(wire
		(pts
			(xy 107.95 180.34) (xy 107.95 177.8)
		)
	)
	(wire
		(pts
			(xy 209.55 73.66) (xy 212.09 73.66)
		)
	)
	(wire
		(pts
			(xy 143.51 139.7) (xy 152.4 139.7)
		)
	)
	(wire
		(pts
			(xy 123.19 151.13) (xy 128.27 151.13)
		)
	)
	(wire
		(pts
			(xy 219.71 73.66) (xy 223.52 73.66)
		)
	)
	(wire
		(pts
			(xy 232.41 100.33) (xy 234.95 100.33)
		)
	)
	(wire
		(pts
			(xy 46.99 102.87) (xy 46.99 105.41)
		)
	)
	(wire
		(pts
			(xy 139.7 96.52) (xy 142.24 96.52)
		)
	)
	(wire
		(pts
			(xy 142.24 96.52) (xy 142.24 93.98)
		)
	)
	(wire
		(pts
			(xy 200.66 147.32) (xy 200.66 158.75)
		)
	)
	(wire
		(pts
			(xy 276.86 57.15) (xy 254 57.15)
		)
	)
	(wire
		(pts
			(xy 209.55 137.16) (xy 201.93 137.16)
		)
	)
	(wire
		(pts
			(xy 123.19 140.97) (xy 123.19 139.7)
		)
	)
	(wire
		(pts
			(xy 265.43 29.21) (xy 254 29.21)
		)
	)
	(wire
		(pts
			(xy 210.82 81.28) (xy 210.82 83.82)
		)
	)
	(wire
		(pts
			(xy 213.36 81.28) (xy 213.36 83.82)
		)
	)
	(wire
		(pts
			(xy 101.6 166.37) (xy 107.95 166.37)
		)
	)
	(wire
		(pts
			(xy 119.38 166.37) (xy 123.19 166.37)
		)
	)
	(wire
		(pts
			(xy 97.79 97.79) (xy 97.79 100.33)
		)
	)
	(wire
		(pts
			(xy 184.15 146.05) (xy 184.15 147.32)
		)
	)
	(wire
		(pts
			(xy 228.6 154.94) (xy 234.95 154.94)
		)
	)
	(wire
		(pts
			(xy 210.82 49.53) (xy 208.28 49.53)
		)
	)
	(wire
		(pts
			(xy 100.33 50.8) (xy 100.33 63.5)
		)
	)
	(wire
		(pts
			(xy 72.39 86.36) (xy 72.39 87.63)
		)
	)
	(wire
		(pts
			(xy 31.75 135.89) (xy 40.64 135.89)
		)
	)
	(wire
		(pts
			(xy 123.19 180.34) (xy 123.19 177.8)
		)
	)
	(wire
		(pts
			(xy 97.79 97.79) (xy 97.79 92.71)
		)
	)
	(wire
		(pts
			(xy 227.33 73.66) (xy 227.33 76.2)
		)
	)
	(wire
		(pts
			(xy 55.88 31.75) (xy 60.96 31.75)
		)
	)
	(wire
		(pts
			(xy 130.81 63.5) (xy 115.57 63.5)
		)
	)
	(wire
		(pts
			(xy 184.15 135.89) (xy 184.15 137.16)
		)
	)
	(wire
		(pts
			(xy 232.41 95.25) (xy 234.95 95.25)
		)
	)
	(wire
		(pts
			(xy 93.98 78.74) (xy 97.79 78.74)
		)
	)
	(wire
		(pts
			(xy 247.65 147.32) (xy 247.65 149.86)
		)
	)
	(wire
		(pts
			(xy 208.28 116.84) (xy 208.28 119.38)
		)
	)
	(wire
		(pts
			(xy 220.98 38.1) (xy 220.98 33.02)
		)
	)
	(wire
		(pts
			(xy 210.82 149.86) (xy 210.82 158.75)
		)
	)
	(wire
		(pts
			(xy 251.46 115.57) (xy 251.46 118.11)
		)
	)
	(wire
		(pts
			(xy 237.49 152.4) (xy 247.65 152.4)
		)
	)
	(wire
		(pts
			(xy 128.27 151.13) (xy 134.62 151.13)
		)
	)
	(wire
		(pts
			(xy 179.07 93.98) (xy 179.07 92.71)
		)
	)
	(wire
		(pts
			(xy 184.15 137.16) (xy 184.15 138.43)
		)
	)
	(wire
		(pts
			(xy 264.16 43.18) (xy 266.7 43.18)
		)
	)
	(wire
		(pts
			(xy 210.82 29.21) (xy 210.82 33.02)
		)
	)
	(wire
		(pts
			(xy 143.51 152.4) (xy 143.51 153.67)
		)
	)
	(wire
		(pts
			(xy 243.84 107.95) (xy 247.65 107.95)
		)
	)
	(wire
		(pts
			(xy 176.53 102.87) (xy 199.39 102.87)
		)
	)
	(wire
		(pts
			(xy 55.88 29.21) (xy 57.15 29.21)
		)
	)
	(wire
		(pts
			(xy 55.88 36.83) (xy 60.96 36.83)
		)
	)
	(wire
		(pts
			(xy 228.6 149.86) (xy 247.65 149.86)
		)
	)
	(wire
		(pts
			(xy 209.55 154.94) (xy 180.34 154.94)
		)
	)
	(wire
		(pts
			(xy 134.62 148.59) (xy 134.62 151.13)
		)
	)
	(wire
		(pts
			(xy 90.17 90.17) (xy 90.17 92.71)
		)
	)
	(wire
		(pts
			(xy 49.53 100.33) (xy 49.53 105.41)
		)
	)
	(wire
		(pts
			(xy 153.67 163.83) (xy 156.21 163.83)
		)
	)
	(wire
		(pts
			(xy 44.45 102.87) (xy 46.99 102.87)
		)
	)
	(wire
		(pts
			(xy 170.18 176.53) (xy 170.18 139.7)
		)
	)
	(wire
		(pts
			(xy 55.88 41.91) (xy 57.15 41.91)
		)
	)
	(wire
		(pts
			(xy 184.15 147.32) (xy 200.66 147.32)
		)
	)
	(wire
		(pts
			(xy 227.33 158.75) (xy 227.33 163.83)
		)
	)
	(wire
		(pts
			(xy 161.29 140.97) (xy 161.29 139.7)
		)
	)
	(wire
		(pts
			(xy 30.48 153.67) (xy 33.02 153.67)
		)
	)
	(wire
		(pts
			(xy 58.42 41.91) (xy 58.42 49.53)
		)
	)
	(wire
		(pts
			(xy 97.79 97.79) (xy 82.55 97.79)
		)
	)
	(wire
		(pts
			(xy 20.32 153.67) (xy 22.86 153.67)
		)
	)
	(wire
		(pts
			(xy 140.97 186.69) (xy 140.97 184.15)
		)
	)
	(wire
		(pts
			(xy 59.69 115.57) (xy 59.69 113.03)
		)
	)
	(wire
		(pts
			(xy 130.81 43.18) (xy 137.16 43.18)
		)
	)
	(wire
		(pts
			(xy 153.67 166.37) (xy 156.21 166.37)
		)
	)
	(wire
		(pts
			(xy 132.08 26.67) (xy 132.08 38.1)
		)
	)
	(wire
		(pts
			(xy 152.4 149.86) (xy 157.48 149.86)
		)
	)
	(wire
		(pts
			(xy 193.04 149.86) (xy 210.82 149.86)
		)
	)
	(wire
		(pts
			(xy 157.48 149.86) (xy 157.48 151.13)
		)
	)
	(wire
		(pts
			(xy 99.06 26.67) (xy 99.06 50.8)
		)
	)
	(wire
		(pts
			(xy 176.53 92.71) (xy 176.53 90.17)
		)
	)
	(wire
		(pts
			(xy 44.45 100.33) (xy 49.53 100.33)
		)
	)
	(wire
		(pts
			(xy 222.25 147.32) (xy 247.65 147.32)
		)
	)
	(wire
		(pts
			(xy 107.95 166.37) (xy 107.95 170.18)
		)
	)
	(wire
		(pts
			(xy 58.42 39.37) (xy 55.88 39.37)
		)
	)
	(wire
		(pts
			(xy 236.22 158.75) (xy 238.76 158.75)
		)
	)
	(wire
		(pts
			(xy 153.67 171.45) (xy 156.21 171.45)
		)
	)
	(wire
		(pts
			(xy 44.45 87.63) (xy 72.39 87.63)
		)
	)
	(wire
		(pts
			(xy 218.44 158.75) (xy 218.44 163.83)
		)
	)
	(wire
		(pts
			(xy 59.69 102.87) (xy 62.23 102.87)
		)
	)
	(wire
		(pts
			(xy 40.64 158.75) (xy 40.64 161.29)
		)
	)
	(wire
		(pts
			(xy 210.82 33.02) (xy 210.82 49.53)
		)
	)
	(wire
		(pts
			(xy 132.08 106.68) (xy 132.08 114.3)
		)
	)
	(wire
		(pts
			(xy 266.7 115.57) (xy 259.08 115.57)
		)
	)
	(wire
		(pts
			(xy 121.92 99.06) (xy 124.46 99.06)
		)
	)
	(wire
		(pts
			(xy 21.59 113.03) (xy 21.59 115.57)
		)
	)
	(wire
		(pts
			(xy 57.15 41.91) (xy 58.42 41.91)
		)
	)
	(wire
		(pts
			(xy 194.31 97.79) (xy 199.39 97.79)
		)
	)
	(wire
		(pts
			(xy 72.39 87.63) (xy 77.47 87.63)
		)
	)
	(wire
		(pts
			(xy 179.07 105.41) (xy 199.39 105.41)
		)
	)
	(wire
		(pts
			(xy 219.71 152.4) (xy 227.33 152.4)
		)
	)
	(wire
		(pts
			(xy 223.52 73.66) (xy 223.52 83.82)
		)
	)
	(wire
		(pts
			(xy 209.55 76.2) (xy 209.55 73.66)
		)
	)
	(wire
		(pts
			(xy 97.79 78.74) (xy 97.79 82.55)
		)
	)
	(wire
		(pts
			(xy 179.07 92.71) (xy 194.31 92.71)
		)
	)
	(wire
		(pts
			(xy 194.31 92.71) (xy 199.39 92.71)
		)
	)
	(wire
		(pts
			(xy 100.33 48.26) (xy 100.33 50.8)
		)
	)
	(wire
		(pts
			(xy 201.93 137.16) (xy 201.93 138.43)
		)
	)
	(wire
		(pts
			(xy 186.69 80.01) (xy 186.69 81.28)
		)
	)
	(wire
		(pts
			(xy 265.43 25.4) (xy 265.43 29.21)
		)
	)
	(wire
		(pts
			(xy 160.02 77.47) (xy 153.67 77.47)
		)
	)
	(wire
		(pts
			(xy 153.67 176.53) (xy 170.18 176.53)
		)
	)
	(wire
		(pts
			(xy 184.15 147.32) (xy 180.34 147.32)
		)
	)
	(wire
		(pts
			(xy 227.33 163.83) (xy 238.76 163.83)
		)
	)
	(wire
		(pts
			(xy 193.04 137.16) (xy 193.04 138.43)
		)
	)
	(wire
		(pts
			(xy 273.05 33.02) (xy 276.86 33.02)
		)
	)
	(wire
		(pts
			(xy 254 26.67) (xy 254 29.21)
		)
	)
	(wire
		(pts
			(xy 59.69 115.57) (xy 72.39 115.57)
		)
	)
	(wire
		(pts
			(xy 77.47 90.17) (xy 77.47 87.63)
		)
	)
	(wire
		(pts
			(xy 223.52 73.66) (xy 227.33 73.66)
		)
	)
	(wire
		(pts
			(xy 212.09 50.8) (xy 212.09 60.96)
		)
	)
	(wire
		(pts
			(xy 194.31 107.95) (xy 199.39 107.95)
		)
	)
	(wire
		(pts
			(xy 208.28 163.83) (xy 218.44 163.83)
		)
	)
	(wire
		(pts
			(xy 194.31 100.33) (xy 199.39 100.33)
		)
	)
	(wire
		(pts
			(xy 161.29 149.86) (xy 157.48 149.86)
		)
	)
	(wire
		(pts
			(xy 101.6 163.83) (xy 101.6 156.21)
		)
	)
	(wire
		(pts
			(xy 161.29 148.59) (xy 161.29 149.86)
		)
	)
	(wire
		(pts
			(xy 170.18 139.7) (xy 161.29 139.7)
		)
	)
	(wire
		(pts
			(xy 243.84 115.57) (xy 251.46 115.57)
		)
	)
	(wire
		(pts
			(xy 247.65 152.4) (xy 247.65 154.94)
		)
	)
	(wire
		(pts
			(xy 132.08 21.59) (xy 132.08 26.67)
		)
	)
	(wire
		(pts
			(xy 194.31 82.55) (xy 194.31 80.01)
		)
	)
	(wire
		(pts
			(xy 49.53 113.03) (xy 49.53 115.57)
		)
	)
	(wire
		(pts
			(xy 247.65 158.75) (xy 247.65 160.02)
		)
	)
	(wire
		(pts
			(xy 130.81 45.72) (xy 137.16 45.72)
		)
	)
	(wire
		(pts
			(xy 123.19 170.18) (xy 123.19 166.37)
		)
	)
	(wire
		(pts
			(xy 218.44 83.82) (xy 218.44 76.2)
		)
	)
	(wire
		(pts
			(xy 152.4 139.7) (xy 161.29 139.7)
		)
	)
	(wire
		(pts
			(xy 201.93 152.4) (xy 219.71 152.4)
		)
	)
	(wire
		(pts
			(xy 109.22 82.55) (xy 109.22 96.52)
		)
	)
	(wire
		(pts
			(xy 241.3 43.18) (xy 243.84 43.18)
		)
	)
	(wire
		(pts
			(xy 232.41 102.87) (xy 234.95 102.87)
		)
	)
	(wire
		(pts
			(xy 184.15 137.16) (xy 193.04 137.16)
		)
	)
	(wire
		(pts
			(xy 194.31 90.17) (xy 194.31 92.71)
		)
	)
	(wire
		(pts
			(xy 140.97 153.67) (xy 140.97 152.4)
		)
	)
	(wire
		(pts
			(xy 107.95 180.34) (xy 115.57 180.34)
		)
	)
	(wire
		(pts
			(xy 134.62 139.7) (xy 143.51 139.7)
		)
	)
	(wire
		(pts
			(xy 173.99 102.87) (xy 176.53 102.87)
		)
	)
	(wire
		(pts
			(xy 176.53 101.6) (xy 176.53 102.87)
		)
	)
	(wire
		(pts
			(xy 193.04 149.86) (xy 180.34 149.86)
		)
	)
	(wire
		(pts
			(xy 208.28 158.75) (xy 208.28 163.83)
		)
	)
	(label "SCL"
		(at 214.63 36.83 0)
	)
	(label "MAGINT"
		(at 208.28 119.38 270)
	)
	(label "SWCLK"
		(at 194.31 100.33 180)
	)
	(label "GPSCTRL"
		(at 156.21 171.45 0)
	)
	(label "RST"
		(at 180.34 154.94 180)
	)
	(label "SPKR"
		(at 20.32 153.67 180)
	)
	(label "MAGINT"
		(at 100.33 40.64 180)
	)
	(label "PB3"
		(at 210.82 81.28 90)
	)
	(label "LPTX"
		(at 156.21 166.37 0)
	)
	(label "NFCINT"
		(at 241.3 45.72 180)
	)
	(label "LPRX"
		(at 220.98 119.38 270)
	)
	(label "GPSCTRL"
		(at 194.31 107.95 180)
	)
	(label "SWCLK"
		(at 153.67 82.55 180)
	)
	(label "LEDRST"
		(at 60.96 31.75 0)
	)
	(label "PB1"
		(at 220.98 81.28 90)
	)
	(label "RST"
		(at 234.95 102.87 0)
	)
	(label "LEDRST"
		(at 234.95 92.71 0)
	)
	(label "SDA"
		(at 173.99 105.41 180)
	)
	(label "SDA"
		(at 137.16 45.72 0)
	)
	(label "SDA"
		(at 160.02 39.37 180)
	)
	(label "SCL"
		(at 60.96 36.83 0)
	)
	(label "SWDIO"
		(at 194.31 97.79 180)
	)
	(label "LPRX"
		(at 156.21 163.83 0)
	)
	(label "CHRGSTAT"
		(at 234.95 95.25 0)
	)
	(label "ACCELINT"
		(at 215.9 119.38 270)
	)
	(label "SWDIO"
		(at 153.67 77.47 180)
	)
	(label "SCL"
		(at 173.99 102.87 180)
	)
	(label "NFCINT"
		(at 234.95 100.33 0)
	)
	(label "SDA"
		(at 241.3 40.64 180)
	)
	(label "PB2"
		(at 213.36 81.28 90)
	)
	(label "PB2"
		(at 180.34 149.86 180)
	)
	(label "CHRGSTAT"
		(at 85.09 102.87 0)
	)
	(label "LPTX"
		(at 218.44 119.38 270)
	)
	(label "SDA"
		(at 60.96 34.29 0)
	)
	(label "PB1"
		(at 180.34 147.32 180)
	)
	(label "SCL"
		(at 241.3 43.18 180)
	)
	(label "SCL"
		(at 137.16 43.18 0)
	)
	(label "PB3"
		(at 180.34 152.4 180)
	)
	(label "SPKR"
		(at 234.95 97.79 0)
	)
	(label "ACCELINT"
		(at 163.83 46.99 180)
	)
	(symbol
		(lib_id "SeniorDesign:HS96L01B4S03")
		(at 49.53 34.29 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U1"
			(at 36.195 19.05 0)
		)
		(property "Value" "HS96L01B4S03"
			(at 36.195 21.59 0)
		)
		(property "Footprint" "SeniorDesign:HS96L01B4S03"
			(at 49.53 34.29 0)
		)
		(property "Datasheet" ""
			(at 49.53 34.29 0)
		)
		(property "Description" ""
			(at 49.53 34.29 0)
		)
		(pin "4")
		(pin "3")
		(pin "5")
		(pin "1")
		(pin "2")
		(pin "6")
		(pin "7")
		(instances
			(project ""
				(path
					(reference "U1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Regulator_Linear:AP2112K-3.3")
		(at 132.08 99.06 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U5"
			(at 132.08 90.17 0)
		)
		(property "Value" "AP2112K-3.3"
			(at 132.08 92.71 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
			(at 132.08 90.805 0)
		)
		(property "Datasheet" "https://www.diodes.com/assets/Datasheets/AP2112.pdf"
			(at 132.08 96.52 0)
		)
		(property "Description" "600mA low dropout linear regulator, with enable pin, 3.8V-6V input voltage range, 3.3V fixed positive output, SOT-23-5"
			(at 132.08 99.06 0)
		)
		(pin "4")
		(pin "5")
		(pin "3")
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "U5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 212.09 60.96 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05"
			(at 212.09 67.31 0)
		)
		(property "Value" "GND"
			(at 212.09 66.04 0)
		)
		(property "Footprint" ""
			(at 212.09 60.96 0)
		)
		(property "Datasheet" ""
			(at 212.09 60.96 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 212.09 60.96 0)
		)
		(pin "1")
		(instances
			(project "SeniorDesign"
				(path
					(reference "#PWR05")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 214.63 158.75 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C15"
			(at 216.916 159.766 0)
		)
		(property "Value" "100nF"
			(at 212.344 159.258 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric"
			(at 210.82 159.7152 0)
		)
		(property "Datasheet" "~"
			(at 214.63 158.75 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 214.63 158.75 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesign"
				(path
					(reference "C15")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "SeniorDesign:CMI-1295IC-0385T")
		(at 43.18 140.97 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "LS1"
			(at 46.99 139.6999 0)
		)
		(property "Value" "CMI-1295IC-0385T"
			(at 46.99 142.2399 0)
		)
		(property "Footprint" "SeniorDesign:CMI_1295IC"
			(at 43.18 140.97 0)
		)
		(property "Datasheet" ""
			(at 43.18 140.97 0)
		)
		(property "Description" ""
			(at 43.18 140.97 0)
		)
		(property "PARTREV" "1.0"
			(at 43.18 140.97 0)
		)
		(property "STANDARD" "Manufacturer Recommendations"
			(at 43.18 140.97 0)
		)
		(property "MAXIMUM_PACKAGE_HEIGHT" "9.7mm"
			(at 43.18 140.97 0)
		)
		(property "MANUFACTURER" "CUI Inc."
			(at 43.18 140.97 0)
		)
		(pin "N")
		(pin "P")
		(instances
			(project ""
				(path
					(reference "LS1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "SeniorDesignSymbolLibrary:E5Mini")
		(at 218.44 101.6 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U7"
			(at 215.9 99.314 0)
		)
		(property "Value" "Wio E5"
			(at 215.9 101.854 0)
		)
		(property "Footprint" "SeniorDesign:Wio-E5"
			(at 218.44 101.6 0)
		)
		(property "Datasheet" ""
			(at 218.44 101.6 0)
		)
		(property "Description" ""
			(at 218.44 101.6 0)
		)
		(pin "16")
		(pin "17")
		(pin "18")
		(pin "19")
		(pin "20")
		(pin "21")
		(pin "14")
		(pin "22")
		(pin "13")
		(pin "23")
		(pin "12")
		(pin "24")
		(pin "11")
		(pin "25")
		(pin "10")
		(pin "26")
		(pin "9")
		(pin "27")
		(pin "8")
		(pin "28")
		(pin "7")
		(pin "6")
		(pin "5")
		(pin "4")
		(pin "15")
		(pin "2")
		(pin "3")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "U7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 186.69 81.28 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR09"
			(at 186.69 87.63 0)
		)
		(property "Value" "GND"
			(at 186.69 85.344 0)
		)
		(property "Footprint" ""
			(at 186.69 81.28 0)
		)
		(property "Datasheet" ""
			(at 186.69 81.28 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 186.69 81.28 0)
		)
		(pin "1")
		(instances
			(project "SeniorDesign"
				(path
					(reference "#PWR09")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VCC")
		(at 142.24 93.98 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR012"
			(at 142.24 97.79 0)
		)
		(property "Value" "VCC"
			(at 142.24 88.9 0)
		)
		(property "Footprint" ""
			(at 142.24 93.98 0)
		)
		(property "Datasheet" ""
			(at 142.24 93.98 0)
		)
		(property "Description" "Power symbol creates a global label with name \"VCC\""
			(at 142.24 93.98 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR012")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 201.93 142.24 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R11"
			(at 204.47 140.9699 0)
		)
		(property "Value" "10k"
			(at 204.47 143.5099 0)
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric"
			(at 202.946 142.494 90)
		)
		(property "Datasheet" "~"
			(at 201.93 142.24 0)
		)
		(property "Description" "Resistor, US symbol"
			(at 201.93 142.24 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesign"
				(path
					(reference "R11")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 184.15 142.24 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R9"
			(at 186.69 140.9699 0)
		)
		(property "Value" "10k"
			(at 186.69 143.5099 0)
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric"
			(at 185.166 142.494 90)
		)
		(property "Datasheet" "~"
			(at 184.15 142.24 0)
		)
		(property "Description" "Resistor, US symbol"
			(at 184.15 142.24 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "R9")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 132.08 114.3 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR013"
			(at 132.08 120.65 0)
		)
		(property "Value" "GND"
			(at 132.08 119.38 0)
		)
		(property "Footprint" ""
			(at 132.08 114.3 0)
		)
		(property "Datasheet" ""
			(at 132.08 114.3 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 132.08 114.3 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR013")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 196.85 119.38 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR017"
			(at 196.85 125.73 0)
		)
		(property "Value" "GND"
			(at 199.898 119.888 0)
		)
		(property "Footprint" ""
			(at 196.85 119.38 0)
		)
		(property "Datasheet" ""
			(at 196.85 119.38 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 196.85 119.38 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR017")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 59.69 109.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R8"
			(at 61.214 107.95 0)
		)
		(property "Value" "2k"
			(at 61.214 110.49 0)
		)
		(property "Footprint" "Resistor_SMD:R_0201_0603Metric"
			(at 60.706 109.474 90)
		)
		(property "Datasheet" "~"
			(at 59.69 109.22 0)
		)
		(property "Description" "Resistor, US symbol"
			(at 59.69 109.22 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "R8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_US")
		(at 134.62 144.78 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 141.224 146.304 0)
		)
		(property "Value" "10uF"
			(at 141.478 144.018 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric"
			(at 134.62 144.78 0)
		)
		(property "Datasheet" ""
			(at 134.62 144.78 0)
		)
		(property "Description" "capacitor, US symbol"
			(at 134.62 144.78 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesign"
				(path
					(reference "C8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 29.21 118.11 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR014"
			(at 29.21 124.46 0)
		)
		(property "Value" "GND"
			(at 29.21 123.19 0)
		)
		(property "Footprint" ""
			(at 29.21 118.11 0)
		)
		(property "Datasheet" ""
			(at 29.21 118.11 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 29.21 118.11 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR014")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 26.67 153.67 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R13"
			(at 26.67 149.098 90)
		)
		(property "Value" "1k"
			(at 26.67 151.13 90)
		)
		(property "Footprint" "Resistor_SMD:R_0201_0603Metric"
			(at 26.924 152.654 90)
		)
		(property "Datasheet" "~"
			(at 26.67 153.67 0)
		)
		(property "Description" "Resistor, US symbol"
			(at 26.67 153.67 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "R13")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 204.47 73.66 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP2"
			(at 206.248 69.596 0)
		)
		(property "Value" "BOOT"
			(at 206.248 72.136 0)
		)
		(property "Footprint" "TestPoint:TestPoint_Plated_Hole_D2.0mm"
			(at 209.55 73.66 0)
		)
		(property "Datasheet" "~"
			(at 209.55 73.66 0)
		)
		(property "Description" "test point"
			(at 204.47 73.66 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "TP2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 233.68 120.65 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR018"
			(at 233.68 127 0)
		)
		(property "Value" "GND"
			(at 233.68 124.714 0)
		)
		(property "Footprint" ""
			(at 233.68 120.65 0)
		)
		(property "Datasheet" ""
			(at 233.68 120.65 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 233.68 120.65 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR018")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Mechanical:MountingHole")
		(at 267.97 146.05 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "H1"
			(at 270.51 144.7799 0)
		)
		(property "Value" "MountingHole"
			(at 270.51 147.3199 0)
		)
		(property "Footprint" "MountingHole:MountingHole_2.2mm_M2"
			(at 267.97 146.05 0)
		)
		(property "Datasheet" "~"
			(at 267.97 146.05 0)
		)
		(property "Description" "Mounting Hole without connection"
			(at 267.97 146.05 0)
		)
		(instances
			(project ""
				(path
					(reference "H1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Mechanical:MountingHole")
		(at 267.97 161.29 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "H4"
			(at 270.51 160.0199 0)
		)
		(property "Value" "MountingHole"
			(at 270.51 162.5599 0)
		)
		(property "Footprint" "MountingHole:MountingHole_2.2mm_M2"
			(at 267.97 161.29 0)
		)
		(property "Datasheet" "~"
			(at 267.97 161.29 0)
		)
		(property "Description" "Mounting Hole without connection"
			(at 267.97 161.29 0)
		)
		(instances
			(project "SeniorDesign"
				(path
					(reference "H4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 227.33 76.2 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR08"
			(at 227.33 82.55 0)
		)
		(property "Value" "GND"
			(at 227.33 80.264 0)
		)
		(property "Footprint" ""
			(at 227.33 76.2 0)
		)
		(property "Datasheet" ""
			(at 227.33 76.2 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 227.33 76.2 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR08")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 115.57 166.37 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R14"
			(at 115.57 160.02 90)
		)
		(property "Value" "0"
			(at 115.57 162.56 90)
		)
		(property "Footprint" "Resistor_SMD:R_0201_0603Metric"
			(at 115.57 168.148 90)
		)
		(property "Datasheet" "~"
			(at 115.57 166.37 0)
		)
		(property "Description" "Resistor"
			(at 115.57 166.37 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesign"
				(path
					(reference "R14")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Transistor_FET:BSS84")
		(at 95.25 87.63 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "Q1"
			(at 101.6 86.3599 0)
		)
		(property "Value" "BSS84"
			(at 101.6 88.8999 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23"
			(at 100.33 89.535 0)
		)
		(property "Datasheet" "http://assets.nexperia.com/documents/data-sheet/BSS84.pdf"
			(at 100.33 91.44 0)
		)
		(property "Description" "-0.13A Id, -50V Vds, P-Channel MOSFET, SOT-23"
			(at 95.25 87.63 0)
		)
		(pin "3")
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "Q1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 243.84 111.76 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5"
			(at 246.634 110.49 0)
		)
		(property "Value" "DNP"
			(at 246.634 113.03 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric"
			(at 244.8052 115.57 0)
		)
		(property "Datasheet" "~"
			(at 243.84 111.76 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 243.84 111.76 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "C5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "RF_GPS:L70-R")
		(at 140.97 168.91 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U8"
			(at 143.1133 184.15 0)
		)
		(property "Value" "L70-R"
			(at 143.1133 186.69 0)
		)
		(property "Footprint" "RF_GPS:Quectel_L70-R"
			(at 140.97 195.58 0)
		)
		(property "Datasheet" "https://www.quectel.com/product/gps-only-l70-r"
			(at 140.97 199.39 0)
		)
		(property "Description" "Quectel GPS Module"
			(at 140.97 168.91 0)
		)
		(pin "15")
		(pin "18")
		(pin "14")
		(pin "16")
		(pin "17")
		(pin "6")
		(pin "13")
		(pin "8")
		(pin "5")
		(pin "12")
		(pin "3")
		(pin "1")
		(pin "4")
		(pin "2")
		(pin "9")
		(pin "7")
		(pin "10")
		(pin "11")
		(instances
			(project "SeniorDesign"
				(path
					(reference "U8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 128.27 152.4 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR023"
			(at 128.27 158.75 0)
		)
		(property "Value" "GND"
			(at 128.27 157.48 0)
		)
		(property "Footprint" ""
			(at 128.27 152.4 0)
		)
		(property "Datasheet" ""
			(at 128.27 152.4 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 128.27 152.4 0)
		)
		(pin "1")
		(instances
			(project "SeniorDesign"
				(path
					(reference "#PWR023")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 58.42 49.53 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR029"
			(at 58.42 55.88 0)
		)
		(property "Value" "GND"
			(at 58.42 54.61 0)
		)
		(property "Footprint" ""
			(at 58.42 49.53 0)
		)
		(property "Datasheet" ""
			(at 58.42 49.53 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 58.42 49.53 0)
		)
		(pin "1")
		(instances
			(project "SeniorDesign"
				(path
					(reference "#PWR029")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 223.52 158.75 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C14"
			(at 225.806 159.766 0)
		)
		(property "Value" "100nF"
			(at 221.234 159.258 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric"
			(at 219.71 159.7152 0)
		)
		(property "Datasheet" "~"
			(at 223.52 158.75 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 223.52 158.75 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesign"
				(path
					(reference "C14")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 251.46 118.11 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR016"
			(at 251.46 124.46 0)
		)
		(property "Value" "GND"
			(at 251.46 123.19 0)
		)
		(property "Footprint" ""
			(at 251.46 118.11 0)
		)
		(property "Datasheet" ""
			(at 251.46 118.11 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 251.46 118.11 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR016")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Mechanical:MountingHole")
		(at 267.97 151.13 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "H2"
			(at 270.51 149.8599 0)
		)
		(property "Value" "MountingHole"
			(at 270.51 152.3999 0)
		)
		(property "Footprint" "MountingHole:MountingHole_2.2mm_M2"
			(at 267.97 151.13 0)
		)
		(property "Datasheet" "~"
			(at 267.97 151.13 0)
		)
		(property "Description" "Mounting Hole without connection"
			(at 267.97 151.13 0)
		)
		(instances
			(project "SeniorDesign"
				(path
					(reference "H2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Switch:SW_Push")
		(at 223.52 149.86 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "SW3"
			(at 223.52 145.542 0)
		)
		(property "Value" "SW_Push"
			(at 223.52 144.78 0)
		)
		(property "Footprint" "Button_Switch_THT:SW_PUSH_6mm_H7.3mm"
			(at 223.52 144.78 0)
		)
		(property "Datasheet" "~"
			(at 223.52 144.78 0)
		)
		(property "Description" "Push button switch, generic, two pins"
			(at 223.52 149.86 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesign"
				(path
					(reference "SW3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:USB_C_Receptacle_PowerOnly_6P")
		(at 29.21 95.25 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "J1"
			(at 29.21 77.47 0)
		)
		(property "Value" "USB_C_Receptacle_PowerOnly_6P"
			(at 29.21 80.01 0)
		)
		(property "Footprint" "SeniorDesign:USB4125_GF"
			(at 33.02 92.71 0)
		)
		(property "Datasheet" "https://www.usb.org/sites/default/files/documents/usb_type-c.zip"
			(at 29.21 95.25 0)
		)
		(property "Description" "USB Power-Only 6P Type-C Receptacle connector"
			(at 29.21 95.25 0)
		)
		(pin "S1")
		(pin "A12")
		(pin "A9")
		(pin "B12")
		(pin "B9")
		(pin "B5")
		(pin "A5")
		(instances
			(project ""
				(path
					(reference "J1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VCC")
		(at 210.82 29.21 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR03"
			(at 210.82 33.02 0)
		)
		(property "Value" "VCC"
			(at 210.82 24.13 0)
		)
		(property "Footprint" ""
			(at 210.82 29.21 0)
		)
		(property "Datasheet" ""
			(at 210.82 29.21 0)
		)
		(property "Description" "Power symbol creates a global label with name \"VCC\""
			(at 210.82 29.21 0)
		)
		(pin "1")
		(instances
			(project "SeniorDesign"
				(path
					(reference "#PWR03")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "RF_NFC:ST25DV64K-IER8C3")
		(at 254 43.18 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U3"
			(at 256.1433 33.02 0)
		)
		(property "Value" "ST25DV64K-IER8C3"
			(at 256.1433 35.56 0)
		)
		(property "Footprint" "Package_DFN_QFN:DFN-8-1EP_3x2mm_P0.5mm_EP1.36x1.46mm"
			(at 254 43.18 0)
		)
		(property "Datasheet" "https://www.st.com/resource/en/datasheet/st25dv04k.pdf"
			(at 254 43.18 0)
		)
		(property "Description" "Dynamic NFC/RFID tag IC with 64-Kbit EEPROM, UFDFPN-8"
			(at 254 43.18 0)
		)
		(pin "8")
		(pin "4")
		(pin "3")
		(pin "6")
		(pin "5")
		(pin "9")
		(pin "2")
		(pin "1")
		(pin "7")
		(instances
			(project ""
				(path
					(reference "U3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 72.39 86.36 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#FLG02"
			(at 72.39 84.455 0)
		)
		(property "Value" "PWR_FLAG"
			(at 72.39 81.28 0)
		)
		(property "Footprint" ""
			(at 72.39 86.36 0)
		)
		(property "Datasheet" "~"
			(at 72.39 86.36 0)
		)
		(property "Description" "Special symbol for telling ERC where power comes from"
			(at 72.39 86.36 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#FLG02")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Switch:SW_Push")
		(at 240.03 154.94 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "SW5"
			(at 240.03 150.622 0)
		)
		(property "Value" "SW_Push"
			(at 240.03 149.86 0)
		)
		(property "Footprint" "Button_Switch_THT:SW_PUSH_6mm_H7.3mm"
			(at 240.03 149.86 0)
		)
		(property "Datasheet" "~"
			(at 240.03 149.86 0)
		)
		(property "Description" "Push button switch, generic, two pins"
			(at 240.03 154.94 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesign"
				(path
					(reference "SW5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 161.29 82.55 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP4"
			(at 166.116 83.058 90)
		)
		(property "Value" "SWDCLK"
			(at 161.29 80.518 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Plated_Hole_D2.0mm"
			(at 161.29 87.63 0)
		)
		(property "Datasheet" "~"
			(at 161.29 87.63 0)
		)
		(property "Description" "test point"
			(at 161.29 82.55 0)
		)
		(pin "1")
		(instances
			(project "SeniorDesign"
				(path
					(reference "TP4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 259.08 111.76 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6"
			(at 253.746 110.49 0)
		)
		(property "Value" "DNP"
			(at 254.762 113.03 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric"
			(at 260.0452 115.57 0)
		)
		(property "Datasheet" "~"
			(at 259.08 111.76 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 259.08 111.76 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "C6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 140.97 186.69 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR028"
			(at 140.97 193.04 0)
		)
		(property "Value" "GND"
			(at 140.97 191.77 0)
		)
		(property "Footprint" ""
			(at 140.97 186.69 0)
		)
		(property "Datasheet" ""
			(at 140.97 186.69 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 140.97 186.69 0)
		)
		(pin "1")
		(instances
			(project "SeniorDesign"
				(path
					(reference "#PWR028")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Switch:SW_Push")
		(at 232.41 152.4 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "SW4"
			(at 232.41 148.082 0)
		)
		(property "Value" "SW_Push"
			(at 232.41 147.32 0)
		)
		(property "Footprint" "Button_Switch_THT:SW_PUSH_6mm_H7.3mm"
			(at 232.41 147.32 0)
		)
		(property "Datasheet" "~"
			(at 232.41 147.32 0)
		)
		(property "Description" "Push button switch, generic, two pins"
			(at 232.41 152.4 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesign"
				(path
					(reference "SW4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 49.53 109.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R7"
			(at 51.308 108.458 0)
		)
		(property "Value" "5.1k"
			(at 51.308 110.49 0)
		)
		(property "Footprint" "Resistor_SMD:R_0201_0603Metric"
			(at 50.546 109.474 90)
		)
		(property "Datasheet" "~"
			(at 49.53 109.22 0)
		)
		(property "Description" "Resistor, US symbol"
			(at 49.53 109.22 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesignKiCAD"
				(path
					(reference "R7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:Battery")
		(at 97.79 105.41 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "BT1"
			(at 101.6 103.5684 0)
		)
		(property "Value" "Lithium Ion Polymer Battery - 3.7v 1200mAh"
			(at 101.6 106.1084 0)
		)
		(property "Footprint" ""
			(at 97.79 103.886 90)
		)
		(property "Datasheet" "~"
			(at 97.79 103.886 90)
		)
		(property "Description" "Multiple-cell battery"
			(at 97.79 105.41 0)
		)
		(property "Sim.Device" "V"
			(at 97.79 105.41 0)
		)
		(property "Sim.Type" "DC"
			(at 97.79 105.41 0)
		)
		(property "Sim.Pins" "1=+ 2=-"
			(at 97.79 105.41 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "BT1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Switch:SW_Push")
		(at 217.17 147.32 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "SW2"
			(at 217.17 143.002 0)
		)
		(property "Value" "SW_Push"
			(at 217.17 142.24 0)
		)
		(property "Footprint" "Button_Switch_THT:SW_PUSH_6mm_H7.3mm"
			(at 217.17 142.24 0)
		)
		(property "Datasheet" "~"
			(at 217.17 142.24 0)
		)
		(property "Description" "Push button switch, generic, two pins"
			(at 217.17 147.32 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "SW2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 160.02 77.47 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP3"
			(at 164.592 77.724 90)
		)
		(property "Value" "SWDIO"
			(at 160.782 75.692 90)
		)
		(property "Footprint" "TestPoint:TestPoint_Plated_Hole_D2.0mm"
			(at 160.02 82.55 0)
		)
		(property "Datasheet" "~"
			(at 160.02 82.55 0)
		)
		(property "Description" "test point"
			(at 160.02 77.47 0)
		)
		(pin "1")
		(instances
			(project "SeniorDesign"
				(path
					(reference "TP3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 176.53 97.79 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R3"
			(at 172.212 96.774 0)
		)
		(property "Value" "4.7k"
			(at 170.688 99.314 0)
		)
		(property "Footprint" "Resistor_SMD:R_0201_0603Metric"
			(at 177.546 98.044 90)
		)
		(property "Datasheet" "~"
			(at 176.53 97.79 0)
		)
		(property "Description" "Resistor, US symbol"
			(at 176.53 97.79 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "R3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 106.68 157.48 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR024"
			(at 106.68 163.83 0)
		)
		(property "Value" "GND"
			(at 106.68 162.56 0)
		)
		(property "Footprint" ""
			(at 106.68 157.48 0)
		)
		(property "Datasheet" ""
			(at 106.68 157.48 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 106.68 157.48 0)
		)
		(pin "1")
		(instances
			(project "SeniorDesign"
				(path
					(reference "#PWR024")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "SeniorDesign:TMAG5273C1QDBVR")
		(at 115.57 45.72 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U4"
			(at 115.57 30.48 0)
		)
		(property "Value" "TMAG5273C1QDBVR"
			(at 115.57 33.02 0)
		)
		(property "Footprint" "SeniorDesign:TMAG5273C1QDBVR"
			(at 115.57 45.72 0)
		)
		(property "Datasheet" ""
			(at 115.57 45.72 0)
		)
		(property "Description" ""
			(at 115.57 45.72 0)
		)
		(property "PARTREV" "B"
			(at 115.57 45.72 0)
		)
		(property "STANDARD" "IPC-7351B"
			(at 115.57 45.72 0)
		)
		(property "MAXIMUM_PACKAGE_HEIGHT" "1.40mm"
			(at 115.57 45.72 0)
		)
		(property "MANUFACTURER" "Texas Instruments"
			(at 115.57 45.72 0)
		)
		(pin "4")
		(pin "6")
		(pin "5")
		(pin "1")
		(pin "3")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "U4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 179.07 97.79 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R4"
			(at 180.594 96.774 0)
		)
		(property "Value" "4.7k"
			(at 180.594 99.314 0)
		)
		(property "Footprint" "Resistor_SMD:R_0201_0603Metric"
			(at 180.086 98.044 90)
		)
		(property "Datasheet" "~"
			(at 179.07 97.79 0)
		)
		(property "Description" "Resistor, US symbol"
			(at 179.07 97.79 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "R4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Battery_Management:MCP73831-2-OT")
		(at 72.39 100.33 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "U6"
			(at 73.66 106.934 0)
		)
		(property "Value" "MCP73831-2-OT"
			(at 73.66 108.966 0)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23-5"
			(at 73.66 106.68 0)
		)
		(property "Datasheet" "http://ww1.microchip.com/downloads/en/DeviceDoc/20001984g.pdf"
			(at 72.39 118.618 0)
		)
		(property "Description" "Single cell, Li-Ion/Li-Po charge management controller, 4.20V, Tri-State Status Output, in SOT23-5 package"
			(at 72.39 100.33 0)
		)
		(pin "3")
		(pin "5")
		(pin "4")
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "U6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:TestPoint")
		(at 196.85 73.66 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "TP1"
			(at 198.374 69.088 0)
		)
		(property "Value" "VCC"
			(at 198.374 71.628 0)
		)
		(property "Footprint" "TestPoint:TestPoint_Plated_Hole_D2.0mm"
			(at 201.93 73.66 0)
		)
		(property "Datasheet" "~"
			(at 201.93 73.66 0)
		)
		(property "Description" "test point"
			(at 196.85 73.66 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "TP1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Switch:SW_SPST")
		(at 116.84 99.06 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "SW1"
			(at 116.84 100.838 0)
		)
		(property "Value" "SW_SPST"
			(at 116.84 103.378 0)
		)
		(property "Footprint" "SeniorDesign:SKQYAAE010"
			(at 116.84 99.06 0)
		)
		(property "Datasheet" "~"
			(at 116.84 99.06 0)
		)
		(property "Description" "Single Pole Single Throw (SPST) switch"
			(at 116.84 99.06 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "SW1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 247.65 160.02 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR025"
			(at 247.65 166.37 0)
		)
		(property "Value" "GND"
			(at 251.46 162.814 0)
		)
		(property "Footprint" ""
			(at 247.65 160.02 0)
		)
		(property "Datasheet" ""
			(at 247.65 160.02 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 247.65 160.02 0)
		)
		(pin "1")
		(instances
			(project "SeniorDesign"
				(path
					(reference "#PWR025")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:PWR_FLAG")
		(at 109.22 81.28 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#FLG01"
			(at 109.22 79.375 0)
		)
		(property "Value" "PWR_FLAG"
			(at 109.22 76.2 0)
		)
		(property "Footprint" ""
			(at 109.22 81.28 0)
		)
		(property "Datasheet" "~"
			(at 109.22 81.28 0)
		)
		(property "Description" "Special symbol for telling ERC where power comes from"
			(at 109.22 81.28 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#FLG01")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "SeniorDesign:MXC6655XA")
		(at 167.64 36.83 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U2"
			(at 187.96 26.67 0)
		)
		(property "Value" "MXC6655XA"
			(at 187.96 29.21 0)
		)
		(property "Footprint" "SeniorDesign:MXC6655XA_MEM"
			(at 167.64 36.83 0)
		)
		(property "Datasheet" "MXC6655XA"
			(at 167.64 36.83 0)
		)
		(property "Description" ""
			(at 167.64 36.83 0)
		)
		(pin "2")
		(pin "12")
		(pin "1")
		(pin "10")
		(pin "8")
		(pin "5")
		(pin "11")
		(pin "4")
		(pin "7")
		(pin "3")
		(pin "6")
		(pin "9")
		(instances
			(project ""
				(path
					(reference "U2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 193.04 142.24 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R10"
			(at 195.58 140.9699 0)
		)
		(property "Value" "10k"
			(at 195.58 143.5099 0)
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric"
			(at 194.056 142.494 90)
		)
		(property "Datasheet" "~"
			(at 193.04 142.24 0)
		)
		(property "Description" "Resistor, US symbol"
			(at 193.04 142.24 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesign"
				(path
					(reference "R10")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 123.19 173.99 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C13"
			(at 117.856 172.72 0)
		)
		(property "Value" "DNP"
			(at 116.84 175.26 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric"
			(at 124.1552 177.8 0)
		)
		(property "Datasheet" "~"
			(at 123.19 173.99 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 123.19 173.99 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "SeniorDesign"
				(path
					(reference "C13")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_US")
		(at 220.98 41.91 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C3"
			(at 217.678 43.688 0)
		)
		(property "Value" "2.2uF"
			(at 217.932 41.402 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric"
			(at 220.98 41.91 0)
		)
		(property "Datasheet" ""
			(at 220.98 41.91 0)
		)
		(property "Description" "capacitor, US symbol"
			(at 220.98 41.91 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesign"
				(path
					(reference "C3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VCC")
		(at 176.53 90.17 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR010"
			(at 176.53 93.98 0)
		)
		(property "Value" "VCC"
			(at 176.53 85.09 0)
		)
		(property "Footprint" ""
			(at 176.53 90.17 0)
		)
		(property "Datasheet" ""
			(at 176.53 90.17 0)
		)
		(property "Description" "Power symbol creates a global label with name \"VCC\""
			(at 176.53 90.17 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR010")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 161.29 144.78 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C10"
			(at 164.084 143.51 0)
		)
		(property "Value" "100nF"
			(at 164.084 146.05 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric"
			(at 162.2552 148.59 0)
		)
		(property "Datasheet" "~"
			(at 161.29 144.78 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 161.29 144.78 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesign"
				(path
					(reference "C10")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 215.9 73.66 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R1"
			(at 215.9 68.834 90)
		)
		(property "Value" "470"
			(at 215.9 71.374 90)
		)
		(property "Footprint" "Resistor_SMD:R_0201_0603Metric"
			(at 216.154 72.644 90)
		)
		(property "Datasheet" "~"
			(at 215.9 73.66 0)
		)
		(property "Description" "Resistor, US symbol"
			(at 215.9 73.66 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "R1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VCC")
		(at 58.42 21.59 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR030"
			(at 58.42 25.4 0)
		)
		(property "Value" "VCC"
			(at 58.42 16.51 0)
		)
		(property "Footprint" ""
			(at 58.42 21.59 0)
		)
		(property "Datasheet" ""
			(at 58.42 21.59 0)
		)
		(property "Description" "Power symbol creates a global label with name \"VCC\""
			(at 58.42 21.59 0)
		)
		(pin "1")
		(instances
			(project "SeniorDesign"
				(path
					(reference "#PWR030")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Diode:1N5819")
		(at 90.17 78.74 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "D1"
			(at 90.4875 72.39 0)
		)
		(property "Value" "1N5819"
			(at 90.4875 74.93 0)
		)
		(property "Footprint" "Diode_THT:D_DO-41_SOD81_P10.16mm_Horizontal"
			(at 90.17 74.295 0)
		)
		(property "Datasheet" "http://www.vishay.com/docs/88525/1n5817.pdf"
			(at 90.17 78.74 0)
		)
		(property "Description" "40V 1A Schottky Barrier Rectifier Diode, DO-41"
			(at 90.17 78.74 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "D1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 157.48 151.13 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR022"
			(at 157.48 157.48 0)
		)
		(property "Value" "GND"
			(at 157.48 156.21 0)
		)
		(property "Footprint" ""
			(at 157.48 151.13 0)
		)
		(property "Datasheet" ""
			(at 157.48 151.13 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 157.48 151.13 0)
		)
		(pin "1")
		(instances
			(project "SeniorDesign"
				(path
					(reference "#PWR022")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 123.19 144.78 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7"
			(at 125.984 143.51 0)
		)
		(property "Value" "100nF"
			(at 125.984 146.05 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric"
			(at 124.1552 148.59 0)
		)
		(property "Datasheet" "~"
			(at 123.19 144.78 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 123.19 144.78 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesign"
				(path
					(reference "C7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 40.64 161.29 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR026"
			(at 40.64 167.64 0)
		)
		(property "Value" "GND"
			(at 40.64 166.37 0)
		)
		(property "Footprint" ""
			(at 40.64 161.29 0)
		)
		(property "Datasheet" ""
			(at 40.64 161.29 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 40.64 161.29 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR026")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 273.05 29.21 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C2"
			(at 275.844 27.94 0)
		)
		(property "Value" "10nF"
			(at 275.844 30.48 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric"
			(at 274.0152 33.02 0)
		)
		(property "Datasheet" "~"
			(at 273.05 29.21 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 273.05 29.21 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesign"
				(path
					(reference "C2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VCC")
		(at 254 26.67 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR02"
			(at 254 30.48 0)
		)
		(property "Value" "VCC"
			(at 254 21.59 0)
		)
		(property "Footprint" ""
			(at 254 26.67 0)
		)
		(property "Datasheet" ""
			(at 254 26.67 0)
		)
		(property "Description" "Power symbol creates a global label with name \"VCC\""
			(at 254 26.67 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR02")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VCC")
		(at 184.15 135.89 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR020"
			(at 184.15 139.7 0)
		)
		(property "Value" "VCC"
			(at 186.436 134.62 0)
		)
		(property "Footprint" ""
			(at 184.15 135.89 0)
		)
		(property "Datasheet" ""
			(at 184.15 135.89 0)
		)
		(property "Description" "Power symbol creates a global label with name \"VCC\""
			(at 184.15 135.89 0)
		)
		(pin "1")
		(instances
			(project "SeniorDesign"
				(path
					(reference "#PWR020")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 90.17 92.71 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR011"
			(at 90.17 99.06 0)
		)
		(property "Value" "GND"
			(at 92.71 92.202 0)
		)
		(property "Footprint" ""
			(at 90.17 92.71 0)
		)
		(property "Datasheet" ""
			(at 90.17 92.71 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 90.17 92.71 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR011")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "SeniorDesign:1462350001")
		(at 101.6 166.37 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "AE2"
			(at 81.28 153.67 0)
		)
		(property "Value" "1462350001"
			(at 81.28 156.21 0)
		)
		(property "Footprint" "SeniorDesign:1462350001"
			(at 101.6 166.37 0)
		)
		(property "Datasheet" ""
			(at 101.6 166.37 0)
		)
		(property "Description" ""
			(at 101.6 166.37 0)
		)
		(property "MFR_NAME" "Molex Connector Corporation"
			(at 101.6 166.37 0)
		)
		(property "MANUFACTURER_PART_NUMBER" "1462350001"
			(at 101.6 166.37 0)
		)
		(pin "1")
		(pin "3")
		(pin "4")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "AE2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_US")
		(at 152.4 144.78 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C9"
			(at 149.098 146.558 0)
		)
		(property "Value" "10uF"
			(at 149.352 144.272 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric"
			(at 152.4 144.78 0)
		)
		(property "Datasheet" ""
			(at 152.4 144.78 0)
		)
		(property "Description" "capacitor, US symbol"
			(at 152.4 144.78 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesign"
				(path
					(reference "C9")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VCC")
		(at 143.51 137.16 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR021"
			(at 143.51 140.97 0)
		)
		(property "Value" "VCC"
			(at 143.51 132.08 0)
		)
		(property "Footprint" ""
			(at 143.51 137.16 0)
		)
		(property "Datasheet" ""
			(at 143.51 137.16 0)
		)
		(property "Description" "Power symbol creates a global label with name \"VCC\""
			(at 143.51 137.16 0)
		)
		(pin "1")
		(instances
			(project "SeniorDesign"
				(path
					(reference "#PWR021")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 232.41 158.75 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C11"
			(at 234.696 159.766 0)
		)
		(property "Value" "100nF"
			(at 230.124 159.258 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric"
			(at 228.6 159.7152 0)
		)
		(property "Datasheet" "~"
			(at 232.41 158.75 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 232.41 158.75 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesign"
				(path
					(reference "C11")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 204.47 158.75 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C16"
			(at 206.756 159.766 0)
		)
		(property "Value" "100nF"
			(at 202.184 159.258 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric"
			(at 200.66 159.7152 0)
		)
		(property "Datasheet" "~"
			(at 204.47 158.75 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 204.47 158.75 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesign"
				(path
					(reference "C16")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 83.82 90.17 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R2"
			(at 80.772 92.71 90)
		)
		(property "Value" "100k"
			(at 86.36 92.456 90)
		)
		(property "Footprint" "Resistor_SMD:R_0201_0603Metric"
			(at 84.074 89.154 90)
		)
		(property "Datasheet" "~"
			(at 83.82 90.17 0)
		)
		(property "Description" "Resistor, US symbol"
			(at 83.82 90.17 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "R2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_US")
		(at 124.46 26.67 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C1"
			(at 122.682 23.368 0)
		)
		(property "Value" "1uF"
			(at 124.968 23.622 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric"
			(at 124.46 26.67 0)
		)
		(property "Datasheet" ""
			(at 124.46 26.67 0)
		)
		(property "Description" "capacitor, US symbol"
			(at 124.46 26.67 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "C1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VCC")
		(at 31.75 135.89 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR019"
			(at 31.75 139.7 0)
		)
		(property "Value" "VCC"
			(at 31.75 130.81 0)
		)
		(property "Footprint" ""
			(at 31.75 135.89 0)
		)
		(property "Datasheet" ""
			(at 31.75 135.89 0)
		)
		(property "Description" "Power symbol creates a global label with name \"VCC\""
			(at 31.75 135.89 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR019")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_US")
		(at 194.31 86.36 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C4"
			(at 195.326 83.82 0)
		)
		(property "Value" "4.7uF"
			(at 195.326 89.408 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric"
			(at 194.31 86.36 0)
		)
		(property "Datasheet" ""
			(at 194.31 86.36 0)
		)
		(property "Description" "capacitor, US symbol"
			(at 194.31 86.36 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesign"
				(path
					(reference "C4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 209.55 142.24 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R12"
			(at 212.09 140.9699 0)
		)
		(property "Value" "10k"
			(at 212.09 143.5099 0)
		)
		(property "Footprint" "Resistor_SMD:R_0805_2012Metric"
			(at 210.566 142.494 90)
		)
		(property "Datasheet" "~"
			(at 209.55 142.24 0)
		)
		(property "Description" "Resistor, US symbol"
			(at 209.55 142.24 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesign"
				(path
					(reference "R12")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Transistor_BJT:2N3904")
		(at 38.1 153.67 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "Q2"
			(at 43.18 152.3999 0)
		)
		(property "Value" "2N3904"
			(at 43.18 154.9399 0)
		)
		(property "Footprint" "Package_TO_SOT_THT:TO-92_Inline"
			(at 43.18 155.575 0)
		)
		(property "Datasheet" "https://www.onsemi.com/pub/Collateral/2N3903-D.PDF"
			(at 38.1 153.67 0)
		)
		(property "Description" "0.2A Ic, 40V Vce, Small Signal NPN Transistor, TO-92"
			(at 38.1 153.67 0)
		)
		(property "Sim.Device" "NPN"
			(at 38.1 153.67 0)
		)
		(property "Sim.Pins" "1=E 2=B 3=C"
			(at 38.1 153.67 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(instances
			(project ""
				(path
					(reference "Q2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R")
		(at 251.46 107.95 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R5"
			(at 251.46 101.6 90)
		)
		(property "Value" "0"
			(at 251.46 104.14 90)
		)
		(property "Footprint" "Resistor_SMD:R_0201_0603Metric"
			(at 251.46 109.728 90)
		)
		(property "Datasheet" "~"
			(at 251.46 107.95 0)
		)
		(property "Description" "Resistor"
			(at 251.46 107.95 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "R5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 115.57 181.61 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR027"
			(at 115.57 187.96 0)
		)
		(property "Value" "GND"
			(at 115.57 186.69 0)
		)
		(property "Footprint" ""
			(at 115.57 181.61 0)
		)
		(property "Datasheet" ""
			(at 115.57 181.61 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 115.57 181.61 0)
		)
		(pin "1")
		(instances
			(project "SeniorDesign"
				(path
					(reference "#PWR027")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VCC")
		(at 132.08 21.59 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR01"
			(at 132.08 25.4 0)
		)
		(property "Value" "VCC"
			(at 132.08 16.51 0)
		)
		(property "Footprint" ""
			(at 132.08 21.59 0)
		)
		(property "Datasheet" ""
			(at 132.08 21.59 0)
		)
		(property "Description" "Power symbol creates a global label with name \"VCC\""
			(at 132.08 21.59 0)
		)
		(pin "1")
		(instances
			(project "SeniorDesign"
				(path
					(reference "#PWR01")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 115.57 63.5 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06"
			(at 115.57 69.85 0)
		)
		(property "Value" "GND"
			(at 115.57 68.58 0)
		)
		(property "Footprint" ""
			(at 115.57 63.5 0)
		)
		(property "Datasheet" ""
			(at 115.57 63.5 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 115.57 63.5 0)
		)
		(pin "1")
		(instances
			(project "SeniorDesign"
				(path
					(reference "#PWR06")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 107.95 173.99 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C12"
			(at 110.744 172.72 0)
		)
		(property "Value" "DNP"
			(at 110.744 175.26 0)
		)
		(property "Footprint" "Capacitor_SMD:C_0201_0603Metric"
			(at 108.9152 177.8 0)
		)
		(property "Datasheet" "~"
			(at 107.95 173.99 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 107.95 173.99 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "SeniorDesign"
				(path
					(reference "C12")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Mechanical:MountingHole")
		(at 267.97 156.21 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "H3"
			(at 270.51 154.9399 0)
		)
		(property "Value" "MountingHole"
			(at 270.51 157.4799 0)
		)
		(property "Footprint" "MountingHole:MountingHole_2.2mm_M2"
			(at 267.97 156.21 0)
		)
		(property "Datasheet" "~"
			(at 267.97 156.21 0)
		)
		(property "Description" "Mounting Hole without connection"
			(at 267.97 156.21 0)
		)
		(instances
			(project "SeniorDesign"
				(path
					(reference "H3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 72.39 118.11 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR015"
			(at 72.39 124.46 0)
		)
		(property "Value" "GND"
			(at 72.39 123.19 0)
		)
		(property "Footprint" ""
			(at 72.39 118.11 0)
		)
		(property "Datasheet" ""
			(at 72.39 118.11 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 72.39 118.11 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR015")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:Antenna_Dipole")
		(at 271.78 43.18 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "AE1"
			(at 271.78 43.1799 90)
		)
		(property "Value" "Patch"
			(at 271.78 45.7199 90)
		)
		(property "Footprint" ""
			(at 271.78 43.18 0)
		)
		(property "Datasheet" "~"
			(at 271.78 43.18 0)
		)
		(property "Description" "Dipole antenna"
			(at 271.78 43.18 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "AE1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 254 58.42 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR04"
			(at 254 64.77 0)
		)
		(property "Value" "GND"
			(at 254 63.5 0)
		)
		(property "Footprint" ""
			(at 254 58.42 0)
		)
		(property "Datasheet" ""
			(at 254 58.42 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 254 58.42 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR04")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VCC")
		(at 193.04 73.66 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07"
			(at 193.04 77.47 0)
		)
		(property "Value" "VCC"
			(at 193.04 68.58 0)
		)
		(property "Footprint" ""
			(at 193.04 73.66 0)
		)
		(property "Datasheet" ""
			(at 193.04 73.66 0)
		)
		(property "Description" "Power symbol creates a global label with name \"VCC\""
			(at 193.04 73.66 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR07")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_US")
		(at 46.99 109.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 42.926 108.204 0)
		)
		(property "Value" "5.1k"
			(at 41.402 110.49 0)
		)
		(property "Footprint" "Resistor_SMD:R_0201_0603Metric"
			(at 48.006 109.474 90)
		)
		(property "Datasheet" "~"
			(at 46.99 109.22 0)
		)
		(property "Description" "Resistor, US symbol"
			(at 46.99 109.22 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "R6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "SeniorDesign:ANT-915-USP410")
		(at 269.24 107.95 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "E1"
			(at 271.78 107.1244 0)
		)
		(property "Value" "ANT-915-USP410"
			(at 271.78 109.6644 0)
		)
		(property "Footprint" "SeniorDesign:XDCR_ANT-915-USP410"
			(at 269.24 107.95 0)
		)
		(property "Datasheet" ""
			(at 269.24 107.95 0)
		)
		(property "Description" ""
			(at 269.24 107.95 0)
		)
		(property "PARTREV" "N/A"
			(at 269.24 107.95 0)
		)
		(property "MANUFACTURER" "Linx"
			(at 269.24 107.95 0)
		)
		(property "MAXIMUM_PACKAGE_HEIGHT" "2.9 mm"
			(at 269.24 107.95 0)
		)
		(property "STANDARD" "Manufacturer Recommendations"
			(at 269.24 107.95 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "E1")
					(unit 1)
				)
			)
		)
	)
	(sheet_instances
		(path
			(page "1")
		)
	)
	(embedded_fonts no)
)
