(kicad_sch
	(version 20250114)
	(generator "eeschema")
	(generator_version "9.0")
	(paper "A4")
	(title_block
		(title "Battery Management System")
		(date "2025-07-03")
		(rev "V1.0")
		(company "AFL")
	)
	(lib_symbols
		(symbol "Connector:Conn_01x02_Socket"
			(pin_names
				(offset 1.016)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J"
				(at 0 2.54 0)
			)
			(property "Value" "Conn_01x02_Socket"
				(at 0 -5.08 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Generic connector, single row, 01x02, script generated"
				(at 0 0 0)
			)
			(property "ki_locked" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "connector"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Connector*:*_1x??_*"
				(at 0 0 0)
			)
			(symbol "Conn_01x02_Socket_1_1"
				(polyline
					(pts
						(xy -1.27 0) (xy -0.508 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 -2.54) (xy -0.508 -2.54)
					)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 -0.508)
					(mid -0.5058 0)
					(end 0 0.508)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 -3.048)
					(mid -0.5058 -2.54)
					(end 0 -2.032)
					(fill
						(type none)
					)
				)
				(pin passive line
					(at -5.08 0 0)
					(length 3.81)
					(name "Pin_1")
					(number "1")
				)
				(pin passive line
					(at -5.08 -2.54 0)
					(length 3.81)
					(name "Pin_2")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Connector:Conn_01x05_Socket"
			(pin_names
				(offset 1.016)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J"
				(at 0 7.62 0)
			)
			(property "Value" "Conn_01x05_Socket"
				(at 0 -7.62 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Generic connector, single row, 01x05, script generated"
				(at 0 0 0)
			)
			(property "ki_locked" ""
				(at 0 0 0)
			)
			(property "ki_keywords" "connector"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Connector*:*_1x??_*"
				(at 0 0 0)
			)
			(symbol "Conn_01x05_Socket_1_1"
				(polyline
					(pts
						(xy -1.27 5.08) (xy -0.508 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 2.54) (xy -0.508 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 0) (xy -0.508 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 -2.54) (xy -0.508 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 -5.08) (xy -0.508 -5.08)
					)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 4.572)
					(mid -0.5058 5.08)
					(end 0 5.588)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 2.032)
					(mid -0.5058 2.54)
					(end 0 3.048)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 -0.508)
					(mid -0.5058 0)
					(end 0 0.508)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 -3.048)
					(mid -0.5058 -2.54)
					(end 0 -2.032)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 -5.588)
					(mid -0.5058 -5.08)
					(end 0 -4.572)
					(fill
						(type none)
					)
				)
				(pin passive line
					(at -5.08 5.08 0)
					(length 3.81)
					(name "Pin_1")
					(number "1")
				)
				(pin passive line
					(at -5.08 2.54 0)
					(length 3.81)
					(name "Pin_2")
					(number "2")
				)
				(pin passive line
					(at -5.08 0 0)
					(length 3.81)
					(name "Pin_3")
					(number "3")
				)
				(pin passive line
					(at -5.08 -2.54 0)
					(length 3.81)
					(name "Pin_4")
					(number "4")
				)
				(pin passive line
					(at -5.08 -5.08 0)
					(length 3.81)
					(name "Pin_5")
					(number "5")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Custom_Sym_Library_For_PCB:SSD1306_OLED_128x64"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "Brd"
				(at 0 -3.81 0)
			)
			(property "Value" "SSD1306_OLED_128x64"
				(at 0 -1.27 0)
			)
			(property "Footprint" ""
				(at 0 6.35 0)
			)
			(property "Datasheet" ""
				(at 0 6.35 0)
			)
			(property "Description" ""
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SSD1306-128x64_OLED:SSD1306"
				(at 0 0 0)
			)
			(symbol "SSD1306_OLED_128x64_0_1"
				(rectangle
					(start -6.35 6.35)
					(end 6.35 -6.35)
					(fill
						(type background)
					)
				)
			)
			(symbol "SSD1306_OLED_128x64_1_1"
				(pin input line
					(at -3.81 8.89 270)
					(length 2.54)
					(name "GND")
					(number "1")
				)
				(pin input line
					(at -1.27 8.89 270)
					(length 2.54)
					(name "VCC")
					(number "2")
				)
				(pin input line
					(at 1.27 8.89 270)
					(length 2.54)
					(name "SCL")
					(number "3")
				)
				(pin input line
					(at 3.81 8.89 270)
					(length 2.54)
					(name "SDA")
					(number "4")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:C_Small"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0.254)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.254 1.778 0)
			)
			(property "Value" "C_Small"
				(at 0.254 -2.032 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor, small symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "capacitor cap"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_Small_0_1"
				(polyline
					(pts
						(xy -1.524 0.508) (xy 1.524 0.508)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.524 -0.508) (xy 1.524 -0.508)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_Small_1_1"
				(pin passive line
					(at 0 2.54 270)
					(length 2.032)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -2.54 90)
					(length 2.032)
					(name "~")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:D_Schottky"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 1.016)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "D"
				(at 0 2.54 0)
			)
			(property "Value" "D_Schottky"
				(at 0 -2.54 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Schottky diode"
				(at 0 0 0)
			)
			(property "ki_keywords" "diode Schottky"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "TO-???* *_Diode_* *SingleDiode* D_*"
				(at 0 0 0)
			)
			(symbol "D_Schottky_0_1"
				(polyline
					(pts
						(xy -1.905 0.635) (xy -1.905 1.27) (xy -1.27 1.27) (xy -1.27 -1.27) (xy -0.635 -1.27) (xy -0.635 -0.635)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 1.27) (xy 1.27 -1.27) (xy -1.27 0) (xy 1.27 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 0) (xy -1.27 0)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "D_Schottky_1_1"
				(pin passive line
					(at -3.81 0 0)
					(length 2.54)
					(name "K")
					(number "1")
				)
				(pin passive line
					(at 3.81 0 180)
					(length 2.54)
					(name "A")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:R_Small"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0.254)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 0.762 0.508 0)
			)
			(property "Value" "R_Small"
				(at 0.762 -1.016 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor, small symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "R resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_Small_0_1"
				(rectangle
					(start -0.762 1.778)
					(end 0.762 -1.778)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_Small_1_1"
				(pin passive line
					(at 0 2.54 270)
					(length 0.762)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -2.54 90)
					(length 0.762)
					(name "~")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Mechanical:MountingHole"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "H"
				(at 0 5.08 0)
			)
			(property "Value" "MountingHole"
				(at 0 3.175 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Mounting Hole without connection"
				(at 0 0 0)
			)
			(property "ki_keywords" "mounting hole"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "MountingHole*"
				(at 0 0 0)
			)
			(symbol "MountingHole_0_1"
				(circle
					(center 0 0)
					(radius 1.27)
					(fill
						(type none)
					)
				)
			)
			(embedded_fonts no)
		)
		(symbol "Nut Sch Library files:NODE_MCU_ESP32_GPIO_GROUPED_30PIN"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -15.24 27.94 0)
			)
			(property "Value" "NODE_MCU_ESP32_GPIO_GROUPED_30PIN"
				(at 1.27 -41.91 0)
			)
			(property "Footprint" "Nut FootPrint files:node_mcu_esp32_30pins"
				(at 1.27 -44.45 0)
			)
			(property "Datasheet" ""
				(at 1.27 -44.45 0)
			)
			(property "Description" "NODE MCU ESP32 GPIO GROUPED 30 PIN"
				(at 0 0 0)
			)
			(property "ki_keywords" "NODE MCU ESP32 GPIO GROUPED ESP 32 30 PIN 30PIN"
				(at 0 0 0)
			)
			(symbol "NODE_MCU_ESP32_GPIO_GROUPED_30PIN_0_0"
				(rectangle
					(start -11.43 30.48)
					(end 10.16 -29.21)
					(fill
						(type background)
					)
				)
				(rectangle
					(start -11.43 21.59)
					(end -5.08 11.43)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -11.43 5.08)
					(end -2.54 10.16)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -11.43 -1.27)
					(end -2.54 3.81)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -11.43 -7.62)
					(end -2.54 -2.54)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -11.43 -8.89)
					(end -1.27 -19.05)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -11.43 -19.05)
					(end 0 21.59)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -2.54 30.48)
					(end -7.62 24.13)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 7.62 30.48)
					(end 0 22.86)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 7.62 -29.21)
					(end -8.89 -20.32)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 10.16)
					(end 3.81 -5.08)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 10.16 -19.05)
					(end 1.27 -6.35)
					(fill
						(type none)
					)
				)
				(text "FREE I/O"
					(at -6.35 16.51 900)
				)
				(text "ADC"
					(at -6.35 7.62 900)
				)
				(text "I/O"
					(at -3.81 7.62 900)
				)
				(text "POWER"
					(at -2.54 -21.59 0)
				)
				(text "IN_OUT_PINs"
					(at -1.27 2.54 900)
				)
				(text "INLINE"
					(at 2.54 -12.7 900)
				)
				(text "DON'T"
					(at 3.81 26.67 0)
				)
				(text "USE"
					(at 3.81 24.13 0)
				)
				(text "&I"
					(at 5.08 13.97 900)
				)
				(text "FOR EXT FLASH"
					(at 5.08 2.54 900)
				)
				(text "DEBUGGING"
					(at 5.08 -12.7 900)
				)
			)
			(symbol "NODE_MCU_ESP32_GPIO_GROUPED_30PIN_1_1"
				(rectangle
					(start 10.16 21.59)
					(end 1.27 11.43)
					(fill
						(type none)
					)
				)
				(text "ADC"
					(at 2.54 13.97 900)
				)
				(pin bidirectional line
					(at -13.97 20.32 0)
					(length 2.54)
					(name "27")
					(number "25")
				)
				(pin bidirectional line
					(at -13.97 17.78 0)
					(length 2.54)
					(name "17")
					(number "7")
				)
				(pin bidirectional line
					(at -13.97 15.24 0)
					(length 2.54)
					(name "16")
					(number "6")
				)
				(pin bidirectional line
					(at -13.97 12.7 0)
					(length 2.54)
					(name "4")
					(number "5")
				)
				(pin bidirectional line
					(at -13.97 8.89 0)
					(length 2.54)
					(name "33")
					(number "22")
				)
				(pin bidirectional line
					(at -13.97 6.35 0)
					(length 2.54)
					(name "32")
					(number "21")
				)
				(pin bidirectional line
					(at -13.97 2.54 0)
					(length 2.54)
					(name "26/DAC")
					(number "24")
				)
				(pin bidirectional line
					(at -13.97 0 0)
					(length 2.54)
					(name "25/DAC")
					(number "23")
				)
				(pin bidirectional line
					(at -13.97 -3.81 0)
					(length 2.54)
					(name "22/SCL")
					(number "14")
				)
				(pin bidirectional line
					(at -13.97 -6.35 0)
					(length 2.54)
					(name "21/SDA")
					(number "11")
				)
				(pin bidirectional line
					(at -13.97 -10.16 0)
					(length 2.54)
					(name "5/CS")
					(number "8")
				)
				(pin bidirectional line
					(at -13.97 -12.7 0)
					(length 2.54)
					(name "18/CLK")
					(number "9")
				)
				(pin bidirectional line
					(at -13.97 -15.24 0)
					(length 2.54)
					(name "19/MISO")
					(number "10")
				)
				(pin bidirectional line
					(at -13.97 -17.78 0)
					(length 2.54)
					(name "23/MOSI")
					(number "15")
				)
				(pin bidirectional line
					(at -7.62 -31.75 90)
					(length 2.54)
					(name "3.3V")
					(number "1")
				)
				(pin bidirectional line
					(at -6.35 33.02 270)
					(length 2.54)
					(name "3/RX")
					(number "12")
				)
				(pin bidirectional line
					(at -5.08 -31.75 90)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin bidirectional line
					(at -3.81 33.02 270)
					(length 2.54)
					(name "1/TX")
					(number "13")
				)
				(pin bidirectional line
					(at -1.27 -31.75 90)
					(length 2.54)
					(name "EN")
					(number "16")
				)
				(pin bidirectional line
					(at 3.81 -31.75 90)
					(length 2.54)
					(name "VIN/5V")
					(number "30")
				)
				(pin bidirectional line
					(at 5.08 33.02 270)
					(length 2.54)
					(name "2")
					(number "4")
				)
				(pin bidirectional line
					(at 6.35 -31.75 90)
					(length 2.54)
					(name "GND")
					(number "29")
				)
				(pin bidirectional line
					(at 12.7 20.32 180)
					(length 2.54)
					(name "UP/36")
					(number "17")
				)
				(pin bidirectional line
					(at 12.7 17.78 180)
					(length 2.54)
					(name "UN/39")
					(number "18")
				)
				(pin bidirectional line
					(at 12.7 15.24 180)
					(length 2.54)
					(name "35")
					(number "20")
				)
				(pin bidirectional line
					(at 12.7 12.7 180)
					(length 2.54)
					(name "34")
					(number "19")
				)
				(pin bidirectional line
					(at 12.7 -8.89 180)
					(length 2.54)
					(name "15")
					(number "3")
				)
				(pin bidirectional line
					(at 12.7 -11.43 180)
					(length 2.54)
					(name "14")
					(number "26")
				)
				(pin bidirectional line
					(at 12.7 -13.97 180)
					(length 2.54)
					(name "13")
					(number "28")
				)
				(pin bidirectional line
					(at 12.7 -16.51 180)
					(length 2.54)
					(name "12")
					(number "27")
				)
			)
			(embedded_fonts no)
		)
		(symbol "SamacSys_Parts:BQ76952PFBR"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "IC1"
				(at 46.99 6.9281 0)
			)
			(property "Value" "BQ76952PFBR"
				(at 46.99 4.3881 0)
			)
			(property "Footprint" "QFP50P900X900X120-48N"
				(at 39.37 -87.3 0)
			)
			(property "Datasheet" "https://www.ti.com/lit/ds/symlink/bq76952.pdf?ts=1602524050348&ref_url=https%253A%252F%252Fwww.ti.com%252Fproduct%252FBQ76952%253FkeyMatch%253DBQ76952PFBR%2526tisearch%253DSearch-EN-everything%2526usecase%253DOPN"
				(at 39.37 -187.3 0)
			)
			(property "Description" "3-S TO 16-S HIGH ACCURACY BATTERY BQ76952 3-Series to 16-Series High Accuracy Battery Monitor and Protector for LiIon, Li Polymer, and LiFePO4 Battery Packs"
				(at 0 0 0)
			)
			(property "Height" "1.2"
				(at 39.37 -387.3 0)
			)
			(property "Manufacturer_Name" "Texas Instruments"
				(at 39.37 -487.3 0)
			)
			(property "Manufacturer_Part_Number" "BQ76952PFBR"
				(at 39.37 -587.3 0)
			)
			(property "Mouser Part Number" "595-BQ76952PFBR"
				(at 39.37 -687.3 0)
			)
			(property "Mouser Price/Stock" "https://www.mouser.co.uk/ProductDetail/Texas-Instruments/BQ76952PFBR?qs=zW32dvEIR3tYeZDtcUwdQA%3D%3D"
				(at 39.37 -787.3 0)
			)
			(property "Arrow Part Number" "BQ76952PFBR"
				(at 39.37 -887.3 0)
			)
			(property "Arrow Price/Stock" "null?region=nac"
				(at 39.37 -987.3 0)
			)
			(symbol "BQ76952PFBR_1_1"
				(rectangle
					(start 5.08 6.35)
					(end 36.83 -35.56)
					(fill
						(type background)
					)
				)
				(pin passive line
					(at 0 -1.27 0)
					(length 5.08)
					(name "VC15")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 0)
					(length 5.08)
					(name "VC14")
					(number "2")
				)
				(pin passive line
					(at 0 -6.35 0)
					(length 5.08)
					(name "VC13")
					(number "3")
				)
				(pin passive line
					(at 0 -8.89 0)
					(length 5.08)
					(name "VC12")
					(number "4")
				)
				(pin passive line
					(at 0 -11.43 0)
					(length 5.08)
					(name "VC11")
					(number "5")
				)
				(pin passive line
					(at 0 -13.97 0)
					(length 5.08)
					(name "VC10")
					(number "6")
				)
				(pin passive line
					(at 0 -16.51 0)
					(length 5.08)
					(name "VC9")
					(number "7")
				)
				(pin passive line
					(at 0 -19.05 0)
					(length 5.08)
					(name "VC8")
					(number "8")
				)
				(pin passive line
					(at 0 -21.59 0)
					(length 5.08)
					(name "VC7")
					(number "9")
				)
				(pin passive line
					(at 0 -24.13 0)
					(length 5.08)
					(name "VC6")
					(number "10")
				)
				(pin passive line
					(at 0 -26.67 0)
					(length 5.08)
					(name "VC5")
					(number "11")
				)
				(pin passive line
					(at 0 -29.21 0)
					(length 5.08)
					(name "VC4")
					(number "12")
				)
				(pin passive line
					(at 7.62 11.43 270)
					(length 5.08)
					(name "VC16")
					(number "48")
				)
				(pin passive line
					(at 7.62 -40.64 90)
					(length 5.08)
					(name "VC3")
					(number "13")
				)
				(pin passive line
					(at 10.16 11.43 270)
					(length 5.08)
					(name "BAT")
					(number "47")
				)
				(pin passive line
					(at 10.16 -40.64 90)
					(length 5.08)
					(name "VC2")
					(number "14")
				)
				(pin passive line
					(at 12.7 11.43 270)
					(length 5.08)
					(name "CP1")
					(number "46")
				)
				(pin passive line
					(at 12.7 -40.64 90)
					(length 5.08)
					(name "VC1")
					(number "15")
				)
				(pin passive line
					(at 15.24 11.43 270)
					(length 5.08)
					(name "CHG")
					(number "45")
				)
				(pin passive line
					(at 15.24 -40.64 90)
					(length 5.08)
					(name "VC0")
					(number "16")
				)
				(pin passive line
					(at 17.78 11.43 270)
					(length 5.08)
					(name "NC_2")
					(number "44")
				)
				(pin passive line
					(at 17.78 -40.64 90)
					(length 5.08)
					(name "VSS")
					(number "17")
				)
				(pin passive line
					(at 20.32 11.43 270)
					(length 5.08)
					(name "DSG")
					(number "43")
				)
				(pin passive line
					(at 20.32 -40.64 90)
					(length 5.08)
					(name "SRP")
					(number "18")
				)
				(pin passive line
					(at 22.86 11.43 270)
					(length 5.08)
					(name "PACK")
					(number "42")
				)
				(pin passive line
					(at 22.86 -40.64 90)
					(length 5.08)
					(name "NC_1")
					(number "19")
				)
				(pin passive line
					(at 25.4 11.43 270)
					(length 5.08)
					(name "LD")
					(number "41")
				)
				(pin passive line
					(at 25.4 -40.64 90)
					(length 5.08)
					(name "SRN")
					(number "20")
				)
				(pin passive line
					(at 27.94 11.43 270)
					(length 5.08)
					(name "PCHG")
					(number "40")
				)
				(pin passive line
					(at 27.94 -40.64 90)
					(length 5.08)
					(name "TS1")
					(number "21")
				)
				(pin passive line
					(at 30.48 11.43 270)
					(length 5.08)
					(name "PDSG")
					(number "39")
				)
				(pin passive line
					(at 30.48 -40.64 90)
					(length 5.08)
					(name "TS2")
					(number "22")
				)
				(pin passive line
					(at 33.02 11.43 270)
					(length 5.08)
					(name "FUSE")
					(number "38")
				)
				(pin passive line
					(at 33.02 -40.64 90)
					(length 5.08)
					(name "TS3")
					(number "23")
				)
				(pin passive line
					(at 35.56 11.43 270)
					(length 5.08)
					(name "BREG")
					(number "37")
				)
				(pin passive line
					(at 35.56 -40.64 90)
					(length 5.08)
					(name "REG18")
					(number "24")
				)
				(pin passive line
					(at 41.91 -1.27 180)
					(length 5.08)
					(name "REGIN")
					(number "36")
				)
				(pin passive line
					(at 41.91 -3.81 180)
					(length 5.08)
					(name "REG1")
					(number "35")
				)
				(pin passive line
					(at 41.91 -6.35 180)
					(length 5.08)
					(name "REG2")
					(number "34")
				)
				(pin passive line
					(at 41.91 -8.89 180)
					(length 5.08)
					(name "RST_SHUT")
					(number "33")
				)
				(pin passive line
					(at 41.91 -11.43 180)
					(length 5.08)
					(name "DDSG")
					(number "32")
				)
				(pin passive line
					(at 41.91 -13.97 180)
					(length 5.08)
					(name "DCHG")
					(number "31")
				)
				(pin passive line
					(at 41.91 -16.51 180)
					(length 5.08)
					(name "DFETOFF")
					(number "30")
				)
				(pin passive line
					(at 41.91 -19.05 180)
					(length 5.08)
					(name "CFETOFF")
					(number "29")
				)
				(pin passive line
					(at 41.91 -21.59 180)
					(length 5.08)
					(name "HDQ")
					(number "28")
				)
				(pin passive line
					(at 41.91 -24.13 180)
					(length 5.08)
					(name "SDA")
					(number "27")
				)
				(pin passive line
					(at 41.91 -26.67 180)
					(length 5.08)
					(name "SCL")
					(number "26")
				)
				(pin passive line
					(at 41.91 -29.21 180)
					(length 5.08)
					(name "ALERT")
					(number "25")
				)
			)
			(embedded_fonts no)
		)
		(symbol "SamacSys_Parts:FQP30N06L"
			(pin_names
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "Q"
				(at 11.43 3.81 0)
			)
			(property "Value" "FQP30N06L"
				(at 11.43 1.27 0)
			)
			(property "Footprint" "TO254P470X1016X2019-3P"
				(at 11.43 -98.73 0)
			)
			(property "Datasheet" "https://www.onsemi.com/pub/Collateral/FQP30N06L-D.pdf"
				(at 11.43 -198.73 0)
			)
			(property "Description" "32A, 60V, RDS(on) = 35m(Max.) @VGS = 10 V, ID = 16A; 175C maximum junction temperature rating; Low gate charge ( Typ. 15nC); 100% avalanche tested; Low Crss ( Typ. 50pF)"
				(at 0 0 0)
			)
			(property "Height" "4.7"
				(at 11.43 -398.73 0)
			)
			(property "Manufacturer_Name" "onsemi"
				(at 11.43 -498.73 0)
			)
			(property "Manufacturer_Part_Number" "FQP30N06L"
				(at 11.43 -598.73 0)
			)
			(property "Mouser Part Number" "512-FQP30N06L"
				(at 11.43 -698.73 0)
			)
			(property "Mouser Price/Stock" "https://www.mouser.co.uk/ProductDetail/onsemi-Fairchild/FQP30N06L?qs=%252Beu4QTTVkDqugBwFplJ%252Bug%3D%3D"
				(at 11.43 -798.73 0)
			)
			(property "Arrow Part Number" "FQP30N06L"
				(at 11.43 -898.73 0)
			)
			(property "Arrow Price/Stock" "https://www.arrow.com/en/products/fqp30n06l/on-semiconductor?region=europe"
				(at 11.43 -998.73 0)
			)
			(symbol "FQP30N06L_1_1"
				(polyline
					(pts
						(xy 2.54 0) (xy 5.08 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.08 5.08) (xy 5.08 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.842 5.588) (xy 5.842 4.572)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.842 2.54) (xy 6.858 3.048) (xy 6.858 2.032) (xy 5.842 2.54)
					)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy 5.842 2.032) (xy 5.842 3.048)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.842 0) (xy 7.62 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.842 -0.508) (xy 5.842 0.508)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 6.35 2.54)
					(radius 3.81)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 7.62 5.08) (xy 5.842 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 7.62 5.08) (xy 7.62 7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 7.62 2.54) (xy 5.842 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 7.62 2.54) (xy 7.62 -2.54)
					)
					(fill
						(type none)
					)
				)
				(pin passive line
					(at 0 0 0)
					(length 2.54)
					(name "G")
					(number "1")
				)
				(pin passive line
					(at 7.62 10.16 270)
					(length 2.54)
					(name "D")
					(number "2")
				)
				(pin passive line
					(at 7.62 -5.08 90)
					(length 2.54)
					(name "S")
					(number "3")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Switch:SW_Push"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 1.016)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "SW"
				(at 1.27 2.54 0)
			)
			(property "Value" "SW_Push"
				(at 0 -1.524 0)
			)
			(property "Footprint" ""
				(at 0 5.08 0)
			)
			(property "Datasheet" "~"
				(at 0 5.08 0)
			)
			(property "Description" "Push button switch, generic, two pins"
				(at 0 0 0)
			)
			(property "ki_keywords" "switch normally-open pushbutton push-button"
				(at 0 0 0)
			)
			(symbol "SW_Push_0_1"
				(circle
					(center -2.032 0)
					(radius 0.508)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 1.27) (xy 0 3.048)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 2.032 0)
					(radius 0.508)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 1.27) (xy -2.54 1.27)
					)
					(fill
						(type none)
					)
				)
				(pin passive line
					(at -5.08 0 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
				(pin passive line
					(at 5.08 0 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Transistor_BJT:S8050"
			(pin_names
				(offset 0)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "Q"
				(at 5.08 1.905 0)
			)
			(property "Value" "S8050"
				(at 5.08 0 0)
			)
			(property "Footprint" "Package_TO_SOT_THT:TO-92_Inline"
				(at 5.08 -1.905 0)
			)
			(property "Datasheet" "http://www.unisonic.com.tw/datasheet/S8050.pdf"
				(at 0 0 0)
			)
			(property "Description" "0.7A Ic, 20V Vce, Low Voltage High Current NPN Transistor, TO-92"
				(at 0 0 0)
			)
			(property "ki_keywords" "S8050 NPN Low Voltage High Current Transistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "TO?92*"
				(at 0 0 0)
			)
			(symbol "S8050_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0.635 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 1.905) (xy 0.635 -1.905) (xy 0.635 -1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 0.635) (xy 2.54 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.635 -0.635) (xy 2.54 -2.54) (xy 2.54 -2.54)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 1.27 0)
					(radius 2.8194)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 -1.778) (xy 1.778 -1.27) (xy 2.286 -2.286) (xy 1.27 -1.778) (xy 1.27 -1.778)
					)
					(fill
						(type outline)
					)
				)
			)
			(symbol "S8050_1_1"
				(pin input line
					(at -5.08 0 0)
					(length 5.08)
					(name "B")
					(number "2")
				)
				(pin passive line
					(at 2.54 5.08 270)
					(length 2.54)
					(name "C")
					(number "3")
				)
				(pin passive line
					(at 2.54 -5.08 90)
					(length 2.54)
					(name "E")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Transistor_FET:IRLZ34N"
			(pin_names
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "Q"
				(at 5.08 1.905 0)
			)
			(property "Value" "IRLZ34N"
				(at 5.08 0 0)
			)
			(property "Footprint" "Package_TO_SOT_THT:TO-220-3_Vertical"
				(at 5.08 -1.905 0)
			)
			(property "Datasheet" "http://www.infineon.com/dgdl/irlz34npbf.pdf?fileId=5546d462533600a40153567206892720"
				(at 5.08 -3.81 0)
			)
			(property "Description" "30A Id, 55V Vds, 35mOhm Rds, N-Channel HEXFET Power MOSFET, TO-220AB"
				(at 0 0 0)
			)
			(property "ki_keywords" "N-Channel HEXFET MOSFET Logic-Level"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "TO?220*"
				(at 0 0 0)
			)
			(symbol "IRLZ34N_0_1"
				(polyline
					(pts
						(xy 0.254 1.905) (xy 0.254 -1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.254 0) (xy -2.54 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 2.286) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 0.508) (xy 0.762 -0.508)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 -1.27) (xy 0.762 -2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 -1.778) (xy 3.302 -1.778) (xy 3.302 1.778) (xy 0.762 1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.016 0) (xy 2.032 0.381) (xy 2.032 -0.381) (xy 1.016 0)
					)
					(fill
						(type outline)
					)
				)
				(circle
					(center 1.651 0)
					(radius 2.794)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 2.54) (xy 2.54 1.778)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 2.54 1.778)
					(radius 0.254)
					(fill
						(type outline)
					)
				)
				(circle
					(center 2.54 -1.778)
					(radius 0.254)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy 2.54 -2.54) (xy 2.54 0) (xy 0.762 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.794 0.508) (xy 2.921 0.381) (xy 3.683 0.381) (xy 3.81 0.254)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 3.302 0.381) (xy 2.921 -0.254) (xy 3.683 -0.254) (xy 3.302 0.381)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "IRLZ34N_1_1"
				(pin input line
					(at -5.08 0 0)
					(length 2.54)
					(name "G")
					(number "1")
				)
				(pin passive line
					(at 2.54 5.08 270)
					(length 2.54)
					(name "D")
					(number "2")
				)
				(pin passive line
					(at 2.54 -5.08 90)
					(length 2.54)
					(name "S")
					(number "3")
				)
			)
			(embedded_fonts no)
		)
		(symbol "power:+3.3V"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+3.3V"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+3.3V\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+3.3V_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+3.3V_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0)
					(hide yes)
					(name "+3.3V")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "power:GND"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0)
					(hide yes)
					(name "GND")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "power:VSS"
			(power)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "VSS"
				(at 0 3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"VSS\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "VSS_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 1.27) (xy -0.762 1.27) (xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type outline)
					)
				)
			)
			(symbol "VSS_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0)
					(hide yes)
					(name "VSS")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
	)
	(text "Connects to BMS_IC"
		(exclude_from_sim no)
		(at 196.215 55.88 90)
	)
	(text "BMS_IC"
		(exclude_from_sim no)
		(at 97.155 52.705 90)
	)
	(text "Connects to BMS_IC"
		(exclude_from_sim no)
		(at 118.745 178.435 90)
	)
	(text "Internal\nRegulator\nSwitch"
		(exclude_from_sim no)
		(at 146.685 152.4 0)
	)
	(text "Battery\nConnection\nPorts"
		(exclude_from_sim no)
		(at 20.955 28.575 0)
	)
	(text "ESP32 uController"
		(exclude_from_sim no)
		(at 237.49 22.86 0)
	)
	(text "Connects to uC"
		(exclude_from_sim no)
		(at 269.24 154.305 90)
	)
	(text "1"
		(exclude_from_sim no)
		(at 63.5 22.86 0)
	)
	(text "Junction Ground"
		(exclude_from_sim no)
		(at 109.855 110.49 0)
	)
	(text "OLED DISPLAY"
		(exclude_from_sim no)
		(at 187.325 164.465 0)
	)
	(text "Buttons"
		(exclude_from_sim no)
		(at 245.11 120.015 0)
	)
	(text "External 3.3V output"
		(exclude_from_sim no)
		(at 173.99 85.09 0)
	)
	(text "Connects to BMS_IC"
		(exclude_from_sim no)
		(at 67.945 52.705 90)
	)
	(text "Connects to BMS_IC"
		(exclude_from_sim no)
		(at 81.28 167.005 90)
	)
	(text "OUTPUT CONNECTOR\nFOR CHARGING AND\nDISCHARGING \nBATTERY"
		(exclude_from_sim no)
		(at 175.895 120.65 0)
	)
	(text "2"
		(exclude_from_sim no)
		(at 67.945 81.28 0)
	)
	(text "Pack Charge and Discharge Switch"
		(exclude_from_sim no)
		(at 24.765 128.905 0)
	)
	(text "Connetcor\nfor battery\ninputs"
		(exclude_from_sim no)
		(at 19.05 46.99 0)
	)
	(text "Connects to BMS_IC"
		(exclude_from_sim no)
		(at 57.15 100.965 0)
	)
	(text "BQ76952 IC"
		(exclude_from_sim no)
		(at 114.935 21.59 0)
	)
	(text "Current Sense"
		(exclude_from_sim no)
		(at 100.33 150.495 0)
	)
	(text "Thermistor Connector"
		(exclude_from_sim no)
		(at 170.815 31.75 0)
	)
	(junction
		(at 243.84 142.24)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 36.83 172.085)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 60.96 87.63)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 100.965 62.23)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 100.965 72.39)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 73.66 139.7)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 38.1 149.86)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 38.735 54.61)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 112.395 166.37)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 112.395 180.975)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 57.15 87.63)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 104.775 162.56)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 150.495 165.735)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 60.325 172.085)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 48.895 163.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 100.965 46.99)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 67.945 139.7)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 100.965 52.07)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 100.965 54.61)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 100.965 49.53)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 44.45 37.465)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 57.785 55.245)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 48.895 40.005)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 30.48 139.7)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 100.965 57.15)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 100.965 69.85)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 120.015 125.73)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 104.775 166.37)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 100.965 67.31)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 242.57 130.81)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 112.395 162.56)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 100.965 64.77)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 48.895 139.7)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 104.775 180.975)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 51.435 45.085)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 30.48 163.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 100.965 59.69)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 57.785 50.165)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 53.975 45.085)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 156.21 157.48)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 52.705 87.63)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 53.975 50.165)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 100.965 74.93)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 59.69 149.86)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 48.895 149.86)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 35.56 37.465)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 69.85 139.7)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 51.435 40.005)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 67.945 163.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 52.705 94.615)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 243.84 155.575)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 46.99 31.75)
		(diameter 0)
		(color 0 0 0 0)
	)
	(no_connect
		(at 118.745 34.29)
	)
	(no_connect
		(at 241.3 31.75)
	)
	(no_connect
		(at 246.38 96.52)
	)
	(no_connect
		(at 260.35 46.99)
	)
	(no_connect
		(at 260.35 44.45)
	)
	(no_connect
		(at 260.35 76.2)
	)
	(no_connect
		(at 233.68 74.93)
	)
	(no_connect
		(at 123.825 86.36)
	)
	(no_connect
		(at 233.68 82.55)
	)
	(no_connect
		(at 260.35 52.07)
	)
	(no_connect
		(at 233.68 80.01)
	)
	(no_connect
		(at 252.73 31.75)
	)
	(no_connect
		(at 233.68 77.47)
	)
	(no_connect
		(at 260.35 73.66)
	)
	(no_connect
		(at 243.84 31.75)
	)
	(no_connect
		(at 142.875 67.31)
	)
	(no_connect
		(at 260.35 81.28)
	)
	(no_connect
		(at 260.35 49.53)
	)
	(no_connect
		(at 260.35 78.74)
	)
	(wire
		(pts
			(xy 234.315 130.81) (xy 236.22 130.81)
		)
	)
	(wire
		(pts
			(xy 142.875 54.61) (xy 144.145 54.61)
		)
	)
	(wire
		(pts
			(xy 113.665 125.73) (xy 120.015 125.73)
		)
	)
	(wire
		(pts
			(xy 38.735 55.245) (xy 42.545 55.245)
		)
	)
	(wire
		(pts
			(xy 100.965 57.15) (xy 100.965 59.69)
		)
	)
	(wire
		(pts
			(xy 104.775 180.975) (xy 106.045 180.975)
		)
	)
	(wire
		(pts
			(xy 30.48 172.085) (xy 36.83 172.085)
		)
	)
	(wire
		(pts
			(xy 34.925 37.465) (xy 35.56 37.465)
		)
	)
	(wire
		(pts
			(xy 113.665 86.36) (xy 113.665 87.63)
		)
	)
	(wire
		(pts
			(xy 184.785 46.355) (xy 186.055 46.355)
		)
	)
	(wire
		(pts
			(xy 38.735 47.625) (xy 38.735 54.61)
		)
	)
	(wire
		(pts
			(xy 53.975 50.165) (xy 57.785 50.165)
		)
	)
	(wire
		(pts
			(xy 142.875 57.15) (xy 144.145 57.15)
		)
	)
	(wire
		(pts
			(xy 48.895 149.86) (xy 48.895 163.83)
		)
	)
	(wire
		(pts
			(xy 59.69 147.32) (xy 59.69 149.86)
		)
	)
	(wire
		(pts
			(xy 30.48 163.83) (xy 30.48 166.37)
		)
	)
	(wire
		(pts
			(xy 48.895 149.86) (xy 50.8 149.86)
		)
	)
	(wire
		(pts
			(xy 231.775 64.77) (xy 233.68 64.77)
		)
	)
	(wire
		(pts
			(xy 100.965 64.77) (xy 100.965 67.31)
		)
	)
	(wire
		(pts
			(xy 99.06 46.99) (xy 100.965 46.99)
		)
	)
	(wire
		(pts
			(xy 184.785 40.64) (xy 186.055 40.64)
		)
	)
	(wire
		(pts
			(xy 243.84 155.575) (xy 243.84 156.845)
		)
	)
	(wire
		(pts
			(xy 254 142.24) (xy 257.175 142.24)
		)
	)
	(wire
		(pts
			(xy 46.99 37.465) (xy 44.45 37.465)
		)
	)
	(wire
		(pts
			(xy 113.665 31.75) (xy 113.665 34.29)
		)
	)
	(wire
		(pts
			(xy 142.875 74.93) (xy 144.78 74.93)
		)
	)
	(wire
		(pts
			(xy 51.435 40.005) (xy 59.69 40.005)
		)
	)
	(polyline
		(pts
			(xy 10.795 62.865) (xy 88.9 62.865)
		)
	)
	(wire
		(pts
			(xy 100.965 86.36) (xy 108.585 86.36)
		)
	)
	(polyline
		(pts
			(xy 90.17 12.065) (xy 90.17 198.12)
		)
	)
	(wire
		(pts
			(xy 142.875 59.69) (xy 144.145 59.69)
		)
	)
	(wire
		(pts
			(xy 57.785 55.245) (xy 59.69 55.245)
		)
	)
	(wire
		(pts
			(xy 183.515 92.71) (xy 185.42 92.71)
		)
	)
	(wire
		(pts
			(xy 104.775 173.99) (xy 104.775 180.975)
		)
	)
	(wire
		(pts
			(xy 36.83 54.61) (xy 38.735 54.61)
		)
	)
	(wire
		(pts
			(xy 34.925 40.005) (xy 36.83 40.005)
		)
	)
	(wire
		(pts
			(xy 52.07 87.63) (xy 52.705 87.63)
		)
	)
	(wire
		(pts
			(xy 35.56 34.925) (xy 35.56 37.465)
		)
	)
	(wire
		(pts
			(xy 202.565 151.13) (xy 204.47 151.13)
		)
	)
	(wire
		(pts
			(xy 120.015 125.73) (xy 125.095 125.73)
		)
	)
	(wire
		(pts
			(xy 46.99 31.75) (xy 44.45 31.75)
		)
	)
	(wire
		(pts
			(xy 35.56 87.63) (xy 36.195 87.63)
		)
	)
	(wire
		(pts
			(xy 242.57 130.81) (xy 243.84 130.81)
		)
	)
	(wire
		(pts
			(xy 38.1 147.32) (xy 38.1 149.86)
		)
	)
	(wire
		(pts
			(xy 42.545 50.165) (xy 40.005 50.165)
		)
	)
	(wire
		(pts
			(xy 165.1 149.225) (xy 165.1 152.4)
		)
	)
	(wire
		(pts
			(xy 202.565 153.67) (xy 204.47 153.67)
		)
	)
	(wire
		(pts
			(xy 43.18 139.7) (xy 48.895 139.7)
		)
	)
	(wire
		(pts
			(xy 44.45 31.75) (xy 44.45 32.385)
		)
	)
	(wire
		(pts
			(xy 73.66 139.7) (xy 73.66 141.605)
		)
	)
	(wire
		(pts
			(xy 104.775 159.385) (xy 104.775 162.56)
		)
	)
	(wire
		(pts
			(xy 54.61 37.465) (xy 54.61 36.195)
		)
	)
	(wire
		(pts
			(xy 100.965 52.07) (xy 100.965 54.61)
		)
	)
	(wire
		(pts
			(xy 60.96 87.63) (xy 60.96 83.82)
		)
	)
	(wire
		(pts
			(xy 121.285 31.75) (xy 121.285 34.29)
		)
	)
	(wire
		(pts
			(xy 231.775 62.23) (xy 233.68 62.23)
		)
	)
	(wire
		(pts
			(xy 116.205 31.75) (xy 116.205 34.29)
		)
	)
	(wire
		(pts
			(xy 35.56 37.465) (xy 36.83 37.465)
		)
	)
	(wire
		(pts
			(xy 46.355 149.86) (xy 48.895 149.86)
		)
	)
	(wire
		(pts
			(xy 48.895 163.83) (xy 50.165 163.83)
		)
	)
	(wire
		(pts
			(xy 242.57 155.575) (xy 243.84 155.575)
		)
	)
	(wire
		(pts
			(xy 112.395 166.37) (xy 112.395 168.91)
		)
	)
	(wire
		(pts
			(xy 184.785 57.15) (xy 186.055 57.15)
		)
	)
	(wire
		(pts
			(xy 183.515 90.17) (xy 185.42 90.17)
		)
	)
	(wire
		(pts
			(xy 128.905 86.36) (xy 128.905 88.265)
		)
	)
	(wire
		(pts
			(xy 136.525 87.63) (xy 137.16 87.63)
		)
	)
	(wire
		(pts
			(xy 136.525 92.71) (xy 136.525 93.98)
		)
	)
	(wire
		(pts
			(xy 48.895 32.385) (xy 48.895 31.75)
		)
	)
	(wire
		(pts
			(xy 67.945 172.085) (xy 60.325 172.085)
		)
	)
	(wire
		(pts
			(xy 48.895 40.005) (xy 51.435 40.005)
		)
	)
	(wire
		(pts
			(xy 30.48 139.7) (xy 33.02 139.7)
		)
	)
	(wire
		(pts
			(xy 67.945 163.83) (xy 67.945 139.7)
		)
	)
	(wire
		(pts
			(xy 49.53 94.615) (xy 52.705 94.615)
		)
	)
	(wire
		(pts
			(xy 184.785 52.07) (xy 186.055 52.07)
		)
	)
	(wire
		(pts
			(xy 123.825 31.75) (xy 123.825 34.29)
		)
	)
	(wire
		(pts
			(xy 108.585 31.75) (xy 108.585 34.29)
		)
	)
	(wire
		(pts
			(xy 100.965 72.39) (xy 100.965 74.93)
		)
	)
	(wire
		(pts
			(xy 157.48 157.48) (xy 156.21 157.48)
		)
	)
	(wire
		(pts
			(xy 101.6 180.34) (xy 101.6 180.975)
		)
	)
	(wire
		(pts
			(xy 53.975 45.085) (xy 59.69 45.085)
		)
	)
	(wire
		(pts
			(xy 40.005 50.165) (xy 40.005 45.085)
		)
	)
	(wire
		(pts
			(xy 38.735 54.61) (xy 38.735 55.245)
		)
	)
	(wire
		(pts
			(xy 100.965 46.99) (xy 100.965 49.53)
		)
	)
	(wire
		(pts
			(xy 100.965 59.69) (xy 100.965 62.23)
		)
	)
	(wire
		(pts
			(xy 111.125 86.36) (xy 111.125 87.63)
		)
	)
	(wire
		(pts
			(xy 100.965 69.85) (xy 100.965 72.39)
		)
	)
	(wire
		(pts
			(xy 231.775 46.99) (xy 233.68 46.99)
		)
	)
	(wire
		(pts
			(xy 242.57 142.24) (xy 243.84 142.24)
		)
	)
	(wire
		(pts
			(xy 104.775 162.56) (xy 106.045 162.56)
		)
	)
	(polyline
		(pts
			(xy 158.115 103.505) (xy 158.115 12.065)
		)
	)
	(wire
		(pts
			(xy 59.69 37.465) (xy 54.61 37.465)
		)
	)
	(polyline
		(pts
			(xy 91.44 137.16) (xy 215.9 137.16)
		)
	)
	(wire
		(pts
			(xy 54.61 36.195) (xy 46.99 36.195)
		)
	)
	(polyline
		(pts
			(xy 215.265 66.04) (xy 158.115 66.04)
		)
	)
	(wire
		(pts
			(xy 47.625 45.085) (xy 51.435 45.085)
		)
	)
	(wire
		(pts
			(xy 104.775 166.37) (xy 104.775 168.91)
		)
	)
	(wire
		(pts
			(xy 50.8 83.82) (xy 54.61 83.82)
		)
	)
	(wire
		(pts
			(xy 231.775 68.58) (xy 233.68 68.58)
		)
	)
	(wire
		(pts
			(xy 100.965 49.53) (xy 100.965 52.07)
		)
	)
	(wire
		(pts
			(xy 67.945 171.45) (xy 67.945 172.085)
		)
	)
	(wire
		(pts
			(xy 184.785 43.815) (xy 186.055 43.815)
		)
	)
	(polyline
		(pts
			(xy 90.17 177.8) (xy 12.7 177.8)
		)
	)
	(wire
		(pts
			(xy 52.705 87.63) (xy 57.15 87.63)
		)
	)
	(wire
		(pts
			(xy 51.435 45.085) (xy 53.975 45.085)
		)
	)
	(wire
		(pts
			(xy 142.875 46.99) (xy 144.145 46.99)
		)
	)
	(wire
		(pts
			(xy 136.525 92.71) (xy 137.16 92.71)
		)
	)
	(wire
		(pts
			(xy 60.96 90.17) (xy 60.96 87.63)
		)
	)
	(polyline
		(pts
			(xy 158.115 137.16) (xy 158.115 103.505)
		)
	)
	(wire
		(pts
			(xy 181.61 125.73) (xy 183.515 125.73)
		)
	)
	(wire
		(pts
			(xy 43.815 87.63) (xy 46.99 87.63)
		)
	)
	(wire
		(pts
			(xy 165.1 162.56) (xy 165.1 165.735)
		)
	)
	(wire
		(pts
			(xy 52.705 93.98) (xy 52.705 94.615)
		)
	)
	(wire
		(pts
			(xy 156.21 157.48) (xy 156.21 158.75)
		)
	)
	(wire
		(pts
			(xy 126.365 86.36) (xy 126.365 87.63)
		)
	)
	(wire
		(pts
			(xy 104.775 162.56) (xy 104.775 166.37)
		)
	)
	(wire
		(pts
			(xy 60.325 172.085) (xy 57.15 172.085)
		)
	)
	(wire
		(pts
			(xy 116.205 86.36) (xy 116.205 87.63)
		)
	)
	(wire
		(pts
			(xy 111.125 31.75) (xy 111.125 34.29)
		)
	)
	(wire
		(pts
			(xy 231.775 71.12) (xy 233.68 71.12)
		)
	)
	(wire
		(pts
			(xy 36.83 171.45) (xy 36.83 172.085)
		)
	)
	(wire
		(pts
			(xy 65.405 163.83) (xy 67.945 163.83)
		)
	)
	(wire
		(pts
			(xy 142.875 69.85) (xy 144.145 69.85)
		)
	)
	(polyline
		(pts
			(xy 90.805 103.505) (xy 215.9 103.505)
		)
	)
	(wire
		(pts
			(xy 100.965 67.31) (xy 100.965 69.85)
		)
	)
	(wire
		(pts
			(xy 149.225 165.735) (xy 150.495 165.735)
		)
	)
	(wire
		(pts
			(xy 73.66 146.685) (xy 73.66 149.225)
		)
	)
	(wire
		(pts
			(xy 41.275 42.545) (xy 41.275 45.085)
		)
	)
	(wire
		(pts
			(xy 27.94 139.7) (xy 30.48 139.7)
		)
	)
	(wire
		(pts
			(xy 235.585 142.24) (xy 237.49 142.24)
		)
	)
	(wire
		(pts
			(xy 69.85 139.7) (xy 73.66 139.7)
		)
	)
	(wire
		(pts
			(xy 142.875 64.77) (xy 144.145 64.77)
		)
	)
	(wire
		(pts
			(xy 104.775 166.37) (xy 106.045 166.37)
		)
	)
	(wire
		(pts
			(xy 57.15 87.63) (xy 57.15 88.9)
		)
	)
	(wire
		(pts
			(xy 57.15 94.615) (xy 57.15 93.98)
		)
	)
	(polyline
		(pts
			(xy 215.265 111.76) (xy 284.48 111.76)
		)
	)
	(wire
		(pts
			(xy 136.525 31.75) (xy 136.525 34.29)
		)
	)
	(wire
		(pts
			(xy 184.785 49.53) (xy 186.055 49.53)
		)
	)
	(wire
		(pts
			(xy 231.775 44.45) (xy 233.68 44.45)
		)
	)
	(wire
		(pts
			(xy 120.015 125.73) (xy 120.015 119.38)
		)
	)
	(wire
		(pts
			(xy 142.875 72.39) (xy 144.145 72.39)
		)
	)
	(wire
		(pts
			(xy 59.69 149.86) (xy 55.88 149.86)
		)
	)
	(wire
		(pts
			(xy 133.985 86.36) (xy 133.985 88.265)
		)
	)
	(wire
		(pts
			(xy 59.69 149.86) (xy 65.405 149.86)
		)
	)
	(wire
		(pts
			(xy 46.99 163.83) (xy 48.895 163.83)
		)
	)
	(wire
		(pts
			(xy 142.875 52.07) (xy 144.145 52.07)
		)
	)
	(wire
		(pts
			(xy 136.525 86.36) (xy 136.525 87.63)
		)
	)
	(wire
		(pts
			(xy 235.585 155.575) (xy 237.49 155.575)
		)
	)
	(wire
		(pts
			(xy 142.875 49.53) (xy 144.145 49.53)
		)
	)
	(wire
		(pts
			(xy 34.925 47.625) (xy 38.735 47.625)
		)
	)
	(wire
		(pts
			(xy 254 155.575) (xy 257.175 155.575)
		)
	)
	(wire
		(pts
			(xy 33.655 149.86) (xy 38.1 149.86)
		)
	)
	(wire
		(pts
			(xy 48.895 163.83) (xy 48.895 166.37)
		)
	)
	(wire
		(pts
			(xy 231.775 55.88) (xy 233.68 55.88)
		)
	)
	(wire
		(pts
			(xy 126.365 31.75) (xy 126.365 34.29)
		)
	)
	(polyline
		(pts
			(xy 215.9 13.335) (xy 215.9 165.735)
		)
	)
	(wire
		(pts
			(xy 60.96 83.82) (xy 59.69 83.82)
		)
	)
	(wire
		(pts
			(xy 52.705 94.615) (xy 57.15 94.615)
		)
	)
	(wire
		(pts
			(xy 121.285 86.36) (xy 121.285 87.63)
		)
	)
	(wire
		(pts
			(xy 48.895 40.005) (xy 41.91 40.005)
		)
	)
	(wire
		(pts
			(xy 30.48 139.7) (xy 30.48 163.83)
		)
	)
	(wire
		(pts
			(xy 100.965 54.61) (xy 100.965 57.15)
		)
	)
	(wire
		(pts
			(xy 133.985 34.29) (xy 133.985 33.02)
		)
	)
	(wire
		(pts
			(xy 34.925 45.085) (xy 40.005 45.085)
		)
	)
	(wire
		(pts
			(xy 67.945 139.7) (xy 69.85 139.7)
		)
	)
	(wire
		(pts
			(xy 48.895 139.7) (xy 48.895 149.86)
		)
	)
	(wire
		(pts
			(xy 101.6 180.975) (xy 104.775 180.975)
		)
	)
	(polyline
		(pts
			(xy 130.81 197.485) (xy 130.81 137.16)
		)
	)
	(wire
		(pts
			(xy 49.53 93.345) (xy 49.53 94.615)
		)
	)
	(wire
		(pts
			(xy 184.785 54.61) (xy 186.055 54.61)
		)
	)
	(wire
		(pts
			(xy 38.1 149.86) (xy 41.275 149.86)
		)
	)
	(wire
		(pts
			(xy 52.705 87.63) (xy 52.705 88.9)
		)
	)
	(wire
		(pts
			(xy 240.03 96.52) (xy 240.03 99.695)
		)
	)
	(wire
		(pts
			(xy 131.445 86.36) (xy 131.445 88.265)
		)
	)
	(wire
		(pts
			(xy 149.225 157.48) (xy 156.21 157.48)
		)
	)
	(wire
		(pts
			(xy 64.77 139.7) (xy 67.945 139.7)
		)
	)
	(wire
		(pts
			(xy 150.495 165.735) (xy 165.1 165.735)
		)
	)
	(wire
		(pts
			(xy 243.84 142.24) (xy 243.84 143.51)
		)
	)
	(wire
		(pts
			(xy 57.15 87.63) (xy 60.96 87.63)
		)
	)
	(wire
		(pts
			(xy 231.775 52.07) (xy 233.68 52.07)
		)
	)
	(wire
		(pts
			(xy 67.945 163.83) (xy 67.945 166.37)
		)
	)
	(wire
		(pts
			(xy 150.495 176.53) (xy 150.495 177.8)
		)
	)
	(wire
		(pts
			(xy 46.99 27.94) (xy 46.99 31.75)
		)
	)
	(wire
		(pts
			(xy 111.125 166.37) (xy 112.395 166.37)
		)
	)
	(wire
		(pts
			(xy 36.83 172.085) (xy 39.37 172.085)
		)
	)
	(wire
		(pts
			(xy 111.125 162.56) (xy 112.395 162.56)
		)
	)
	(wire
		(pts
			(xy 48.895 37.465) (xy 48.895 40.005)
		)
	)
	(wire
		(pts
			(xy 47.625 55.245) (xy 57.785 55.245)
		)
	)
	(wire
		(pts
			(xy 202.565 148.59) (xy 204.47 148.59)
		)
	)
	(wire
		(pts
			(xy 60.325 171.45) (xy 60.325 172.085)
		)
	)
	(wire
		(pts
			(xy 131.445 31.75) (xy 131.445 34.29)
		)
	)
	(wire
		(pts
			(xy 47.625 50.165) (xy 53.975 50.165)
		)
	)
	(wire
		(pts
			(xy 113.665 180.34) (xy 113.665 180.975)
		)
	)
	(wire
		(pts
			(xy 231.775 49.53) (xy 233.68 49.53)
		)
	)
	(wire
		(pts
			(xy 118.745 86.36) (xy 118.745 93.98)
		)
	)
	(wire
		(pts
			(xy 41.275 45.085) (xy 42.545 45.085)
		)
	)
	(wire
		(pts
			(xy 112.395 159.385) (xy 112.395 162.56)
		)
	)
	(wire
		(pts
			(xy 46.99 36.195) (xy 46.99 37.465)
		)
	)
	(wire
		(pts
			(xy 41.91 37.465) (xy 44.45 37.465)
		)
	)
	(wire
		(pts
			(xy 112.395 173.99) (xy 112.395 180.975)
		)
	)
	(wire
		(pts
			(xy 73.66 139.7) (xy 77.47 139.7)
		)
	)
	(wire
		(pts
			(xy 150.495 165.735) (xy 150.495 171.45)
		)
	)
	(wire
		(pts
			(xy 254 96.52) (xy 254 99.695)
		)
	)
	(wire
		(pts
			(xy 113.665 180.975) (xy 112.395 180.975)
		)
	)
	(wire
		(pts
			(xy 31.75 163.83) (xy 30.48 163.83)
		)
	)
	(wire
		(pts
			(xy 100.965 62.23) (xy 100.965 64.77)
		)
	)
	(wire
		(pts
			(xy 112.395 162.56) (xy 112.395 166.37)
		)
	)
	(wire
		(pts
			(xy 112.395 180.975) (xy 111.125 180.975)
		)
	)
	(wire
		(pts
			(xy 69.85 139.7) (xy 69.85 141.605)
		)
	)
	(wire
		(pts
			(xy 57.785 50.165) (xy 59.69 50.165)
		)
	)
	(wire
		(pts
			(xy 48.895 139.7) (xy 54.61 139.7)
		)
	)
	(wire
		(pts
			(xy 181.61 128.27) (xy 183.515 128.27)
		)
	)
	(wire
		(pts
			(xy 30.48 171.45) (xy 30.48 172.085)
		)
	)
	(wire
		(pts
			(xy 184.785 38.1) (xy 186.055 38.1)
		)
	)
	(wire
		(pts
			(xy 202.565 156.21) (xy 204.47 156.21)
		)
	)
	(wire
		(pts
			(xy 69.85 146.685) (xy 69.85 149.225)
		)
	)
	(wire
		(pts
			(xy 100.965 74.93) (xy 100.965 86.36)
		)
	)
	(wire
		(pts
			(xy 128.905 31.75) (xy 128.905 34.29)
		)
	)
	(polyline
		(pts
			(xy 177.8 165.735) (xy 177.8 137.16)
		)
	)
	(wire
		(pts
			(xy 48.895 31.75) (xy 46.99 31.75)
		)
	)
	(wire
		(pts
			(xy 34.925 42.545) (xy 41.275 42.545)
		)
	)
	(wire
		(pts
			(xy 251.46 96.52) (xy 251.46 98.425)
		)
	)
	(wire
		(pts
			(xy 156.21 163.83) (xy 156.21 165.1)
		)
	)
	(wire
		(pts
			(xy 242.57 96.52) (xy 242.57 99.695)
		)
	)
	(polyline
		(pts
			(xy 12.065 112.395) (xy 90.17 112.395)
		)
	)
	(wire
		(pts
			(xy 241.3 130.81) (xy 242.57 130.81)
		)
	)
	(wire
		(pts
			(xy 254 130.81) (xy 257.175 130.81)
		)
	)
	(wire
		(pts
			(xy 231.775 58.42) (xy 233.68 58.42)
		)
	)
	(wire
		(pts
			(xy 242.57 130.81) (xy 242.57 132.08)
		)
	)
	(wire
		(pts
			(xy 142.875 62.23) (xy 144.145 62.23)
		)
	)
	(global_label "REGIN"
		(shape input)
		(at 149.225 165.735 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 142.4461 165.735 0)
		)
	)
	(global_label "SDA"
		(shape input)
		(at 144.145 69.85 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 149.3048 69.85 0)
		)
	)
	(global_label "btn1"
		(shape input)
		(at 231.775 44.45 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 226.0913 44.45 0)
		)
	)
	(global_label "T2"
		(shape input)
		(at 131.445 88.265 270)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 131.445 92.3296 90)
		)
	)
	(global_label "Bat-"
		(shape input)
		(at 101.6 180.34 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 101.6 174.2754 90)
		)
	)
	(global_label "BREG"
		(shape input)
		(at 136.525 31.75 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 136.525 25.4949 90)
		)
	)
	(global_label "PDSG"
		(shape input)
		(at 65.405 149.86 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 65.405 143.5573 90)
		)
	)
	(global_label "LD"
		(shape input)
		(at 126.365 31.75 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 126.365 27.5902 90)
		)
	)
	(global_label "Pack+"
		(shape input)
		(at 77.47 139.7 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 84.6298 139.7 0)
		)
	)
	(global_label "Cfetoff"
		(shape input)
		(at 231.775 64.77 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 224.3772 64.77 0)
		)
	)
	(global_label "CP1"
		(shape input)
		(at 113.665 31.75 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 113.665 26.4473 90)
		)
	)
	(global_label "Cfetoff"
		(shape input)
		(at 144.145 64.77 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 151.5428 64.77 0)
		)
	)
	(global_label "RegSW"
		(shape input)
		(at 165.1 149.225 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 165.1 142.0175 90)
		)
	)
	(global_label "PCHG"
		(shape input)
		(at 128.905 31.75 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 128.905 25.3521 90)
		)
	)
	(global_label "CHG"
		(shape input)
		(at 39.37 172.085 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 44.7679 172.085 0)
		)
	)
	(global_label "SCL"
		(shape input)
		(at 204.47 153.67 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 209.5822 153.67 0)
		)
	)
	(global_label "PACK"
		(shape input)
		(at 123.825 31.75 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 123.825 25.5426 90)
		)
	)
	(global_label "Pack+"
		(shape input)
		(at 183.515 125.73 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 190.6748 125.73 0)
		)
	)
	(global_label "DDSG"
		(shape input)
		(at 144.145 57.15 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 150.4477 57.15 0)
		)
	)
	(global_label "T2"
		(shape input)
		(at 186.055 43.815 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 190.1196 43.815 0)
		)
	)
	(global_label "RST_Shut"
		(shape input)
		(at 144.145 54.61 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 153.3049 54.61 0)
		)
	)
	(global_label "vss"
		(shape input)
		(at 49.53 93.345 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 49.53 88.6138 90)
		)
	)
	(global_label "Bat+"
		(shape input)
		(at 35.56 87.63 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 29.4954 87.63 0)
		)
	)
	(global_label "CHG"
		(shape input)
		(at 116.205 31.75 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 116.205 26.3521 90)
		)
	)
	(global_label "T1"
		(shape input)
		(at 128.905 88.265 270)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 128.905 92.3296 90)
		)
	)
	(global_label "REG1_5.0V"
		(shape input)
		(at 144.145 49.53 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 154.3525 49.53 0)
		)
	)
	(global_label "VC16"
		(shape input)
		(at 108.585 31.75 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 108.585 25.6378 90)
		)
	)
	(global_label "VC15"
		(shape input)
		(at 99.06 46.99 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 92.9478 46.99 0)
		)
	)
	(global_label "btn3"
		(shape input)
		(at 243.84 156.845 270)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 243.84 162.5287 90)
		)
	)
	(global_label "LD"
		(shape input)
		(at 73.66 149.225 270)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 73.66 153.3848 90)
		)
	)
	(global_label "T4"
		(shape input)
		(at 144.78 74.93 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 148.8446 74.93 0)
		)
	)
	(global_label "DSG"
		(shape input)
		(at 121.285 31.75 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 121.285 26.4473 90)
		)
	)
	(global_label "SRP"
		(shape input)
		(at 112.395 159.385 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 112.395 154.0823 90)
		)
	)
	(global_label "SDA"
		(shape input)
		(at 231.775 71.12 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 226.6152 71.12 0)
		)
	)
	(global_label "RegSW"
		(shape input)
		(at 48.895 166.37 270)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 48.895 173.5775 90)
		)
	)
	(global_label "PACK"
		(shape input)
		(at 69.85 149.225 270)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 69.85 155.4324 90)
		)
	)
	(global_label "VC0"
		(shape input)
		(at 59.69 37.465 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 64.8498 37.465 0)
		)
	)
	(global_label "Pgnd"
		(shape input)
		(at 183.515 128.27 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 189.5797 128.27 0)
		)
	)
	(global_label "DCHG"
		(shape input)
		(at 231.775 58.42 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 225.3771 58.42 0)
		)
	)
	(global_label "DCHG"
		(shape input)
		(at 144.145 59.69 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 150.5429 59.69 0)
		)
	)
	(global_label "RST_Shut"
		(shape input)
		(at 231.775 52.07 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 222.6151 52.07 0)
		)
	)
	(global_label "BREG"
		(shape input)
		(at 149.225 157.48 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 142.9699 157.48 0)
		)
	)
	(global_label "REG2_3.3V"
		(shape input)
		(at 185.42 90.17 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 195.6275 90.17 0)
		)
	)
	(global_label "SRN"
		(shape input)
		(at 104.775 159.385 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 104.775 154.0347 90)
		)
	)
	(global_label "Dfetoff"
		(shape input)
		(at 144.145 62.23 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 151.5428 62.23 0)
		)
	)
	(global_label "Dfetoff"
		(shape input)
		(at 231.775 62.23 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 224.3772 62.23 0)
		)
	)
	(global_label "SRN"
		(shape input)
		(at 121.285 87.63 270)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 121.285 92.9803 90)
		)
	)
	(global_label "Bat-"
		(shape input)
		(at 35.56 34.925 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 35.56 28.8604 90)
		)
	)
	(global_label "SCL"
		(shape input)
		(at 144.145 72.39 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 149.2572 72.39 0)
		)
	)
	(global_label "T3"
		(shape input)
		(at 133.985 88.265 270)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 133.985 92.3296 90)
		)
	)
	(global_label "SRP"
		(shape input)
		(at 126.365 87.63 270)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 126.365 92.9327 90)
		)
	)
	(global_label "btn3"
		(shape input)
		(at 231.775 49.53 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 226.0913 49.53 0)
		)
	)
	(global_label "VC2"
		(shape input)
		(at 111.125 87.63 270)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 111.125 92.7898 90)
		)
	)
	(global_label "btn2"
		(shape input)
		(at 243.84 143.51 270)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 243.84 149.1937 90)
		)
	)
	(global_label "Bat-"
		(shape input)
		(at 125.095 125.73 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 131.1596 125.73 0)
		)
	)
	(global_label "PDSG"
		(shape input)
		(at 131.445 31.75 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 131.445 25.4473 90)
		)
	)
	(global_label "REGIN"
		(shape input)
		(at 144.145 46.99 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 150.9239 46.99 0)
		)
	)
	(global_label "VC15"
		(shape input)
		(at 59.69 50.165 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 65.8022 50.165 0)
		)
	)
	(global_label "Pgnd"
		(shape input)
		(at 113.665 180.34 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 113.665 174.2753 90)
		)
	)
	(global_label "CP1"
		(shape input)
		(at 50.8 83.82 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 45.4973 83.82 0)
		)
	)
	(global_label "REG2_3.3V"
		(shape input)
		(at 144.145 52.07 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 154.3525 52.07 0)
		)
	)
	(global_label "btn1"
		(shape input)
		(at 242.57 132.08 270)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 242.57 137.7637 90)
		)
	)
	(global_label "PCHG"
		(shape input)
		(at 33.655 149.86 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 33.655 143.4621 90)
		)
	)
	(global_label "SCL"
		(shape input)
		(at 231.775 68.58 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 226.6628 68.58 0)
		)
	)
	(global_label "Bat_IC"
		(shape input)
		(at 111.125 31.75 90)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 111.125 24.6854 90)
		)
	)
	(global_label "SDA"
		(shape input)
		(at 204.47 156.21 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 209.6298 156.21 0)
		)
	)
	(global_label "Bat_IC"
		(shape input)
		(at 60.96 90.17 270)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 60.96 97.2346 90)
		)
	)
	(global_label "VC1"
		(shape input)
		(at 113.665 87.63 270)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 113.665 92.7898 90)
		)
	)
	(global_label "DDSG"
		(shape input)
		(at 231.775 55.88 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 225.4723 55.88 0)
		)
	)
	(global_label "btn2"
		(shape input)
		(at 231.775 46.99 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 226.0913 46.99 0)
		)
	)
	(global_label "T3"
		(shape input)
		(at 186.055 49.53 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 190.1196 49.53 0)
		)
	)
	(global_label "VC16"
		(shape input)
		(at 59.69 55.245 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 65.8022 55.245 0)
		)
	)
	(global_label "VC0"
		(shape input)
		(at 116.205 87.63 270)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 116.205 92.7898 90)
		)
	)
	(global_label "VC1"
		(shape input)
		(at 59.69 40.005 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 64.8498 40.005 0)
		)
	)
	(global_label "T1"
		(shape input)
		(at 186.055 38.1 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 190.1196 38.1 0)
		)
	)
	(global_label "VC2"
		(shape input)
		(at 59.69 45.085 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 64.8498 45.085 0)
		)
	)
	(global_label "REG1_5.0V"
		(shape input)
		(at 251.46 98.425 270)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 251.46 108.6325 90)
		)
	)
	(global_label "Bat+"
		(shape input)
		(at 27.94 139.7 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 21.8754 139.7 0)
		)
	)
	(global_label "Bat+"
		(shape input)
		(at 36.83 54.61 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 30.7654 54.61 0)
		)
	)
	(global_label "T4"
		(shape input)
		(at 186.055 54.61 0)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 190.1196 54.61 0)
		)
	)
	(global_label "DSG"
		(shape input)
		(at 57.15 172.085 180)
		(fields_autoplaced yes)
		(property "Intersheetrefs" "${INTERSHEET_REFS}"
			(at 51.8473 172.085 0)
		)
	)
	(symbol
		(lib_id "Connector:Conn_01x02_Socket")
		(at 179.705 49.53 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "J4"
			(at 178.435 50.8 0)
		)
		(property "Value" "Conn_01x02_Socket"
			(at 180.34 46.99 0)
		)
		(property "Footprint" "Connector_JST:JST_XH_B2B-XH-A_1x02_P2.50mm_Vertical"
			(at 179.705 49.53 0)
		)
		(property "Datasheet" "~"
			(at 179.705 49.53 0)
		)
		(property "Description" ""
			(at 179.705 49.53 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "J4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "SamacSys_Parts:BQ76952PFBR")
		(at 100.965 45.72 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "IC1"
			(at 140.335 43.18 0)
		)
		(property "Value" "BQ76952PFBR"
			(at 145.415 83.185 0)
		)
		(property "Footprint" "QFP50P900X900X120-48N"
			(at 140.335 133.02 0)
		)
		(property "Datasheet" "https://www.ti.com/lit/ds/symlink/bq76952.pdf?ts=1602524050348&ref_url=https%253A%252F%252Fwww.ti.com%252Fproduct%252FBQ76952%253FkeyMatch%253DBQ76952PFBR%2526tisearch%253DSearch-EN-everything%2526usecase%253DOPN"
			(at 140.335 233.02 0)
		)
		(property "Description" ""
			(at 100.965 45.72 0)
		)
		(property "Height" "1.2"
			(at 140.335 433.02 0)
		)
		(property "Manufacturer_Name" "Texas Instruments"
			(at 140.335 533.02 0)
		)
		(property "Manufacturer_Part_Number" "BQ76952PFBR"
			(at 140.335 633.02 0)
		)
		(property "Mouser Part Number" "595-BQ76952PFBR"
			(at 140.335 733.02 0)
		)
		(property "Mouser Price/Stock" "https://www.mouser.co.uk/ProductDetail/Texas-Instruments/BQ76952PFBR?qs=zW32dvEIR3tYeZDtcUwdQA%3D%3D"
			(at 140.335 833.02 0)
		)
		(property "Arrow Part Number" "BQ76952PFBR"
			(at 140.335 933.02 0)
		)
		(property "Arrow Price/Stock" "null?region=nac"
			(at 140.335 1033.02 0)
		)
		(pin "16")
		(pin "34")
		(pin "41")
		(pin "43")
		(pin "8")
		(pin "2")
		(pin "36")
		(pin "4")
		(pin "40")
		(pin "28")
		(pin "44")
		(pin "10")
		(pin "5")
		(pin "47")
		(pin "21")
		(pin "9")
		(pin "37")
		(pin "38")
		(pin "45")
		(pin "35")
		(pin "30")
		(pin "39")
		(pin "22")
		(pin "17")
		(pin "27")
		(pin "31")
		(pin "13")
		(pin "25")
		(pin "26")
		(pin "29")
		(pin "33")
		(pin "42")
		(pin "15")
		(pin "46")
		(pin "19")
		(pin "48")
		(pin "3")
		(pin "6")
		(pin "20")
		(pin "1")
		(pin "23")
		(pin "32")
		(pin "7")
		(pin "18")
		(pin "14")
		(pin "24")
		(pin "12")
		(pin "11")
		(instances
			(project "BMS1.0"
				(path
					(reference "IC1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 150.495 173.99 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C12"
			(at 149.225 168.275 90)
		)
		(property "Value" "10uf"
			(at 151.765 168.275 90)
		)
		(property "Footprint" "Nut FootPrint files:C_1806_4516Metric"
			(at 150.495 173.99 0)
		)
		(property "Datasheet" "~"
			(at 150.495 173.99 0)
		)
		(property "Description" ""
			(at 150.495 173.99 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "C12")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 57.785 52.705 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C5"
			(at 57.15 46.99 90)
		)
		(property "Value" "0.22uf"
			(at 59.055 46.99 90)
		)
		(property "Footprint" "Nut FootPrint files:C_1806_4516Metric"
			(at 57.785 52.705 0)
		)
		(property "Datasheet" "~"
			(at 57.785 52.705 0)
		)
		(property "Description" ""
			(at 57.785 52.705 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "C5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:Conn_01x02_Socket")
		(at 176.53 125.73 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "J7"
			(at 174.625 127 0)
		)
		(property "Value" "Conn_01x02_Socket"
			(at 177.165 123.19 0)
		)
		(property "Footprint" "Nut FootPrint files:SCREWTERMINAL-5MM-2"
			(at 176.53 125.73 0)
		)
		(property "Datasheet" "~"
			(at 176.53 125.73 0)
		)
		(property "Description" ""
			(at 176.53 125.73 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "J7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 108.585 166.37 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C11"
			(at 110.49 165.1 90)
		)
		(property "Value" "0.1uf"
			(at 102.87 165.1 90)
		)
		(property "Footprint" "Nut FootPrint files:C_1806_4516Metric"
			(at 108.585 166.37 0)
		)
		(property "Datasheet" "~"
			(at 108.585 166.37 0)
		)
		(property "Description" ""
			(at 108.585 166.37 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "C11")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Transistor_FET:IRLZ34N")
		(at 59.69 142.24 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "Q2"
			(at 59.69 132.715 90)
		)
		(property "Value" "IRLZ34N"
			(at 59.69 135.255 90)
		)
		(property "Footprint" "Package_TO_SOT_THT:TO-220-3_Horizontal_TabDown"
			(at 61.595 137.16 0)
		)
		(property "Datasheet" "http://www.infineon.com/dgdl/irlz34npbf.pdf?fileId=5546d462533600a40153567206892720"
			(at 63.5 137.16 0)
		)
		(property "Description" ""
			(at 59.69 142.24 0)
		)
		(pin "2")
		(pin "1")
		(pin "3")
		(instances
			(project "BMS1.0"
				(path
					(reference "Q2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 104.775 171.45 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R7"
			(at 103.505 173.99 90)
		)
		(property "Value" "100R"
			(at 103.505 168.91 90)
		)
		(property "Footprint" "Nut FootPrint files:R_1206_3216Metric_Pad1.42x1.75mm_HandSolder"
			(at 104.775 171.45 0)
		)
		(property "Datasheet" "~"
			(at 104.775 171.45 0)
		)
		(property "Description" ""
			(at 104.775 171.45 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "R7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 156.21 161.29 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R14"
			(at 154.94 163.83 90)
		)
		(property "Value" "20R"
			(at 154.94 158.75 90)
		)
		(property "Footprint" "Nut FootPrint files:R_1206_3216Metric_Pad1.42x1.75mm_HandSolder"
			(at 156.21 161.29 0)
		)
		(property "Datasheet" "~"
			(at 156.21 161.29 0)
		)
		(property "Description" ""
			(at 156.21 161.29 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "R14")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Switch:SW_Push")
		(at 248.92 155.575 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "SW3"
			(at 248.92 147.955 0)
		)
		(property "Value" "SW_Push"
			(at 248.92 150.495 0)
		)
		(property "Footprint" "Button_Switch_THT:SW_PUSH_6mm_H5mm"
			(at 248.92 150.495 0)
		)
		(property "Datasheet" "~"
			(at 248.92 150.495 0)
		)
		(property "Description" ""
			(at 248.92 155.575 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "SW3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 73.66 144.145 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R16"
			(at 74.93 141.605 90)
		)
		(property "Value" "10kR"
			(at 74.93 146.685 90)
		)
		(property "Footprint" "Nut FootPrint files:R_1206_3216Metric_Pad1.42x1.75mm_HandSolder"
			(at 73.66 144.145 0)
		)
		(property "Datasheet" "~"
			(at 73.66 144.145 0)
		)
		(property "Description" ""
			(at 73.66 144.145 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "R16")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 43.815 149.86 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R10"
			(at 41.275 148.59 90)
		)
		(property "Value" "10kR"
			(at 46.355 148.59 90)
		)
		(property "Footprint" "Nut FootPrint files:R_1206_3216Metric_Pad1.42x1.75mm_HandSolder"
			(at 43.815 149.86 0)
		)
		(property "Datasheet" "~"
			(at 43.815 149.86 0)
		)
		(property "Description" ""
			(at 43.815 149.86 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "R10")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 57.15 83.82 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C9"
			(at 59.055 82.55 90)
		)
		(property "Value" "0.47uf"
			(at 51.435 82.55 90)
		)
		(property "Footprint" "Nut FootPrint files:C_1806_4516Metric"
			(at 57.15 83.82 0)
		)
		(property "Datasheet" "~"
			(at 57.15 83.82 0)
		)
		(property "Description" ""
			(at 57.15 83.82 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "C9")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 240.03 155.575 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R19"
			(at 237.49 154.305 90)
		)
		(property "Value" "20R"
			(at 242.57 154.305 90)
		)
		(property "Footprint" "Nut FootPrint files:R_1206_3216Metric_Pad1.42x1.75mm_HandSolder"
			(at 240.03 155.575 0)
		)
		(property "Datasheet" "~"
			(at 240.03 155.575 0)
		)
		(property "Description" ""
			(at 240.03 155.575 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "R19")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VSS")
		(at 113.665 125.73 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR021"
			(at 113.665 121.92 0)
		)
		(property "Value" "VSS"
			(at 113.665 130.175 0)
		)
		(property "Footprint" ""
			(at 113.665 125.73 0)
		)
		(property "Datasheet" ""
			(at 113.665 125.73 0)
		)
		(property "Description" ""
			(at 113.665 125.73 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR021")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Mechanical:MountingHole")
		(at 53.34 188.595 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "H3"
			(at 55.88 187.325 0)
		)
		(property "Value" "MountingHole"
			(at 55.88 189.865 0)
		)
		(property "Footprint" "MountingHole:MountingHole_2.2mm_M2"
			(at 53.34 188.595 0)
		)
		(property "Datasheet" "~"
			(at 53.34 188.595 0)
		)
		(property "Description" ""
			(at 53.34 188.595 0)
		)
		(instances
			(project "BMS1.0"
				(path
					(reference "H3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3.3V")
		(at 235.585 155.575 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR020"
			(at 239.395 155.575 0)
		)
		(property "Value" "+3.3V"
			(at 232.41 153.67 90)
		)
		(property "Footprint" ""
			(at 235.585 155.575 0)
		)
		(property "Datasheet" ""
			(at 235.585 155.575 0)
		)
		(property "Description" ""
			(at 235.585 155.575 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR020")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 39.37 40.005 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R2"
			(at 36.83 38.735 90)
		)
		(property "Value" "20R"
			(at 41.91 38.735 90)
		)
		(property "Footprint" "Nut FootPrint files:R_1206_3216Metric_Pad1.42x1.75mm_HandSolder"
			(at 39.37 40.005 0)
		)
		(property "Datasheet" "~"
			(at 39.37 40.005 0)
		)
		(property "Description" ""
			(at 39.37 40.005 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "R2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3.3V")
		(at 240.03 99.695 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR017"
			(at 240.03 95.885 0)
		)
		(property "Value" "+3.3V"
			(at 238.125 102.87 90)
		)
		(property "Footprint" ""
			(at 240.03 99.695 0)
		)
		(property "Datasheet" ""
			(at 240.03 99.695 0)
		)
		(property "Description" ""
			(at 240.03 99.695 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR017")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 108.585 162.56 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C10"
			(at 110.49 161.29 90)
		)
		(property "Value" "100uf"
			(at 102.87 161.29 90)
		)
		(property "Footprint" "Nut FootPrint files:C_1806_4516Metric"
			(at 108.585 162.56 0)
		)
		(property "Datasheet" "~"
			(at 108.585 162.56 0)
		)
		(property "Description" ""
			(at 108.585 162.56 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "C10")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 120.015 119.38 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR022"
			(at 120.015 113.03 0)
		)
		(property "Value" "GND"
			(at 120.015 114.935 0)
		)
		(property "Footprint" ""
			(at 120.015 119.38 0)
		)
		(property "Datasheet" ""
			(at 120.015 119.38 0)
		)
		(property "Description" ""
			(at 120.015 119.38 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR022")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:Conn_01x02_Socket")
		(at 179.705 43.815 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "J3"
			(at 177.9349 45.4437 0)
		)
		(property "Value" "Conn_01x02_Socket"
			(at 180.34 41.275 0)
		)
		(property "Footprint" "Connector_JST:JST_XH_B2B-XH-A_1x02_P2.50mm_Vertical"
			(at 179.705 43.815 0)
		)
		(property "Datasheet" "~"
			(at 179.705 43.815 0)
		)
		(property "Description" ""
			(at 179.705 43.815 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "J3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VSS")
		(at 186.055 52.07 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05"
			(at 182.245 52.07 0)
		)
		(property "Value" "VSS"
			(at 189.865 52.07 90)
		)
		(property "Footprint" ""
			(at 186.055 52.07 0)
		)
		(property "Datasheet" ""
			(at 186.055 52.07 0)
		)
		(property "Description" ""
			(at 186.055 52.07 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR05")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 53.34 149.86 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R11"
			(at 50.8 148.59 90)
		)
		(property "Value" "10kR"
			(at 55.88 148.59 90)
		)
		(property "Footprint" "Nut FootPrint files:R_1206_3216Metric_Pad1.42x1.75mm_HandSolder"
			(at 53.34 149.86 0)
		)
		(property "Datasheet" "~"
			(at 53.34 149.86 0)
		)
		(property "Description" ""
			(at 53.34 149.86 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "R11")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 57.15 91.44 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C8"
			(at 57.785 97.155 90)
		)
		(property "Value" "100pf"
			(at 55.88 97.155 90)
		)
		(property "Footprint" "Nut FootPrint files:C_1806_4516Metric"
			(at 57.15 91.44 0)
		)
		(property "Datasheet" "~"
			(at 57.15 91.44 0)
		)
		(property "Description" ""
			(at 57.15 91.44 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "C8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:Conn_01x02_Socket")
		(at 179.705 38.1 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "J2"
			(at 177.8 39.37 0)
		)
		(property "Value" "Conn_01x02_Socket"
			(at 180.34 35.56 0)
		)
		(property "Footprint" "Connector_JST:JST_XH_B2B-XH-A_1x02_P2.50mm_Vertical"
			(at 179.705 38.1 0)
		)
		(property "Datasheet" "~"
			(at 179.705 38.1 0)
		)
		(property "Description" ""
			(at 179.705 38.1 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "J2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Mechanical:MountingHole")
		(at 71.12 188.595 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "H4"
			(at 73.66 187.325 0)
		)
		(property "Value" "MountingHole"
			(at 73.66 189.865 0)
		)
		(property "Footprint" "MountingHole:MountingHole_2.2mm_M2"
			(at 71.12 188.595 0)
		)
		(property "Datasheet" "~"
			(at 71.12 188.595 0)
		)
		(property "Description" ""
			(at 71.12 188.595 0)
		)
		(instances
			(project "BMS1.0"
				(path
					(reference "H4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 45.085 55.245 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R5"
			(at 42.545 53.975 90)
		)
		(property "Value" "20R"
			(at 47.625 53.975 90)
		)
		(property "Footprint" "Nut FootPrint files:R_1206_3216Metric_Pad1.42x1.75mm_HandSolder"
			(at 45.085 55.245 0)
		)
		(property "Datasheet" "~"
			(at 45.085 55.245 0)
		)
		(property "Description" ""
			(at 45.085 55.245 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "R5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 51.435 42.545 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C4"
			(at 50.8 36.83 90)
		)
		(property "Value" "0.22uf"
			(at 52.705 36.83 90)
		)
		(property "Footprint" "Nut FootPrint files:C_1806_4516Metric"
			(at 51.435 42.545 0)
		)
		(property "Datasheet" "~"
			(at 51.435 42.545 0)
		)
		(property "Description" ""
			(at 51.435 42.545 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "C4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VSS")
		(at 46.99 27.94 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR03"
			(at 46.99 31.75 0)
		)
		(property "Value" "VSS"
			(at 46.99 23.495 0)
		)
		(property "Footprint" ""
			(at 46.99 27.94 0)
		)
		(property "Datasheet" ""
			(at 46.99 27.94 0)
		)
		(property "Description" ""
			(at 46.99 27.94 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR03")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 257.175 155.575 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR016"
			(at 263.525 155.575 0)
		)
		(property "Value" "GND"
			(at 260.35 155.575 90)
		)
		(property "Footprint" ""
			(at 257.175 155.575 0)
		)
		(property "Datasheet" ""
			(at 257.175 155.575 0)
		)
		(property "Description" ""
			(at 257.175 155.575 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR016")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 137.16 90.17 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C1"
			(at 140.335 88.9063 0)
		)
		(property "Value" "2.2uf"
			(at 140.335 91.4463 0)
		)
		(property "Footprint" "Nut FootPrint files:C_1806_4516Metric"
			(at 137.16 90.17 0)
		)
		(property "Datasheet" "~"
			(at 137.16 90.17 0)
		)
		(property "Description" ""
			(at 137.16 90.17 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "C1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 53.975 47.625 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C6"
			(at 53.34 41.91 90)
		)
		(property "Value" "0.22uf"
			(at 55.245 41.91 90)
		)
		(property "Footprint" "Nut FootPrint files:C_1806_4516Metric"
			(at 53.975 47.625 0)
		)
		(property "Datasheet" "~"
			(at 53.975 47.625 0)
		)
		(property "Description" ""
			(at 53.975 47.625 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "C6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 254 99.695 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR011"
			(at 254 106.045 0)
		)
		(property "Value" "GND"
			(at 254 104.14 90)
		)
		(property "Footprint" ""
			(at 254 99.695 0)
		)
		(property "Datasheet" ""
			(at 254 99.695 0)
		)
		(property "Description" ""
			(at 254 99.695 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR011")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VSS")
		(at 133.985 33.02 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR08"
			(at 133.985 36.83 0)
		)
		(property "Value" "VSS"
			(at 133.985 28.575 90)
		)
		(property "Footprint" ""
			(at 133.985 33.02 0)
		)
		(property "Datasheet" ""
			(at 133.985 33.02 0)
		)
		(property "Description" ""
			(at 133.985 33.02 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR08")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 45.085 45.085 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R3"
			(at 42.545 43.815 90)
		)
		(property "Value" "20R"
			(at 47.625 43.815 90)
		)
		(property "Footprint" "Nut FootPrint files:R_1206_3216Metric_Pad1.42x1.75mm_HandSolder"
			(at 45.085 45.085 0)
		)
		(property "Datasheet" "~"
			(at 45.085 45.085 0)
		)
		(property "Description" ""
			(at 45.085 45.085 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "R3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 69.85 144.145 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R15"
			(at 71.12 141.605 90)
		)
		(property "Value" "10kR"
			(at 71.12 146.685 90)
		)
		(property "Footprint" "Nut FootPrint files:R_1206_3216Metric_Pad1.42x1.75mm_HandSolder"
			(at 69.85 144.145 0)
		)
		(property "Datasheet" "~"
			(at 69.85 144.145 0)
		)
		(property "Description" ""
			(at 69.85 144.145 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "R15")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 52.705 91.44 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C7"
			(at 53.34 97.79 90)
		)
		(property "Value" "1uf"
			(at 51.435 97.155 90)
		)
		(property "Footprint" "Nut FootPrint files:C_1806_4516Metric"
			(at 52.705 91.44 0)
		)
		(property "Datasheet" "~"
			(at 52.705 91.44 0)
		)
		(property "Description" ""
			(at 52.705 91.44 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "C7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 108.585 180.975 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R9"
			(at 111.125 182.245 90)
		)
		(property "Value" "0.001R"
			(at 106.045 182.245 90)
		)
		(property "Footprint" "Resistor_SMD:R_2512_6332Metric_Pad1.40x3.35mm_HandSolder"
			(at 108.585 180.975 0)
		)
		(property "Datasheet" "~"
			(at 108.585 180.975 0)
		)
		(property "Description" ""
			(at 108.585 180.975 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "R9")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 204.47 148.59 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR024"
			(at 210.82 148.59 0)
		)
		(property "Value" "GND"
			(at 207.01 148.59 90)
		)
		(property "Footprint" ""
			(at 204.47 148.59 0)
		)
		(property "Datasheet" ""
			(at 204.47 148.59 0)
		)
		(property "Description" ""
			(at 204.47 148.59 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR024")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VSS")
		(at 186.055 40.64 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07"
			(at 182.245 40.64 0)
		)
		(property "Value" "VSS"
			(at 189.865 40.64 90)
		)
		(property "Footprint" ""
			(at 186.055 40.64 0)
		)
		(property "Datasheet" ""
			(at 186.055 40.64 0)
		)
		(property "Description" ""
			(at 186.055 40.64 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR07")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VSS")
		(at 186.055 46.355 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06"
			(at 182.245 46.355 0)
		)
		(property "Value" "VSS"
			(at 189.865 46.355 90)
		)
		(property "Footprint" ""
			(at 186.055 46.355 0)
		)
		(property "Datasheet" ""
			(at 186.055 46.355 0)
		)
		(property "Description" ""
			(at 186.055 46.355 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR06")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VSS")
		(at 156.21 165.1 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR09"
			(at 156.21 161.29 0)
		)
		(property "Value" "VSS"
			(at 156.21 169.545 0)
		)
		(property "Footprint" ""
			(at 156.21 165.1 0)
		)
		(property "Datasheet" ""
			(at 156.21 165.1 0)
		)
		(property "Description" ""
			(at 156.21 165.1 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR09")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 240.03 142.24 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R18"
			(at 237.49 140.97 90)
		)
		(property "Value" "20R"
			(at 242.57 140.97 90)
		)
		(property "Footprint" "Nut FootPrint files:R_1206_3216Metric_Pad1.42x1.75mm_HandSolder"
			(at 240.03 142.24 0)
		)
		(property "Datasheet" "~"
			(at 240.03 142.24 0)
		)
		(property "Description" ""
			(at 240.03 142.24 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "R18")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VSS")
		(at 185.42 92.71 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR013"
			(at 181.61 92.71 0)
		)
		(property "Value" "VSS"
			(at 189.23 92.71 90)
		)
		(property "Footprint" ""
			(at 185.42 92.71 0)
		)
		(property "Datasheet" ""
			(at 185.42 92.71 0)
		)
		(property "Description" ""
			(at 185.42 92.71 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR013")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3.3V")
		(at 234.315 130.81 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR018"
			(at 238.125 130.81 0)
		)
		(property "Value" "+3.3V"
			(at 231.14 128.905 90)
		)
		(property "Footprint" ""
			(at 234.315 130.81 0)
		)
		(property "Datasheet" ""
			(at 234.315 130.81 0)
		)
		(property "Description" ""
			(at 234.315 130.81 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR018")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 238.76 130.81 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R17"
			(at 236.22 129.54 90)
		)
		(property "Value" "20R"
			(at 241.3 129.54 90)
		)
		(property "Footprint" "Nut FootPrint files:R_1206_3216Metric_Pad1.42x1.75mm_HandSolder"
			(at 238.76 130.81 0)
		)
		(property "Datasheet" "~"
			(at 238.76 130.81 0)
		)
		(property "Description" ""
			(at 238.76 130.81 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "R17")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 44.45 34.925 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C3"
			(at 45.085 29.21 90)
		)
		(property "Value" "0.22uf"
			(at 43.18 29.21 90)
		)
		(property "Footprint" "Nut FootPrint files:C_1806_4516Metric"
			(at 44.45 34.925 0)
		)
		(property "Datasheet" "~"
			(at 44.45 34.925 0)
		)
		(property "Description" ""
			(at 44.45 34.925 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "C3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Switch:SW_Push")
		(at 248.92 142.24 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "SW2"
			(at 248.92 134.62 0)
		)
		(property "Value" "SW_Push"
			(at 248.92 137.16 0)
		)
		(property "Footprint" "Button_Switch_THT:SW_PUSH_6mm_H5mm"
			(at 248.92 137.16 0)
		)
		(property "Datasheet" "~"
			(at 248.92 137.16 0)
		)
		(property "Description" ""
			(at 248.92 142.24 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "SW2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 257.175 142.24 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR015"
			(at 263.525 142.24 0)
		)
		(property "Value" "GND"
			(at 260.35 142.24 90)
		)
		(property "Footprint" ""
			(at 257.175 142.24 0)
		)
		(property "Datasheet" ""
			(at 257.175 142.24 0)
		)
		(property "Description" ""
			(at 257.175 142.24 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR015")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VSS")
		(at 118.745 93.98 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR02"
			(at 118.745 90.17 0)
		)
		(property "Value" "VSS"
			(at 118.745 98.425 0)
		)
		(property "Footprint" ""
			(at 118.745 93.98 0)
		)
		(property "Datasheet" ""
			(at 118.745 93.98 0)
		)
		(property "Description" ""
			(at 118.745 93.98 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR02")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Nut Sch Library files:NODE_MCU_ESP32_GPIO_GROUPED_30PIN")
		(at 247.65 64.77 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U1"
			(at 254.9241 29.21 0)
		)
		(property "Value" "NODE_MCU_ESP32_GPIO_GROUPED_30PIN"
			(at 254.9241 31.75 0)
		)
		(property "Footprint" "Nut FootPrint files:node_mcu_esp32_30pins"
			(at 248.92 109.22 0)
		)
		(property "Datasheet" ""
			(at 248.92 109.22 0)
		)
		(property "Description" ""
			(at 247.65 64.77 0)
		)
		(pin "4")
		(pin "22")
		(pin "24")
		(pin "5")
		(pin "7")
		(pin "6")
		(pin "12")
		(pin "10")
		(pin "29")
		(pin "18")
		(pin "2")
		(pin "20")
		(pin "9")
		(pin "11")
		(pin "21")
		(pin "16")
		(pin "27")
		(pin "13")
		(pin "3")
		(pin "30")
		(pin "28")
		(pin "15")
		(pin "14")
		(pin "8")
		(pin "1")
		(pin "17")
		(pin "19")
		(pin "25")
		(pin "26")
		(pin "23")
		(instances
			(project "BMS1.0"
				(path
					(reference "U1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Mechanical:MountingHole")
		(at 16.51 188.595 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "H1"
			(at 19.05 187.325 0)
		)
		(property "Value" "MountingHole"
			(at 19.05 189.865 0)
		)
		(property "Footprint" "MountingHole:MountingHole_2.2mm_M2"
			(at 16.51 188.595 0)
		)
		(property "Datasheet" "~"
			(at 16.51 188.595 0)
		)
		(property "Description" ""
			(at 16.51 188.595 0)
		)
		(instances
			(project "BMS1.0"
				(path
					(reference "H1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:Conn_01x02_Socket")
		(at 179.705 54.61 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "J5"
			(at 178.435 55.88 0)
		)
		(property "Value" "Conn_01x02_Socket"
			(at 180.34 52.07 0)
		)
		(property "Footprint" "Connector_JST:JST_XH_B2B-XH-A_1x02_P2.50mm_Vertical"
			(at 179.705 54.61 0)
		)
		(property "Datasheet" "~"
			(at 179.705 54.61 0)
		)
		(property "Description" ""
			(at 179.705 54.61 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "J5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 39.37 37.465 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R1"
			(at 36.83 36.195 90)
		)
		(property "Value" "20R"
			(at 41.91 36.195 90)
		)
		(property "Footprint" "Nut FootPrint files:R_1206_3216Metric_Pad1.42x1.75mm_HandSolder"
			(at 39.37 37.465 0)
		)
		(property "Datasheet" "~"
			(at 39.37 37.465 0)
		)
		(property "Description" ""
			(at 39.37 37.465 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "R1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:Conn_01x05_Socket")
		(at 29.845 42.545 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "J1"
			(at 29.21 38.1 0)
		)
		(property "Value" "Conn_01x05_Socket"
			(at 28.575 51.435 90)
		)
		(property "Footprint" "Connector_JST:JST_XH_B5B-XH-A_1x05_P2.50mm_Vertical"
			(at 29.845 42.545 0)
		)
		(property "Datasheet" "~"
			(at 29.845 42.545 0)
		)
		(property "Description" ""
			(at 29.845 42.545 0)
		)
		(pin "2")
		(pin "5")
		(pin "1")
		(pin "3")
		(pin "4")
		(instances
			(project "BMS1.0"
				(path
					(reference "J1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "SamacSys_Parts:FQP30N06L")
		(at 60.325 171.45 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "Q4"
			(at 57.785 156.21 90)
		)
		(property "Value" "FQP30N06L"
			(at 57.785 158.75 90)
		)
		(property "Footprint" "Package_TO_SOT_THT:TO-220-3_Horizontal_TabDown"
			(at 159.055 160.02 0)
		)
		(property "Datasheet" "https://www.onsemi.com/pub/Collateral/FQP30N06L-D.pdf"
			(at 259.055 160.02 0)
		)
		(property "Description" ""
			(at 60.325 171.45 0)
		)
		(property "Height" "4.7"
			(at 459.055 160.02 0)
		)
		(property "Manufacturer_Name" "onsemi"
			(at 559.055 160.02 0)
		)
		(property "Manufacturer_Part_Number" "FQP30N06L"
			(at 659.055 160.02 0)
		)
		(property "Mouser Part Number" "512-FQP30N06L"
			(at 759.055 160.02 0)
		)
		(property "Mouser Price/Stock" "https://www.mouser.co.uk/ProductDetail/onsemi-Fairchild/FQP30N06L?qs=%252Beu4QTTVkDqugBwFplJ%252Bug%3D%3D"
			(at 859.055 160.02 0)
		)
		(property "Arrow Part Number" "FQP30N06L"
			(at 959.055 160.02 0)
		)
		(property "Arrow Price/Stock" "https://www.arrow.com/en/products/fqp30n06l/on-semiconductor?region=europe"
			(at 1059.055 160.02 0)
		)
		(pin "2")
		(pin "3")
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "Q4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VSS")
		(at 150.495 177.8 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR010"
			(at 150.495 173.99 0)
		)
		(property "Value" "VSS"
			(at 150.495 182.245 0)
		)
		(property "Footprint" ""
			(at 150.495 177.8 0)
		)
		(property "Datasheet" ""
			(at 150.495 177.8 0)
		)
		(property "Description" ""
			(at 150.495 177.8 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR010")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3.3V")
		(at 204.47 151.13 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR023"
			(at 200.66 151.13 0)
		)
		(property "Value" "+3.3V"
			(at 208.915 151.765 90)
		)
		(property "Footprint" ""
			(at 204.47 151.13 0)
		)
		(property "Datasheet" ""
			(at 204.47 151.13 0)
		)
		(property "Description" ""
			(at 204.47 151.13 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR023")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 242.57 99.695 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR012"
			(at 242.57 106.045 0)
		)
		(property "Value" "GND"
			(at 242.57 104.14 0)
		)
		(property "Footprint" ""
			(at 242.57 99.695 0)
		)
		(property "Datasheet" ""
			(at 242.57 99.695 0)
		)
		(property "Description" ""
			(at 242.57 99.695 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR012")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:D_Schottky")
		(at 40.005 87.63 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "D1"
			(at 39.37 90.805 0)
		)
		(property "Value" "D_Schottky"
			(at 38.1 84.455 0)
		)
		(property "Footprint" "Nut FootPrint files:D_1206_3216Metric_Pad1.42x1.75mm_HandSolder"
			(at 40.005 87.63 0)
		)
		(property "Datasheet" "~"
			(at 40.005 87.63 0)
		)
		(property "Description" ""
			(at 40.005 87.63 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "D1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 45.085 50.165 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R4"
			(at 42.545 48.895 90)
		)
		(property "Value" "20R"
			(at 47.625 48.895 90)
		)
		(property "Footprint" "Nut FootPrint files:R_1206_3216Metric_Pad1.42x1.75mm_HandSolder"
			(at 45.085 50.165 0)
		)
		(property "Datasheet" "~"
			(at 45.085 50.165 0)
		)
		(property "Description" ""
			(at 45.085 50.165 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "R4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 30.48 168.91 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R12"
			(at 29.21 171.45 90)
		)
		(property "Value" "10kR"
			(at 29.21 166.37 90)
		)
		(property "Footprint" "Nut FootPrint files:R_1206_3216Metric_Pad1.42x1.75mm_HandSolder"
			(at 30.48 168.91 0)
		)
		(property "Datasheet" "~"
			(at 30.48 168.91 0)
		)
		(property "Description" ""
			(at 30.48 168.91 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "R12")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Small")
		(at 48.895 34.925 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "C2"
			(at 48.26 29.21 90)
		)
		(property "Value" "0.22uf"
			(at 50.165 29.21 90)
		)
		(property "Footprint" "Nut FootPrint files:C_1806_4516Metric"
			(at 48.895 34.925 0)
		)
		(property "Datasheet" "~"
			(at 48.895 34.925 0)
		)
		(property "Description" ""
			(at 48.895 34.925 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "C2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Custom_Sym_Library_For_PCB:SSD1306_OLED_128x64")
		(at 193.675 152.4 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "Brd1"
			(at 193.675 140.97 90)
		)
		(property "Value" "SSD1306_OLED_128x64"
			(at 193.675 143.51 90)
		)
		(property "Footprint" "Nut FootPrint files:oled_display_ssd1306_128x32"
			(at 200.025 152.4 0)
		)
		(property "Datasheet" ""
			(at 200.025 152.4 0)
		)
		(property "Description" ""
			(at 193.675 152.4 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(instances
			(project "BMS1.0"
				(path
					(reference "Brd1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 112.395 171.45 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R8"
			(at 111.125 173.99 90)
		)
		(property "Value" "100R"
			(at 111.125 168.91 90)
		)
		(property "Footprint" "Nut FootPrint files:R_1206_3216Metric_Pad1.42x1.75mm_HandSolder"
			(at 112.395 171.45 0)
		)
		(property "Datasheet" "~"
			(at 112.395 171.45 0)
		)
		(property "Description" ""
			(at 112.395 171.45 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "R8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Transistor_FET:IRLZ34N")
		(at 38.1 142.24 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "Q1"
			(at 38.1 132.715 90)
		)
		(property "Value" "IRLZ34N"
			(at 38.1 135.255 90)
		)
		(property "Footprint" "Package_TO_SOT_THT:TO-220-3_Horizontal_TabDown"
			(at 36.195 137.16 0)
		)
		(property "Datasheet" "http://www.infineon.com/dgdl/irlz34npbf.pdf?fileId=5546d462533600a40153567206892720"
			(at 34.29 137.16 0)
		)
		(property "Description" ""
			(at 38.1 142.24 0)
		)
		(pin "2")
		(pin "1")
		(pin "3")
		(instances
			(project "BMS1.0"
				(path
					(reference "Q1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+3.3V")
		(at 235.585 142.24 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "#PWR019"
			(at 239.395 142.24 0)
		)
		(property "Value" "+3.3V"
			(at 232.41 140.335 90)
		)
		(property "Footprint" ""
			(at 235.585 142.24 0)
		)
		(property "Datasheet" ""
			(at 235.585 142.24 0)
		)
		(property "Description" ""
			(at 235.585 142.24 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR019")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 257.175 130.81 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR014"
			(at 263.525 130.81 0)
		)
		(property "Value" "GND"
			(at 260.35 130.81 90)
		)
		(property "Footprint" ""
			(at 257.175 130.81 0)
		)
		(property "Datasheet" ""
			(at 257.175 130.81 0)
		)
		(property "Description" ""
			(at 257.175 130.81 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR014")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VSS")
		(at 136.525 93.98 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR01"
			(at 136.525 90.17 0)
		)
		(property "Value" "VSS"
			(at 136.525 98.425 0)
		)
		(property "Footprint" ""
			(at 136.525 93.98 0)
		)
		(property "Datasheet" ""
			(at 136.525 93.98 0)
		)
		(property "Description" ""
			(at 136.525 93.98 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR01")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector:Conn_01x02_Socket")
		(at 178.435 90.17 0)
		(mirror y)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "J6"
			(at 176.53 91.44 0)
		)
		(property "Value" "Conn_01x02_Socket"
			(at 179.07 87.63 0)
		)
		(property "Footprint" "Jumper:SolderJumper-2_P1.3mm_Open_TrianglePad1.0x1.5mm"
			(at 178.435 90.17 0)
		)
		(property "Datasheet" "~"
			(at 178.435 90.17 0)
		)
		(property "Description" ""
			(at 178.435 90.17 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "J6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 49.53 87.63 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R6"
			(at 46.99 86.36 90)
		)
		(property "Value" "100R"
			(at 52.07 86.36 90)
		)
		(property "Footprint" "Nut FootPrint files:R_1206_3216Metric_Pad1.42x1.75mm_HandSolder"
			(at 49.53 87.63 0)
		)
		(property "Datasheet" "~"
			(at 49.53 87.63 0)
		)
		(property "Description" ""
			(at 49.53 87.63 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "R6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Switch:SW_Push")
		(at 248.92 130.81 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "SW1"
			(at 248.92 123.19 0)
		)
		(property "Value" "SW_Push"
			(at 248.92 125.73 0)
		)
		(property "Footprint" "Button_Switch_THT:SW_PUSH_6mm_H5mm"
			(at 248.92 125.73 0)
		)
		(property "Datasheet" "~"
			(at 248.92 125.73 0)
		)
		(property "Description" ""
			(at 248.92 130.81 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "SW1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 67.945 168.91 0)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "R13"
			(at 69.215 171.45 90)
		)
		(property "Value" "10kR"
			(at 69.215 166.37 90)
		)
		(property "Footprint" "Nut FootPrint files:R_1206_3216Metric_Pad1.42x1.75mm_HandSolder"
			(at 67.945 168.91 0)
		)
		(property "Datasheet" "~"
			(at 67.945 168.91 0)
		)
		(property "Description" ""
			(at 67.945 168.91 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "R13")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Mechanical:MountingHole")
		(at 34.925 188.595 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "H2"
			(at 37.465 187.325 0)
		)
		(property "Value" "MountingHole"
			(at 37.465 189.865 0)
		)
		(property "Footprint" "MountingHole:MountingHole_2.2mm_M2"
			(at 34.925 188.595 0)
		)
		(property "Datasheet" "~"
			(at 34.925 188.595 0)
		)
		(property "Description" ""
			(at 34.925 188.595 0)
		)
		(instances
			(project "BMS1.0"
				(path
					(reference "H2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VSS")
		(at 186.055 57.15 270)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR04"
			(at 182.245 57.15 0)
		)
		(property "Value" "VSS"
			(at 189.865 57.15 90)
		)
		(property "Footprint" ""
			(at 186.055 57.15 0)
		)
		(property "Datasheet" ""
			(at 186.055 57.15 0)
		)
		(property "Description" ""
			(at 186.055 57.15 0)
		)
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "#PWR04")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "SamacSys_Parts:FQP30N06L")
		(at 36.83 171.45 270)
		(mirror x)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(property "Reference" "Q3"
			(at 39.37 156.21 90)
		)
		(property "Value" "FQP30N06L"
			(at 39.37 158.75 90)
		)
		(property "Footprint" "Package_TO_SOT_THT:TO-220-3_Horizontal_TabDown"
			(at -61.9 160.02 0)
		)
		(property "Datasheet" "https://www.onsemi.com/pub/Collateral/FQP30N06L-D.pdf"
			(at -161.9 160.02 0)
		)
		(property "Description" ""
			(at 36.83 171.45 0)
		)
		(property "Height" "4.7"
			(at -361.9 160.02 0)
		)
		(property "Manufacturer_Name" "onsemi"
			(at -461.9 160.02 0)
		)
		(property "Manufacturer_Part_Number" "FQP30N06L"
			(at -561.9 160.02 0)
		)
		(property "Mouser Part Number" "512-FQP30N06L"
			(at -661.9 160.02 0)
		)
		(property "Mouser Price/Stock" "https://www.mouser.co.uk/ProductDetail/onsemi-Fairchild/FQP30N06L?qs=%252Beu4QTTVkDqugBwFplJ%252Bug%3D%3D"
			(at -761.9 160.02 0)
		)
		(property "Arrow Part Number" "FQP30N06L"
			(at -861.9 160.02 0)
		)
		(property "Arrow Price/Stock" "https://www.arrow.com/en/products/fqp30n06l/on-semiconductor?region=europe"
			(at -961.9 160.02 0)
		)
		(pin "2")
		(pin "3")
		(pin "1")
		(instances
			(project "BMS1.0"
				(path
					(reference "Q3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Transistor_BJT:S8050")
		(at 162.56 157.48 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "Q5"
			(at 168.275 156.21 0)
		)
		(property "Value" "S8050"
			(at 168.275 158.75 0)
		)
		(property "Footprint" "Package_TO_SOT_THT:TO-92_Inline_W4.0mm_Horizontal_FlatSideDown"
			(at 167.64 159.385 0)
		)
		(property "Datasheet" "http://www.unisonic.com.tw/datasheet/S8050.pdf"
			(at 162.56 157.48 0)
		)
		(property "Description" ""
			(at 162.56 157.48 0)
		)
		(pin "3")
		(pin "1")
		(pin "2")
		(instances
			(project "BMS1.0"
				(path
					(reference "Q5")
					(unit 1)
				)
			)
		)
	)
	(sheet_instances
		(path
			(page "1")
		)
	)
	(embedded_fonts no)
)
